From 85f496b26702bf6566296072795e821d70156c09 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Wed, 15 Sep 2021 00:32:58 +0200
Subject: Database: update to EPSG v10.035

This seriously impacts French CRS users with the introduction of new
datums, geodetic CRS and projected CRS based on "RGF 93 v2" and "RGF 93 v2b",
and the previous single "RGF 93" being renamed as "RGF 93 v1".

To be noted too, the addition of a null transformation between NAD83(2011)
and WGS 84, which impacts a number of tests in the test suite.
---
 data/sql/compound_crs.sql | 10 ++++++----
 1 file changed, 6 insertions(+), 4 deletions(-)

(limited to 'data/sql/compound_crs.sql')

diff --git a/data/sql/compound_crs.sql b/data/sql/compound_crs.sql
index 38d34e66..09b18820 100644
--- a/data/sql/compound_crs.sql
+++ b/data/sql/compound_crs.sql
@@ -32,9 +32,9 @@ INSERT INTO "compound_crs" VALUES('EPSG','5598','FEH2010 / Fehmarnbelt TM + FCSV
 INSERT INTO "usage" VALUES('EPSG','4068','compound_crs','EPSG','5598','EPSG','3890','EPSG','1139');
 INSERT INTO "compound_crs" VALUES('EPSG','5628','SWEREF99 + RH2000 height',NULL,'EPSG','4619','EPSG','5613',0);
 INSERT INTO "usage" VALUES('EPSG','4095','compound_crs','EPSG','5628','EPSG','3313','EPSG','1142');
-INSERT INTO "compound_crs" VALUES('EPSG','5698','RGF93 / Lambert-93 + NGF-IGN69 height',NULL,'EPSG','2154','EPSG','5720',0);
+INSERT INTO "compound_crs" VALUES('EPSG','5698','RGF93 v1 / Lambert-93 + NGF-IGN69 height',NULL,'EPSG','2154','EPSG','5720',0);
 INSERT INTO "usage" VALUES('EPSG','4141','compound_crs','EPSG','5698','EPSG','1326','EPSG','1142');
-INSERT INTO "compound_crs" VALUES('EPSG','5699','RGF93 / Lambert-93 + NGF-IGN78 height',NULL,'EPSG','2154','EPSG','5721',0);
+INSERT INTO "compound_crs" VALUES('EPSG','5699','RGF93 v1 / Lambert-93 + NGF-IGN78 height',NULL,'EPSG','2154','EPSG','5721',0);
 INSERT INTO "usage" VALUES('EPSG','4142','compound_crs','EPSG','5699','EPSG','1327','EPSG','1142');
 INSERT INTO "compound_crs" VALUES('EPSG','5707','NTF (Paris) / Lambert zone I + NGF-IGN69 height',NULL,'EPSG','27571','EPSG','5720',0);
 INSERT INTO "usage" VALUES('EPSG','4150','compound_crs','EPSG','5707','EPSG','1731','EPSG','1142');
@@ -676,9 +676,9 @@ INSERT INTO "compound_crs" VALUES('EPSG','9536','RGAF09 + IGN 2008 LD height',NU
 INSERT INTO "usage" VALUES('EPSG','14484','compound_crs','EPSG','9536','EPSG','2893','EPSG','1026');
 INSERT INTO "compound_crs" VALUES('EPSG','9537','RGAF09 + Martinique 1987 height',NULL,'EPSG','5489','EPSG','5756',0);
 INSERT INTO "usage" VALUES('EPSG','14486','compound_crs','EPSG','9537','EPSG','3276','EPSG','1026');
-INSERT INTO "compound_crs" VALUES('EPSG','9538','RGF93 + NGF-IGN69 height',NULL,'EPSG','4171','EPSG','5720',0);
+INSERT INTO "compound_crs" VALUES('EPSG','9538','RGF93 v2 + NGF-IGN69 height',NULL,'EPSG','9777','EPSG','5720',0);
 INSERT INTO "usage" VALUES('EPSG','14489','compound_crs','EPSG','9538','EPSG','1326','EPSG','1026');
-INSERT INTO "compound_crs" VALUES('EPSG','9539','RGF93 + NGF-IGN78 height',NULL,'EPSG','4171','EPSG','5721',0);
+INSERT INTO "compound_crs" VALUES('EPSG','9539','RGF93 v2 + NGF-IGN78 height',NULL,'EPSG','9777','EPSG','5721',0);
 INSERT INTO "usage" VALUES('EPSG','14490','compound_crs','EPSG','9539','EPSG','1327','EPSG','1026');
 INSERT INTO "compound_crs" VALUES('EPSG','9540','RGNC91-93 + NGNC08 height',NULL,'EPSG','4749','EPSG','9351',0);
 INSERT INTO "usage" VALUES('EPSG','14495','compound_crs','EPSG','9540','EPSG','3430','EPSG','1026');
@@ -716,3 +716,5 @@ INSERT INTO "compound_crs" VALUES('EPSG','9762','ECML14_NB Grid + ODN height',NU
 INSERT INTO "usage" VALUES('EPSG','16499','compound_crs','EPSG','9762','EPSG','4621','EPSG','1141');
 INSERT INTO "compound_crs" VALUES('EPSG','9767','EWR2 Grid + ODN height',NULL,'EPSG','9766','EPSG','5701',0);
 INSERT INTO "usage" VALUES('EPSG','16510','compound_crs','EPSG','9767','EPSG','4622','EPSG','1141');
+INSERT INTO "compound_crs" VALUES('EPSG','9785','RGF93 v2b + NGF-IGN69 height',NULL,'EPSG','9782','EPSG','5720',0);
+INSERT INTO "usage" VALUES('EPSG','16594','compound_crs','EPSG','9785','EPSG','1326','EPSG','1026');
-- 
cgit v1.2.3

