From 230012325a04876da43e67dbcff76acbaff67c3e Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Thu, 10 Jun 2021 12:25:35 +0200
Subject: Database: update to EPSG v10.026

---
 data/sql/conversion.sql | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'data/sql/conversion.sql')

diff --git a/data/sql/conversion.sql b/data/sql/conversion.sql
index e6c6e7c3..c3a1e13b 100644
--- a/data/sql/conversion.sql
+++ b/data/sql/conversion.sql
@@ -1742,6 +1742,10 @@ INSERT INTO "conversion" VALUES('EPSG','9677','Bangladesh Transverse Mercator','
 INSERT INTO "usage" VALUES('EPSG','14878','conversion','EPSG','9677','EPSG','3217','EPSG','1274');
 INSERT INTO "conversion" VALUES('EPSG','9738','EOS21-TM','In conjunction with transformation ETRS89 to EOS-IRF (1) (code 9740), emulates the EOS21 Snake projection.','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',56.21,'EPSG','9110','EPSG','8802','Longitude of natural origin',-2.45,'EPSG','9110','EPSG','8805','Scale factor at natural origin',1.0,'EPSG','9201','EPSG','8806','False easting',74996.927,'EPSG','9001','EPSG','8807','False northing',133508.35,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "usage" VALUES('EPSG','15339','conversion','EPSG','9738','EPSG','4620','EPSG','1141');
+INSERT INTO "conversion" VALUES('EPSG','9746','SPCS83 Alabama East zone (US Survey feet)','This map projection is not formally recognised by the NGS because there is no State legislation for NAD83 defining the foot to be used. See code 10131 for official metric definition. ftUS required by AL DOT and used by other professional practioners.','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',30.3,'EPSG','9110','EPSG','8802','Longitude of natural origin',-85.5,'EPSG','9110','EPSG','8805','Scale factor at natural origin',0.99996,'EPSG','9201','EPSG','8806','False easting',656166.667,'EPSG','9003','EPSG','8807','False northing',0.0,'EPSG','9003',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15382','conversion','EPSG','9746','EPSG','2154','EPSG','1142');
+INSERT INTO "conversion" VALUES('EPSG','9747','SPCS83 Alabama West zone (US Survey feet)','This map projection is not formally recognised by the NGS because there is no State legislation for NAD83 defining the foot to be used. See code 10132 for official metric definition. ftUS required by AL DOT and used by other professional practioners.','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',30.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',-87.3,'EPSG','9110','EPSG','8805','Scale factor at natural origin',0.999933333,'EPSG','9201','EPSG','8806','False easting',1968500.0,'EPSG','9003','EPSG','8807','False northing',0.0,'EPSG','9003',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15381','conversion','EPSG','9747','EPSG','2155','EPSG','1142');
 INSERT INTO "conversion" VALUES('EPSG','10101','Alabama CS27 East zone','','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',30.3,'EPSG','9110','EPSG','8802','Longitude of natural origin',-85.5,'EPSG','9110','EPSG','8805','Scale factor at natural origin',0.99996,'EPSG','9201','EPSG','8806','False easting',500000.0,'EPSG','9003','EPSG','8807','False northing',0.0,'EPSG','9003',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "usage" VALUES('EPSG','11101','conversion','EPSG','10101','EPSG','2154','EPSG','1142');
 INSERT INTO "conversion" VALUES('EPSG','10102','Alabama CS27 West zone','','EPSG','9807','Transverse Mercator','EPSG','8801','Latitude of natural origin',30.0,'EPSG','9110','EPSG','8802','Longitude of natural origin',-87.3,'EPSG','9110','EPSG','8805','Scale factor at natural origin',0.999933333,'EPSG','9201','EPSG','8806','False easting',500000.0,'EPSG','9003','EPSG','8807','False northing',0.0,'EPSG','9003',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-- 
cgit v1.2.3

