From ef443bdf0e85a5ef7611bf0ac815610b9645f2eb Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Fri, 23 Oct 2020 17:42:39 +0200
Subject: Database: add interpolation_crs_auth_name and interpolation_crs_code
 columns to other_transformation table

---
 data/sql/customizations.sql | 7 ++++---
 1 file changed, 4 insertions(+), 3 deletions(-)

(limited to 'data/sql/customizations.sql')

diff --git a/data/sql/customizations.sql b/data/sql/customizations.sql
index 32b3b163..96e7fe80 100644
--- a/data/sql/customizations.sql
+++ b/data/sql/customizations.sql
@@ -55,7 +55,7 @@ INSERT INTO "usage" VALUES(
     'EPSG','1024'  -- unknown
 );
 
-INSERT INTO "other_transformation" VALUES('PROJ','CRS84_TO_EPSG_4326','OGC:CRS84 to WGS 84',NULL,'EPSG','9843','Axis Order Reversal (2D)','OGC','CRS84','EPSG','4326',0.0,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
+INSERT INTO "other_transformation" VALUES('PROJ','CRS84_TO_EPSG_4326','OGC:CRS84 to WGS 84',NULL,'EPSG','9843','Axis Order Reversal (2D)','OGC','CRS84','EPSG','4326',0.0,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "usage" VALUES(
     'PROJ',
     'CRS84_TO_EPSG_4326_USAGE',
@@ -66,7 +66,7 @@ INSERT INTO "usage" VALUES(
     'EPSG','1024'  -- unknown
 );
 
-INSERT INTO "other_transformation" VALUES('PROJ','CRS27_TO_EPSG_4267','OGC:CRS27 to NAD27',NULL,'EPSG','9843','Axis Order Reversal (2D)','OGC','CRS27','EPSG','4267',0.0,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
+INSERT INTO "other_transformation" VALUES('PROJ','CRS27_TO_EPSG_4267','OGC:CRS27 to NAD27',NULL,'EPSG','9843','Axis Order Reversal (2D)','OGC','CRS27','EPSG','4267',0.0,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "usage" VALUES(
     'PROJ',
     'CRS27_TO_EPSG_4267_USAGE',
@@ -77,7 +77,7 @@ INSERT INTO "usage" VALUES(
     'EPSG','1024'  -- unknown
 );
 
-INSERT INTO "other_transformation" VALUES('PROJ','CRS83_TO_EPSG_4269','OGC:CRS83 to NAD83',NULL,'EPSG','9843','Axis Order Reversal (2D)','OGC','CRS83','EPSG','4269',0.0,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
+INSERT INTO "other_transformation" VALUES('PROJ','CRS83_TO_EPSG_4269','OGC:CRS83 to NAD83',NULL,'EPSG','9843','Axis Order Reversal (2D)','OGC','CRS83','EPSG','4269',0.0,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
 INSERT INTO "usage" VALUES(
     'PROJ',
     'CRS83_TO_EPSG_4269_USAGE',
@@ -110,6 +110,7 @@ INSERT INTO other_transformation VALUES(
     NULL,NULL,NULL,NULL,NULL,NULL, -- param5
     NULL,NULL,NULL,NULL,NULL,NULL, -- param6
     NULL,NULL,NULL,NULL,NULL,NULL, -- param7
+    NULL,NULL,
     '20180701', -- operation version
     0);
 INSERT INTO "usage" VALUES(
-- 
cgit v1.2.3

