From 2e23effff14c82abf086664341a4646d4b928239 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Thu, 21 Feb 2019 12:19:36 +0100
Subject: proj.db: fix direction of USA GEOID12B grid alternatives

---
 data/sql/grid_alternatives.sql | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'data/sql/grid_alternatives.sql')

diff --git a/data/sql/grid_alternatives.sql b/data/sql/grid_alternatives.sql
index 0b43f275..6d766b21 100644
--- a/data/sql/grid_alternatives.sql
+++ b/data/sql/grid_alternatives.sql
@@ -376,7 +376,7 @@ INSERT INTO grid_alternatives(original_grid_name,
                               'g2012bu0.gtx',
                               'GTX',
                               'vgridshift',
-                              0,
+                              1,
                               'proj-datumgrid-north-america',
                               NULL, NULL, NULL, NULL);
 
@@ -392,7 +392,7 @@ INSERT INTO grid_alternatives(original_grid_name,
                               'g2012ba0.gtx',
                               'GTX',
                               'vgridshift',
-                              0,
+                              1,
                               'proj-datumgrid-north-america',
                               NULL, NULL, NULL, NULL);
 
@@ -408,7 +408,7 @@ INSERT INTO grid_alternatives(original_grid_name,
                               'g2012bp0.gtx',
                               'GTX',
                               'vgridshift',
-                              0,
+                              1,
                               'proj-datumgrid-north-america',
                               NULL, NULL, NULL, NULL);
 
@@ -424,7 +424,7 @@ INSERT INTO grid_alternatives(original_grid_name,
                               'g2012bg0.gtx',
                               'GTX',
                               'vgridshift',
-                              0,
+                              1,
                               'proj-datumgrid-north-america',
                               NULL, NULL, NULL, NULL);
 
@@ -440,7 +440,7 @@ INSERT INTO grid_alternatives(original_grid_name,
                               'g2012bs0.gtx',
                               'GTX',
                               'vgridshift',
-                              0,
+                              1,
                               'proj-datumgrid-north-america',
                               NULL, NULL, NULL, NULL);
 
-- 
cgit v1.2.3

