From ea719555f86399325b6d90840f8b3d4508b6e9bc Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Mon, 6 Dec 2021 23:43:03 +0100
Subject: Database: update to EPSG v10.041

---
 data/sql/grid_transformation.sql | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 09b8afe3..ed3fcd8c 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -1130,6 +1130,10 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9886','NAD27 to NAD83(CSRS)v2 (
 INSERT INTO "usage" VALUES('EPSG','16978','grid_transformation','EPSG','9886','EPSG','2375','EPSG','1151');
 INSERT INTO "grid_transformation" VALUES('EPSG','9887','NAD83 to NAD83(CSRS)v2 (2)','Can be taken as an approximate transformation NAD83 to WGS 84 - see code 1697.','EPSG','9615','NTv2','EPSG','4269','EPSG','8237',1.5,'EPSG','8656','Latitude and longitude difference file','SK83-98.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'SK PMC-Can SK',0);
 INSERT INTO "usage" VALUES('EPSG','16979','grid_transformation','EPSG','9887','EPSG','2375','EPSG','1151');
+INSERT INTO "grid_transformation" VALUES('EPSG','9902','Baltic 1977 height to EVRF2019 height (1)','Determined at 154 points, SD 0.034m. Offset: mean 0.151m, minimum 0.079m, maximum 0.285m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5705','EPSG','9389',0.068,'EPSG','8732','Vertical offset file','ua_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Ukr 2019z 2021',0);
+INSERT INTO "usage" VALUES('EPSG','17066','grid_transformation','EPSG','9902','EPSG','3324','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9903','Baltic 1977 height to EVRF2019 mean-tide height (1)','Determined at 154 points, SD 0.032m. Offset: mean 0.131m, minimum 0.066m, maximum 0.268m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5705','EPSG','9390',0.064,'EPSG','8732','Vertical offset file','ua_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Ukr 2019m 2021',0);
+INSERT INTO "usage" VALUES('EPSG','17067','grid_transformation','EPSG','9903','EPSG','3324','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 v1 to NGF-IGN69 height (1)','May be used for transformations from WGS 84 to NGF-IGN69 height. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "usage" VALUES('EPSG','11001','grid_transformation','EPSG','10000','EPSG','1326','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF-IGN69 height (1)','Parameter values taken from RGF93 v1 to NGF-IGN69 height (1) (code 10000) assuming that RGF93 v1 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
-- 
cgit v1.2.3

