From 0476db2b05b9232b7c579901cf8a873ef34ae62f Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Wed, 18 Nov 2020 17:19:41 +0100
Subject: Database: update to EPSG v10.007

---
 data/sql/grid_transformation.sql | 10 +++++++++-
 1 file changed, 9 insertions(+), 1 deletion(-)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 80b310f8..5bd59179 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -277,7 +277,7 @@ INSERT INTO "usage" VALUES('EPSG','8673','grid_transformation','EPSG','1752','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','1803','AGD66 to GDA94 (11)','Replaces AGD66 to GDA94 variants 6, 7 and 10 (codes 1506 1507 1596). Input expects longitudes to be positive west; EPSG GeogCRS AGD66 (code 4202) and GDA94 (code 4283) both have longitudes positive east. May be used as tfm to WGS 84 - see code 15786.','EPSG','9615','NTv2','EPSG','4202','EPSG','4283',0.1,'EPSG','8656','Latitude and longitude difference file','A66 National (13.09.01).gsb',NULL,NULL,NULL,NULL,NULL,NULL,'ICSM-Aus 0.1m',0);
 INSERT INTO "usage" VALUES('EPSG','8724','grid_transformation','EPSG','1803','EPSG','2575','EPSG','1031');
 INSERT INTO "grid_transformation" VALUES('EPSG','1804','AGD84 to GDA94 (5)','Replaces AGD84 to GDA94 (4) (code 1593) which itself replaced variant 3 (code 1559). Input expects longitudes to be + west; EPSG GeogCRS AGD84 (code 4203) and GDA94 (code 4283) both have longitudes positive east. May be used as tfm to WGS 84 - see 15785','EPSG','9615','NTv2','EPSG','4203','EPSG','4283',0.1,'EPSG','8656','Latitude and longitude difference file','National 84 (02.07.01).gsb',NULL,NULL,NULL,NULL,NULL,NULL,'Auslig-Aus 0.1m',0);
-INSERT INTO "usage" VALUES('EPSG','8725','grid_transformation','EPSG','1804','EPSG','2576','EPSG','1031');
+INSERT INTO "usage" VALUES('EPSG','14199','grid_transformation','EPSG','1804','EPSG','2576','EPSG','1031');
 INSERT INTO "grid_transformation" VALUES('EPSG','1841','ATS77 to NAD83(CSRS) (1)','Introduced in 1999. Can be taken as an approximate transformation ATS77 to WGS 84 - see code 1688.','EPSG','9615','NTv2','EPSG','4122','EPSG','4617',1.5,'EPSG','8656','Latitude and longitude difference file','NB7783v2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'GIC-Can NB',1);
 INSERT INTO "usage" VALUES('EPSG','8762','grid_transformation','EPSG','1841','EPSG','1447','EPSG','1231');
 INSERT INTO "grid_transformation" VALUES('EPSG','1843','NAD83 to NAD83(CSRS) (1)','Uses NT method which expects longitudes positive west; EPSG GeogCRSs NAD83 (code 4269) and NAD83(CSRS) (code 4617) have longitudes positive east. Can be taken as an approximate transformation NAD83 to WGS 84 - see code 1696.','EPSG','9615','NTv2','EPSG','4269','EPSG','4617',1.5,'EPSG','8656','Latitude and longitude difference file','NAD83-98.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'SGQ-Can QC',1);
@@ -826,6 +826,14 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9466','GDA2020 to GDA2020 + AHD
 INSERT INTO "usage" VALUES('EPSG','14146','grid_transformation','EPSG','9466','EPSG','4493','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9467','GDA94 to GDA94 + AHD height (1)','Reversible alternative to GDA94 to AHD height (1) (code 5656). Uses AUSGeoid09 model which uses bi-cubic interpolation; bi-linear interpolation of the grid file will give results agreeing to within 1cm 99.97% of the time.','EPSG','1083','Geog3D to Geog2D+Vertical (AUSGeoid v2)','EPSG','4939','EPSG','9464',0.15,'EPSG','8666','Geoid (height correction) model file','AUSGeoid09_V1.01.gsb',NULL,NULL,NULL,NULL,'EPSG','4283','GA-Aus09',0);
 INSERT INTO "usage" VALUES('EPSG','14147','grid_transformation','EPSG','9467','EPSG','4493','EPSG','1133');
+INSERT INTO "grid_transformation" VALUES('EPSG','9483','Canada velocity grid v7','','EPSG','1070','Point motion by grid (Canada NTv2_Vel)','EPSG','8254','EPSG','8254',0.01,'EPSG','1050','Point motion velocity grid file','cvg70.cvb',NULL,NULL,NULL,NULL,NULL,NULL,'NRC-Can cvg7.0',0);
+INSERT INTO "usage" VALUES('EPSG','14214','grid_transformation','EPSG','9483','EPSG','1061','EPSG','1131');
+INSERT INTO "grid_transformation" VALUES('EPSG','9484','ETRS89 to NN54 height (1)','','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','4937','EPSG','5776',0.02,'EPSG','8666','Geoid (height correction) model file','href2008a.gtx',NULL,NULL,NULL,NULL,NULL,NULL,'SK-Nor 2008',0);
+INSERT INTO "usage" VALUES('EPSG','14215','grid_transformation','EPSG','9484','EPSG','1352','EPSG','1133');
+INSERT INTO "grid_transformation" VALUES('EPSG','9485','ETRS89 to NN2000 height (1)','','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','4937','EPSG','5941',0.02,'EPSG','8666','Geoid (height correction) model file','HREF2018B_NN2000_EUREF89.gtx',NULL,NULL,NULL,NULL,NULL,NULL,'SK-Nor 2018',0);
+INSERT INTO "usage" VALUES('EPSG','14216','grid_transformation','EPSG','9485','EPSG','1352','EPSG','1133');
+INSERT INTO "grid_transformation" VALUES('EPSG','9496','MGI 1901 to SRB-ETRS89 (9)','','EPSG','9615','NTv2','EPSG','3906','EPSG','8685',0.03,'EPSG','8656','Latitude and longitude difference file','MGI1901_TO_SRBETRS89_NTv2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'RGZ-Srb 0.1m 2020',0);
+INSERT INTO "usage" VALUES('EPSG','14226','grid_transformation','EPSG','9496','EPSG','4543','EPSG','1185');
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 to NGF-IGN69 height (1)','May be used for transformations from WGS 84 to NGF-IGN69 height. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "usage" VALUES('EPSG','11001','grid_transformation','EPSG','10000','EPSG','1326','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF-IGN69 height (1)','Parameter values taken from RGF93 to NGF-IGN69 height (1) (code 10000) assuming that RGF93 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
-- 
cgit v1.2.3

