From 4a89f16eff05689d985dd574f96f71af7f2b637f Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Wed, 16 Dec 2020 15:24:16 +0100
Subject: Database: update to EPSG v10.008

---
 data/sql/grid_transformation.sql | 110 ++++++++++++++++++++++++++++++++-------
 1 file changed, 91 insertions(+), 19 deletions(-)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 5bd59179..4c176837 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -323,7 +323,7 @@ INSERT INTO "usage" VALUES('EPSG','9347','grid_transformation','EPSG','5334','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','5335','ETRS89 to Malin Head height (1)','May be used for transformations from WGS 84 to Malin Head. Replaced by ETRS89 to Malin Head height (2) (code 7959).','EPSG','1045','Geographic3D to GravityRelatedHeight (OSGM02-Ire)','EPSG','4937','EPSG','5731',0.04,'EPSG','8666','Geoid (height correction) model file','OSGM02_RoI.txt',NULL,NULL,NULL,NULL,NULL,NULL,'OS-Ire',0);
 INSERT INTO "usage" VALUES('EPSG','9348','grid_transformation','EPSG','5335','EPSG','1305','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','5338','OSGB 1936 to ETRS89 (1)','Approximate alternative to official OSTN02 method (tfm code 7952). Accuracy at 2000 test points compared to OSTN02 (tfm code 1039): latitude 0.5mm av, 17mm max; longitude 0.8mm av, 23mm max. May be taken as approximate CT to WGS 84 - see code 5339.','EPSG','9615','NTv2','EPSG','4277','EPSG','4258',0.03,'EPSG','8656','Latitude and longitude difference file','OSTN02_NTv2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OSGB-UK Gbr02 NT',0);
-INSERT INTO "usage" VALUES('EPSG','9349','grid_transformation','EPSG','5338','EPSG','1264','EPSG','1033');
+INSERT INTO "usage" VALUES('EPSG','9349','grid_transformation','EPSG','5338','EPSG','1264','EPSG','1273');
 INSERT INTO "grid_transformation" VALUES('EPSG','5339','OSGB 1936 to WGS 84 (7)','Parameter values taken from OSGB 1936 to ETRS89 (1) (tfm code 5338) assuming that ETRS89 is coincident with WGS 84 within the accuracy of the tfm. Within accuracy of the tfm equivalent to OSGB 1936 / British National Grid to WGS 84 (2) (tfm code 15956).','EPSG','9615','NTv2','EPSG','4277','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','OSTN02_NTv2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-UK Gbr02 NT',0);
 INSERT INTO "usage" VALUES('EPSG','9350','grid_transformation','EPSG','5339','EPSG','1264','EPSG','1041');
 INSERT INTO "grid_transformation" VALUES('EPSG','5409','NGVD29 height to NAVD88 height (1)','Interpolation within the gridded data file may be made using any of the horizontal CRSs NAD27, NAD83 or NAD83(HARN).','EPSG','9658','Vertical Offset by Grid Interpolation (VERTCON)','EPSG','5702','EPSG','5703',0.02,'EPSG','8732','Vertical offset file','vertconw.94',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US Conus W',1);
@@ -425,7 +425,7 @@ INSERT INTO "usage" VALUES('EPSG','10205','grid_transformation','EPSG','7673','E
 INSERT INTO "grid_transformation" VALUES('EPSG','7674','CH1903 to ETRS89 (2)','Replaces tfm code 1646. Equivalent to concatenation of transformations 15486 and 1647 to within 2cm. Also used as transformation between CH1903 and CHTRF95 (see code 7673). May be used as approximate tfm CH1903 to WGS 84 - see code 7788.','EPSG','9615','NTv2','EPSG','4149','EPSG','4258',0.25,'EPSG','8656','Latitude and longitude difference file','CHENyx06_ETRS.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'BfL-Che NTv2',0);
 INSERT INTO "usage" VALUES('EPSG','10206','grid_transformation','EPSG','7674','EPSG','1286','EPSG','1083');
 INSERT INTO "grid_transformation" VALUES('EPSG','7709','OSGB 1936 to ETRS89 (2)','Approximate alternative to official OSTN15 method (tfm code 7953). May be taken as approximate transformation OSGB 1936 to WGS 84 - see code 7710. Replaces OSGB 1936 to ETRS89 (1) (tfm code 5338).','EPSG','9615','NTv2','EPSG','4277','EPSG','4258',0.03,'EPSG','8656','Latitude and longitude difference file','OSTN15_NTv2_OSGBtoETRS.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OSGB-UK Gbr15 NT',0);
-INSERT INTO "usage" VALUES('EPSG','10222','grid_transformation','EPSG','7709','EPSG','4390','EPSG','1133');
+INSERT INTO "usage" VALUES('EPSG','10222','grid_transformation','EPSG','7709','EPSG','4390','EPSG','1273');
 INSERT INTO "grid_transformation" VALUES('EPSG','7710','OSGB 1936 to WGS 84 (9)','Parameter values taken from OSGB 1936 to ETRS89 (3) (tfm code 7709) assuming that ETRS89 is coincident with WGS 84 within the accuracy of the tfm. Replaces OSGB 1936 to WGS 84 (7) (tfm code 5339).','EPSG','9615','NTv2','EPSG','4277','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','OSTN15_NTv2_OSGBtoETRS.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-UK Gbr15 NT',0);
 INSERT INTO "usage" VALUES('EPSG','10223','grid_transformation','EPSG','7710','EPSG','4390','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','7711','ETRS89 to ODN height (2)','OSGM15 supersedes OSGM02 geoid model. Replaces ETRS89 to Newlyn height (1) (tfm code 10021).','EPSG','9663','Geographic3D to GravityRelatedHeight (OSGM-GB)','EPSG','4937','EPSG','5701',0.008,'EPSG','8666','Geoid (height correction) model file','OSTN15_OSGM15_GB.txt',NULL,NULL,NULL,NULL,NULL,NULL,'OS-UK Gbr 2015',0);
