From 05a7bcfa56a03437b2ba73616a6bc21c9347d2a7 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Wed, 30 Oct 2019 11:28:43 +0100
Subject: Rework importing of Vertical unit change from EPSG db, add support
 for Height Depth Reversal and use it in createOperations()

---
 data/sql/conversion.sql | 21 ---------------------
 1 file changed, 21 deletions(-)

(limited to 'data/sql/conversion.sql')

diff --git a/data/sql/conversion.sql b/data/sql/conversion.sql
index 02e96c7d..f42f0e79 100644
--- a/data/sql/conversion.sql
+++ b/data/sql/conversion.sql
@@ -739,15 +739,6 @@ INSERT INTO "conversion" VALUES('EPSG','7823','CS63 zone X6',NULL,NULL,'EPSG','4
 INSERT INTO "conversion" VALUES('EPSG','7824','CS63 zone X7',NULL,NULL,'EPSG','4434','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.05,'EPSG','9110','EPSG','8802','Longitude of natural origin',41.3,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0,'EPSG','9201','EPSG','8806','False easting',7300000.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','7875','St. Helena Local Grid 1971',NULL,NULL,'EPSG','3183','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',-15.58,'EPSG','9110','EPSG','8802','Longitude of natural origin',-5.43,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0,'EPSG','9201','EPSG','8806','False easting',300000.0,'EPSG','9001','EPSG','8807','False northing',2000000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','7876','St. Helena Local Grid (Tritan)',NULL,NULL,'EPSG','3183','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',-15.58,'EPSG','9110','EPSG','8802','Longitude of natural origin',-5.43,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0,'EPSG','9201','EPSG','8806','False easting',299483.737,'EPSG','9001','EPSG','8807','False northing',2000527.879,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7963','Poolbeg height (ft(Br36)) to Poolbeg height (m)',NULL,NULL,'EPSG','1305','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',0.3048007491,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7972','NGVD29 height (ftUS) to NGVD29 height (m)',NULL,NULL,'EPSG','1323','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',0.304800609601219,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7978','NGVD29 height (ftUS) to NGVD29 depth (ftUS)',NULL,NULL,'EPSG','1323','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7982','HKPD height to HKPD depth',NULL,NULL,'EPSG','3334','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7984','KOC WD height to KOC WD depth',NULL,NULL,'EPSG','3267','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7985','KOC WD depth to KOC WD depth (ft)',NULL,NULL,'EPSG','3267','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',3.28083989501312,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7988','NAVD88 height to NAVD88 height (ftUS)',NULL,NULL,'EPSG','3664','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',3.28083333333333,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7989','NAVD88 height to NAVD88 depth',NULL,NULL,'EPSG','4161','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','7990','NAVD88 height (ftUS) to NAVD88 depth (ftUS)',NULL,NULL,'EPSG','3664','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','7993','Albany Grid 2020',NULL,NULL,'EPSG','4439','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',117.53,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0000044,'EPSG','9201','EPSG','8806','False easting',50000.0,'EPSG','9001','EPSG','8807','False northing',4100000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','7994','Barrow Island Grid 2020',NULL,NULL,'EPSG','4438','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',115.15,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0000022,'EPSG','9201','EPSG','8806','False easting',60000.0,'EPSG','9001','EPSG','8807','False northing',2700000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','7995','Broome Grid 2020',NULL,NULL,'EPSG','4441','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',122.2,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.00000298,'EPSG','9201','EPSG','8806','False easting',50000.0,'EPSG','9001','EPSG','8807','False northing',2300000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
@@ -770,15 +761,8 @@ INSERT INTO "conversion" VALUES('EPSG','8011','Perth Coastal Grid',NULL,NULL,'EP
