From 1f8541d6f43f7fde949772e0a2174e317542b985 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Tue, 25 Feb 2020 23:17:48 +0100
Subject: Database: update to EPSG v9.8.7

---
 data/sql/grid_transformation.sql | 1 +
 1 file changed, 1 insertion(+)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 5197cc9a..021a731a 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -368,6 +368,7 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9327','NTF to RGF93 (1)','May b
 INSERT INTO "grid_transformation" VALUES('EPSG','9328','NEA74 Noumea to RGNC91-93 (3)','Developed in July 2002 and officially adopted in August 2005. May be emulated using NTv2 method - see RGNC91-93 to NEA74 Noumea (4) (code 1295).','Accuracy 5-10cm.','EPSG','1087','Geocentric translation by Grid Interpolation (IGN)','EPSG','4644','EPSG','4749','EPSG','2823',0.05,'EPSG','8727','Geocentric translation file','gr3dnc03a.mnt',NULL,NULL,NULL,NULL,'EPSG','4749','BGN-Ncl 0.05m',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9329','IGN72 Grande Terre to RGNC91-93 (4)','Developed in July 2002 and officially adopted in August 2005. May be emulated using NTv2 method - see RGNC91-93 to IGN72 Grande Terre (6) (code 15962).','Accuracy better than +/- 0.1 metre.','EPSG','1087','Geocentric translation by Grid Interpolation (IGN)','EPSG','4662','EPSG','4749','EPSG','2822',0.1,'EPSG','8727','Geocentric translation file','gr3dnc01b.mnt',NULL,NULL,NULL,NULL,'EPSG','4749','BGN-Ncl 0.1m',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9330','IGN72 Grande Terre to RGNC91-93 (5)','Developed in July 2002 and officially adopted in August 2005.','Accuracy 5-10cm.','EPSG','1087','Geocentric translation by Grid Interpolation (IGN)','EPSG','4662','EPSG','4749','EPSG','2823',0.05,'EPSG','8727','Geocentric translation file','gr3dnc02b.mnt',NULL,NULL,NULL,NULL,'EPSG','4749','BGN-Ncl Noum 0.05m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9338','DHDN to ETRS89 (9)','Official transformation for the state of Baden-Württemberg. Used in ATKIS (Amtliches Topographisch-Kartographisches Informationssystem [Official Topographic and Cartographic Information System]).','Cadastre, engineering survey, topographic mapping (large scale).','EPSG','9615','NTv2','EPSG','4314','EPSG','4258','EPSG','4580',0.1,'EPSG','8656','Latitude and longitude difference file','BWTA2017.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'LGL-Deu BWTA2017',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 to NGF IGN69 height (1)','May be used for transformations from WGS 84 to NGF IGN69. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720','EPSG','1326',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF IGN69 height (1)','Parameter values taken from RGF93 to NGF IGN69 (1) (code 10000) assuming that RGF93 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720','EPSG','1326',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10002','RGF93 to IGN78 Corsica height (1)','May be used for transformations from WGS 84 to IGN78 Corsica. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5721','EPSG','1327',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a_corse.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra Cor',0);
-- 
cgit v1.2.3