@@ -670,8 +670,8 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9239','NAD27 to NAD83(CSRS)v2 (
 INSERT INTO "usage" VALUES('EPSG','13884','grid_transformation','EPSG','9239','EPSG','1368','EPSG','1151');
 INSERT INTO "grid_transformation" VALUES('EPSG','9240','NAD27(CGQ77) to NAD83(CSRS)v2 (1)','Uses NT method which expects longitudes positive west; EPSG GeogCRSs NAD27(CGQ77) (code 4609) and NAD83(CSRS) (code 4617) have longitudes positive east. Can be taken as an approximate transformation NAD27(CGQ77) to WGS 84 - see code 1691.','EPSG','9615','NTv2','EPSG','4609','EPSG','8237',1.5,'EPSG','8656','Latitude and longitude difference file','CGQ77-98.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'SGQ-Can QC',0);
 INSERT INTO "usage" VALUES('EPSG','13885','grid_transformation','EPSG','9240','EPSG','1368','EPSG','1151');
-INSERT INTO "grid_transformation" VALUES('EPSG','9241','NAD83 to NAD83(CSRS)v2 (1)','Uses NT method which expects longitudes positive west; EPSG GeogCRSs NAD83 (code 4269) and NAD83(CSRS) (code 4617) have longitudes positive east. Can be taken as an approximate transformation NAD83 to WGS 84 - see code 1696.','EPSG','9615','NTv2','EPSG','4269','EPSG','8237',1.5,'EPSG','8656','Latitude and longitude difference file','NAD83-98.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'SGQ-Can QC',0);
-INSERT INTO "usage" VALUES('EPSG','13886','grid_transformation','EPSG','9241','EPSG','1368','EPSG','1151');
+INSERT INTO "grid_transformation" VALUES('EPSG','9241','NAD83 to NAD83(CSRS)v2 (1)','Uses NT method which expects longitudes positive west; EPSG GeogCRSs NAD83 (code 4269) and NAD83(CSRS)v2 (code 8237) have longitudes positive east. Can be taken as an approximate transformation NAD83 to WGS 84 - see code 1696.','EPSG','9615','NTv2','EPSG','4269','EPSG','8237',1.5,'EPSG','8656','Latitude and longitude difference file','NAD83-98.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'SGQ-Can QC',0);
+INSERT INTO "usage" VALUES('EPSG','14556','grid_transformation','EPSG','9241','EPSG','1368','EPSG','1151');
 INSERT INTO "grid_transformation" VALUES('EPSG','9242','NAD27 to NAD83(CSRS)v3 (2)','Can be taken as an approximate transformation NAD27 to WGS 84 - see code 1703.','EPSG','9615','NTv2','EPSG','4267','EPSG','8240',1.5,'EPSG','8656','Latitude and longitude difference file','SK27-98.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'SK PMC-Can SK',0);
 INSERT INTO "usage" VALUES('EPSG','13887','grid_transformation','EPSG','9242','EPSG','2375','EPSG','1151');
 INSERT INTO "grid_transformation" VALUES('EPSG','9243','NAD83 to NAD83(CSRS)v3 (2)','Can be taken as an approximate transformation NAD83 to WGS 84 - see code 1697.','EPSG','9615','NTv2','EPSG','4269','EPSG','8240',1.5,'EPSG','8656','Latitude and longitude difference file','SK83-98.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'SK PMC-Can SK',0);
@@ -786,35 +786,35 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9420','REGCAN95 to La Palma hei
 INSERT INTO "usage" VALUES('EPSG','14076','grid_transformation','EPSG','9420','EPSG','4596','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9421','REGCAN95 to El Hierro height (1)','','EPSG','1025','Geographic3D to GravityRelatedHeight (EGM2008)','EPSG','4080','EPSG','9401',0.05,'EPSG','8666','Geoid (height correction) model file','EGM08_REDNAP_Canarias.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN-Esp 2008',0);
 INSERT INTO "usage" VALUES('EPSG','14077','grid_transformation','EPSG','9421','EPSG','4597','EPSG','1133');
-INSERT INTO "grid_transformation" VALUES('EPSG','9431','GHA height to EVRF2019 height (1)','Determined at 147 points, SD 0.060m. Offset: mean -0.306m, minimum -0.442m, maximum -0.219m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5778','EPSG','9389',0.12,'EPSG','8732','Vertical offset file','at_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Aut 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9431','GHA height to EVRF2019 height (1)','Determined at 147 points, SD 0.060m. Offset: mean -0.306m, minimum -0.442m, maximum -0.219m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5778','EPSG','9389',0.12,'EPSG','8732','Vertical offset file','at_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Aut 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14089','grid_transformation','EPSG','9431','EPSG','1037','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9432','GHA height to EVRF2019 mean-tide height (1)','Determined at 147 points, SD 0.058m. Offset: mean -0.330m, minimum -0.463m, maximum -0.245m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5778','EPSG','9390',0.116,'EPSG','8732','Vertical offset file','at_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Aut 2019m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9432','GHA