 INSERT INTO "conversion" VALUES('EPSG','8012','Port Hedland Grid 2020',NULL,NULL,'EPSG','4466','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',118.36,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.00000135,'EPSG','9201','EPSG','8806','False easting',50000.0,'EPSG','9001','EPSG','8807','False northing',2500000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8033','TM Zone 20N (US survey feet)',NULL,NULL,'EPSG','4467','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9102','EPSG','8802','Longitude of natural origin',-63.0,'EPSG','9102','EPSG','8805','Scale factor at natural origin',0.9996,'EPSG','9201','EPSG','8806','False easting',1640416.667,'EPSG','9003','EPSG','8807','False northing',0.0,'EPSG','9003',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8034','TM Zone 21N (US survey feet)',NULL,NULL,'EPSG','4468','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9102','EPSG','8802','Longitude of natural origin',-57.0,'EPSG','9102','EPSG','8805','Scale factor at natural origin',0.9996,'EPSG','9201','EPSG','8806','False easting',1640416.667,'EPSG','9003','EPSG','8807','False northing',0.0,'EPSG','9003',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8038','Instantaneous Water Level height to Instantaneous Water Level depth',NULL,NULL,'EPSG','1262','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8039','MSL height to MSL depth',NULL,NULL,'EPSG','1262','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8040','Gusterberg Grid',NULL,NULL,'EPSG','4455','EPSG','9806','Cassini-Soldner','EPSG','8801','Latitude of natural origin',48.021847,'EPSG','9110','EPSG','8802','Longitude of natural origin',31.481505,'EPSG','9110','EPSG','8806','False easting',0.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8041','St. Stephen Grid',NULL,NULL,'EPSG','4456','EPSG','9806','Cassini-Soldner','EPSG','8801','Latitude of natural origin',48.123154,'EPSG','9110','EPSG','8802','Longitude of natural origin',34.022732,'EPSG','9110','EPSG','8806','False easting',0.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8054','MSL height to MSL height (ft)',NULL,NULL,'EPSG','1262','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',3.28083989501312,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8055','MSL height to MSL height (ftUS)',NULL,NULL,'EPSG','1245','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',3.28083333333333,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8056','MSL depth to MSL depth (ft)',NULL,NULL,'EPSG','1262','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',3.28083989501312,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8057','MSL depth to MSL depth (ftUS)',NULL,NULL,'EPSG','1245','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',3.28083333333333,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8060','Baltic 1977 height to Baltic 1977 depth',NULL,NULL,'EPSG','2423','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8061','Pima County zone 1 East (ft)',NULL,NULL,'EPSG','4472','EPSG','9815','Hotine Oblique Mercator (variant B)','EPSG','8811','Latitude of projection centre',32.15,'EPSG','9110','EPSG','8812','Longitude of projection centre',-111.24,'EPSG','9110','EPSG','8813','Azimuth of initial line',45.0,'EPSG','9102','EPSG','8814','Angle from Rectified to Skew Grid',45.0,'EPSG','9102','EPSG','8815','Scale factor on initial line',1.00011,'EPSG','9201','EPSG','8816','Easting at projection centre',160000.0,'EPSG','9002','EPSG','8817','Northing at projection centre',800000.0,'EPSG','9002',0);
 INSERT INTO "conversion" VALUES('EPSG','8062','Pima County zone 2 Central (ft)',NULL,NULL,'EPSG','4460','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',31.15,'EPSG','9110','EPSG','8802','Longitude of natural origin',-112.1,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.00009,'EPSG','9201','EPSG','8806','False easting',1800000.0,'EPSG','9002','EPSG','8807','False northing',1000000.0,'EPSG','9002',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8063','Pima County zone 3 West (ft)',NULL,NULL,'EPSG','4450','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',31.3,'EPSG','9110','EPSG','8802','Longitude of natural origin',-113.1,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.000055,'EPSG','9201','EPSG','8806','False easting',600000.0,'EPSG','9002','EPSG','8807','False northing',0.0,'EPSG','9002',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
@@ -786,7 +770,6 @@ INSERT INTO "conversion" VALUES('EPSG','8064','Pima County zone 4 Mt. Lemmon (ft
 INSERT INTO "conversion" VALUES('EPSG','8080','MTM Nova Scotia zone 4 v2',NULL,NULL,'EPSG','1534','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',-61.3,'EPSG','9110','EPSG','8805','Scale factor at natural origin',0.9999,'EPSG','9201','EPSG','8806','False easting',24500000.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8081','MTM Nova Scotia zone 5 v2',NULL,NULL,'EPSG','1535','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',0.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',-64.3,'EPSG','9110','EPSG','8805','Scale factor at natural origin',0.9999,'EPSG','9201','EPSG','8806','False easting',25500000.