height to EVRF2019 mean-tide height (1)','Determined at 147 points, SD 0.058m. Offset: mean -0.330m, minimum -0.463m, maximum -0.245m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5778','EPSG','9390',0.116,'EPSG','8732','Vertical offset file','at_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Aut 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14090','grid_transformation','EPSG','9432','EPSG','1037','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9433','Ostend height to EVRF2019 mean-tide height (1)','Determined at 39 points, SD 0.016m. Offset: mean -2.323m, minimum -2.372m, maximum -2.290m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5710','EPSG','9390',0.032,'EPSG','8732','Vertical offset file','be_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bel 2019m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9433','Ostend height to EVRF2019 mean-tide height (1)','Determined at 39 points, SD 0.016m. Offset: mean -2.323m, minimum -2.372m, maximum -2.290m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5710','EPSG','9390',0.032,'EPSG','8732','Vertical offset file','be_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bel 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14091','grid_transformation','EPSG','9433','EPSG','1347','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9434','Ostend height to EVRF2019 height (1)','Determined at 39 points, SD 0.017m. Offset: mean -2.315m, minimum -2.364m, maximum -2.279m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5710','EPSG','9389',0.034,'EPSG','8732','Vertical offset file','be_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bel 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9434','Ostend height to EVRF2019 height (1)','Determined at 39 points, SD 0.017m. Offset: mean -2.315m, minimum -2.364m, maximum -2.279m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5710','EPSG','9389',0.034,'EPSG','8732','Vertical offset file','be_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bel 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14092','grid_transformation','EPSG','9434','EPSG','1347','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9435','DHHN2016 height to EVRF2019 height (1)','Determined at 802 points, SD 0.010m. Offset: mean 0.013m, minimum -0.008m, maximum 0.039m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7837','EPSG','9389',0.02,'EPSG','8732','Vertical offset file','de_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Deu 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9435','DHHN2016 height to EVRF2019 height (1)','Determined at 802 points, SD 0.010m. Offset: mean 0.013m, minimum -0.008m, maximum 0.039m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7837','EPSG','9389',0.02,'EPSG','8732','Vertical offset file','de_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Deu 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14093','grid_transformation','EPSG','9435','EPSG','3339','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9436','DHHN2016 height to EVRF2019 mean-tide height (1)','Determined at 802 points, SD 0.003m. Offset: mean 0.007m, minimum -0.004m, maximum 0.018m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7837','EPSG','9390',0.006,'EPSG','8732','Vertical offset file','de_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Deu 2019m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9436','DHHN2016 height to EVRF2019 mean-tide height (1)','Determined at 802 points, SD 0.003m. Offset: mean 0.007m, minimum -0.004m, maximum 0.018m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7837','EPSG','9390',0.006,'EPSG','8732','Vertical offset file','de_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Deu 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14094','grid_transformation','EPSG','9436','EPSG','3339','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9437','Trieste height to EVRF2019 height (1)','Determined at 46 points, SD 0.016m. Offset: mean -0.548m, minimum -0.595m, maximum -0.500m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9389',0.032,'EPSG','8732','Vertical offset file','mk_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Mkd 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9437','Trieste height to EVRF2019 height (1)','Determined at 46 points, SD 0.016m. Offset: mean -0.548m, minimum -0.595m, maximum -0.500m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9389',0.032,'EPSG','8732','Vertical offset file','mk_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Mkd 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14095','grid_transformation','EPSG','9437','EPSG','1148','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9438','Trieste height to EVRF2019 mean-tide height (1)','Determined at 46 points, SD 0.015m. Offset: mean -0.604m, minimum -0.650m, maximum -0.558m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9390',0.03,'EPSG','8732','Vertical offset file','mk_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Mkd 2019m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9438','Trieste height to EVRF2019 mean-tide height (1)','Determined at 46 points, SD 0.015m. Offset: mean -0.604m, minimum -0.650m, maximum -0.558m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9390',0.03,'EPSG','8732','Vertical offset file','mk_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Mkd 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14096','grid_transformation','EPSG','9438','EPSG','1148','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9439','Cascais height to EVRF2019 height (1)','Determined at 18 points, SD 0.010m. Offset: mean -0.277m, minimum -0.323m, maximum -0.264m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5780','EPSG','9389',0.02,'EPSG','8732','Vertical offset file','pt_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Prt 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9439','Cascais height to EVRF2019 height (1)','Determined at 18 points, SD 0.010m. Offset: mean -0.277m, minimum -0.323m, maximum -0.264m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5780','EPSG','9389',0.02,'EPSG','8732','Vertical offset file','pt_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Prt 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14097','grid_transformation','EPSG','9439','EPSG','1294','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9440','Cascais height to EVRF2019 mean-tide height (1)','Determined at 18 points, SD 0.007m. Offset: mean -0.343m, minimum -0.383m, maximum -0.332m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5780','EPSG','9390',0.014,'EPSG','8732','Vertical offset file','pt_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Prt 2019m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9440','Cascais height to EVRF2019 mean-tide height (1)','Determined at 18 points, SD 0.007m. Offset: mean -0.343m, minimum -0.383m, maximum -0.332m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5780','EPSG','9390',0.014,'EPSG','8732','Vertical offset file','pt_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Prt 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14098','grid_transformation','EPSG','9440','EPSG','1294','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9441','SVS2010 height to EVRF2019 height (1)','Determined at 66 points, SD 0.003m. Offset: mean -0.258m, minimum -0.264m, maximum -0.250m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','8690','EPSG','9389',0.006,'EPSG','8732','Vertical offset file','si_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Svn 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9441','SVS2010 height to EVRF2019 height (1)','Determined at 66 points, SD 0.003m. Offset: mean -0.258m, minimum -0.264m, maximum -0.250m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','8690','EPSG','9389',0.006,'EPSG','8732','Vertical offset file','si_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Svn 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14099','grid_transformation','EPSG','9441','EPSG','3307','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9442','SVS2010 height to EVRF2019 mean-tide height (1)','Determined at 66 points, SD 0.004m. Offset: mean -0.290m, minimum -0.295m, maximum -0.280m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','8690','EPSG','9390',0.008,'EPSG','8732','Vertical offset file','si_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Svn 2019m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9442','SVS2010 height to EVRF2019 mean-tide height (1)','Determined at 66 points, SD 0.004m. Offset: mean -0.290m, minimum -0.295m, maximum -0.280m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','8690','EPSG','9390',0.008,'EPSG','8732','Vertical offset file','si_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Svn 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14100','grid_transformation','EPSG','9442','EPSG','3307','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9443','LHN95 height to EVRF2019 height (1)','Determined at 553 points, SD 0.075m. Offset: mean -0.204m, minimum -0.330m, maximum -0.130m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5729','EPSG','9389',0.15,'EPSG','8732','Vertical offset file','ch_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Che 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9443','LHN95 height to EVRF2019 height (1)','Determined at 553 points, SD 0.075m. Offset: mean -0.204m, minimum -0.330m, maximum -0.130m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5729','EPSG','9389',0.15,'EPSG','8732','Vertical offset file','ch_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Che 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14101','grid_transformation','EPSG','9443','EPSG','1286','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9444','LHN95 height to EVRF2019 mean-tide height (1)','Determined at 553 points, SD 0.073m. Offset: mean -0.233m, minimum -0.353m, maximum -0.044m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5729','EPSG','9390',0.146,'EPSG','8732','Vertical offset file','ch_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Che 2019m',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9444','LHN95 height to EVRF2019 mean-tide height (1)','Determined at 553 points, SD 0.073m. Offset: mean -0.233m, minimum -0.353m, maximum -0.044m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5729','EPSG','9390',0.146,'EPSG','8732','Vertical offset file','ch_2019_m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Che 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14102','grid_transformation','EPSG','9444','EPSG','1286','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9445','ODN height to EVRF2019 height (1)','Determined at 35 points, SD 0.011m. Offset: mean -0.181m, minimum -0.202m, maximum -0.161m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5701','EPSG','9389',0.022,'EPSG','8732','Vertical offset file','gb_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Gbr 2019z',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9445','ODN height to EVRF2019 height (1)','Determined at 35 points, SD 0.011m. Offset: mean -0.181m, minimum -0.202m, maximum -0.161m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5701','EPSG','9389',0.022,'EPSG','8732','Vertical offset file','gb_2019_z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Gbr 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14103','grid_transformation','EPSG','9445','EPSG','2792','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','9454','ETRS89 to GBK19-IRF (1)','In conjunction with the GBK19-TM map projection (code 9455) applied to GBK19-IRF (code 9453), emulates the GBK19 Snake projection. Applied to ETRS89 (as realized through the OSNet v2009 CORS) defines GBK19-IRF hence is errorless.','EPSG','9615','NTv2','EPSG','4258','EPSG','9453',0.0,'EPSG','8656','Latitude and longitude difference file','TN15-ETRS89-to-GBK19-IRF.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'NR-Gbr GBK19 OSNet2009',0);
 INSERT INTO "usage" VALUES('EPSG','14129','grid_transformation','EPSG','9454','EPSG','4607','EPSG','1141');
@@ -834,6 +834,78 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9485','ETRS89 to NN2000 height
 INSERT INTO "usage" VALUES('EPSG','14216','grid_transformation','EPSG','9485','EPSG','1352','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9496','MGI 1901 to SRB-ETRS89 (9)','','EPSG','9615','NTv2','EPSG','3906','EPSG','8685',0.03,'EPSG','8656','Latitude and longitude difference file','MGI1901_TO_SRBETRS89_NTv2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'RGZ-Srb 0.1m 2020',0);
 INSERT INTO "usage" VALUES('EPSG','14226','grid_transformation','EPSG','9496','EPSG','4543','EPSG','1185');
+INSERT INTO "grid_transformation" VALUES('EPSG','9550','NAD83 to NAD83(CSRS)v6 (10)','File NLCSRSV4A.GSB corrects error in file header record previously released as NLCSRSV4.GSB. No change to gridded data.','EPSG','9615','NTv2','EPSG','4269','EPSG','8252',0.1,'EPSG','8656','Latitude and longitude difference file','NLCSRSV4A.GSB ',NULL,NULL,NULL,NULL,NULL,NULL,'CGS-Can Nfl island',0);
+INSERT INTO "usage" VALUES('EPSG','14831','grid_transformation','EPSG','9550','EPSG','4612','EPSG','1026');
+INSERT INTO "grid_transformation" VALUES('EPSG','9553','Cascais height to EVRF2019 height (2)','Determined at 18 points, SD 0.014m. Offset: mean -0.275m, minimum -0.322m, maximum -0.262m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5780','EPSG','9389',0.028,'EPSG','8732','Vertical offset file','pt_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Prt 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14842','grid_transformation','EPSG','9553','EPSG','1294','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9554','Cascais height to EVRF2019 mean-tide height (2)','Determined at 18 points, SD 0.012m. Offset: mean -0.340m, minimum -0.383m, maximum -0.324m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5780','EPSG','9390',0.024,'EPSG','8732','Vertical offset file','pt_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Prt 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14671','grid_transformation','EPSG','9554','EPSG','1294','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9555','DHHN2016 height to EVRF2019 height (2)','Determined at 802 points, SD 0.010m. Offset: mean 0.016m, minimum -0.004m, maximum 0.052m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7837','EPSG','9389',0.02,'EPSG','8732','Vertical offset file','de_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Deu 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14672','grid_transformation','EPSG','9555','EPSG','3339','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9556','DHHN2016 height to EVRF2019 mean-tide height (2)','Determined at 802 points, SD 0.004m. Offset: mean 0.009m, minimum -0.011m, maximum 0.028m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7837','EPSG','9390',0.008,'EPSG','8732','Vertical offset file','de_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Deu 