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8087','Iceland Lambert 2016',NULL,NULL,'EPSG','1120','EPSG','9802','Lambert Conic Conformal (2SP)','EPSG','8821','Latitude of false origin',65.0,'EPSG','9110','EPSG','8822','Longitude of false origin',-19.0,'EPSG','9110','EPSG','8823','Latitude of 1st standard parallel',64.15,'EPSG','9110','EPSG','8824','Latitude of 2nd standard parallel',65.45,'EPSG','9110','EPSG','8826','Easting at false origin',2700000.0,'EPSG','9001','EPSG','8827','Northing at false origin',300000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8229','NAVD88 height to NAVD88 height (ft)',NULL,NULL,'EPSG','4464','EPSG','1069','Change of Vertical Unit','EPSG','1051','Unit conversion scalar',3.28083989501312,'EPSG','9201',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8273','Oregon Burns-Harper zone (meters)',NULL,NULL,'EPSG','4459','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',43.3,'EPSG','9110','EPSG','8802','Longitude of natural origin',-117.4,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.00014,'EPSG','9201','EPSG','8806','False easting',90000.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8274','Oregon Burns-Harper zone (International feet)',NULL,NULL,'EPSG','4459','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',43.3,'EPSG','9110','EPSG','8802','Longitude of natural origin',-117.4,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.00014,'EPSG','9201','EPSG','8806','False easting',295275.5906,'EPSG','9002','EPSG','8807','False northing',0.0,'EPSG','9002',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8275','Oregon Canyon City-Burns zone (meters)',NULL,NULL,'EPSG','4465','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',43.3,'EPSG','9110','EPSG','8802','Longitude of natural origin',-119.0,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.00022,'EPSG','9201','EPSG','8806','False easting',20000.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
@@ -825,10 +808,6 @@ INSERT INTO "conversion" VALUES('EPSG','8307','Oregon Warner Highway zone (meter
 INSERT INTO "conversion" VALUES('EPSG','8308','Oregon Warner Highway zone (International feet)',NULL,NULL,'EPSG','4486','EPSG','9801','Lambert Conic Conformal (1SP)','EPSG','8801','Latitude of natural origin',42.3,'EPSG','9110','EPSG','8802','Longitude of natural origin',-120.0,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.000245,'EPSG','9201','EPSG','8806','False easting',131233.5958,'EPSG','9002','EPSG','8807','False northing',196850.3937,'EPSG','9002',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8309','Oregon Willamette Pass zone (meters)',NULL,NULL,'EPSG','4488','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',43.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',-122.0,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.000223,'EPSG','9201','EPSG','8806','False easting',20000.0,'EPSG','9001','EPSG','8807','False northing',0.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8310','Oregon Willamette Pass zone (International feet)',NULL,NULL,'EPSG','4488','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',43.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',-122.0,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.000223,'EPSG','9201','EPSG','8806','False easting',65616.7979,'EPSG','9002','EPSG','8807','False northing',0.0,'EPSG','9002',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8354','Black Sea height to Black Sea depth',NULL,NULL,'EPSG','3251','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8355','AIOC95 height to AIOC95 depth',NULL,NULL,'EPSG','2592','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8356','Caspian height to Caspian depth',NULL,NULL,'EPSG','1291','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-INSERT INTO "conversion" VALUES('EPSG','8359','Baltic 1957 height to Baltic 1957 depth',NULL,NULL,'EPSG','1306','EPSG','1068','Height Depth Reversal',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8373','NCRS Las Vegas zone (m)',NULL,NULL,'EPSG','4485','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',36.15,'EPSG','9110','EPSG','8802','Longitude of natural origin',-114.58,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0001,'EPSG','9201','EPSG','8806','False easting',100000.0,'EPSG','9001','EPSG','8807','False northing',200000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8374','NCRS Las Vegas zone (ftUS)',NULL,NULL,'EPSG','4485','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',36.15,'EPSG','9110','EPSG','8802','Longitude of natural origin',-114.58,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0001,'EPSG','9201','EPSG','8806','False easting',328083.3333,'EPSG','9003','EPSG','8807','False northing',656166.6667,'EPSG','9003',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "conversion" VALUES('EPSG','8375','NCRS Las Vegas high elevation zone (m)',NULL,NULL,'EPSG','4487','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',36.15,'EPSG','9110','EPSG','8802','Longitude of natural origin',-114.58,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.000135,'EPSG','9201','EPSG','8806','False easting',300000.0,'EPSG','9001','EPSG','8807','False northing',400000.0,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-- 
cgit v1.2.3