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14843','grid_transformation','EPSG','9556','EPSG','3339','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9557','GHA height to EVRF2019 height (2)','Determined at 150 points, SD 0.068m. Offset: mean -0.309m, minimum -0.450m, maximum -0.210m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5778','EPSG','9389',0.136,'EPSG','8732','Vertical offset file','at_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Aut 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14673','grid_transformation','EPSG','9557','EPSG','1037','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9558','GHA height to EVRF2019 mean-tide height (2)','Determined at 150 points, SD 0.065m. Offset: mean -0.333m, minimum -0.471m, maximum -0.236m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5778','EPSG','9390',0.13,'EPSG','8732','Vertical offset file','at_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Aut 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14674','grid_transformation','EPSG','9558','EPSG','1037','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9559','LHN95 height to EVRF2019 height (2)','Determined at 553 points, SD 0.073m. Offset: mean -0.216m, minimum -0.478m, maximum -0.021m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5729','EPSG','9389',0.146,'EPSG','8732','Vertical offset file','ch_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Che 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14675','grid_transformation','EPSG','9559','EPSG','1286','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9560','LHN95 height to EVRF2019 mean-tide height (2)','Determined at 553 points, SD 0.071m. Offset: mean -0.244m, minimum -0.506m, maximum -0.012m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5729','EPSG','9390',0.142,'EPSG','8732','Vertical offset file','ch_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Che 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14676','grid_transformation','EPSG','9560','EPSG','1286','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9561','ODN height to EVRF2019 height (2)','Determined at 35 points, SD 0.012m. Offset: mean -0.178m, minimum -0.199m, maximum -0.159m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5701','EPSG','9389',0.024,'EPSG','8732','Vertical offset file','gb_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Gbr 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14677','grid_transformation','EPSG','9561','EPSG','2792','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9563','Ostend height to EVRF2019 height (2)','Determined at 39 points, SD 0.021m. Offset: mean -2.312m, minimum -2.362m, maximum -2.275m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5710','EPSG','9389',0.042,'EPSG','8732','Vertical offset file','be_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bel 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14678','grid_transformation','EPSG','9563','EPSG','1347','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9564','Ostend height to EVRF2019 mean-tide height (2)','Determined at 39 points, SD 0.020m. Offset: mean -2.320m, minimum -2.370m, maximum -2.285m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5710','EPSG','9390',0.04,'EPSG','8732','Vertical offset file','be_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bel 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14679','grid_transformation','EPSG','9564','EPSG','1347','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9565','SVS2010 height to EVRF2019 height (2)','Determined at 65 points, SD 0.003m. Offset: mean -0.259m, minimum -0.265m, maximum -0.251m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','8690','EPSG','9389',0.006,'EPSG','8732','Vertical offset file','si_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Svn 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14680','grid_transformation','EPSG','9565','EPSG','3307','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9566','SVS2010 height to EVRF2019 mean-tide height (2)','Determined at 65 points, SD 0.004m. Offset: mean -0.290m, minimum -0.295m, maximum -0.280m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','8690','EPSG','9390',0.008,'EPSG','8732','Vertical offset file','si_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Svn 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14681','grid_transformation','EPSG','9566','EPSG','3307','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9567','Trieste height to EVRF2019 height (2)','Determined at 46 points, SD 0.021m. Offset: mean -0.551m, minimum -0.606m, maximum -0.490m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9389',0.042,'EPSG','8732','Vertical offset file','mk_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Mkd 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14668','grid_transformation','EPSG','9567','EPSG','1148','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9568','Trieste height to EVRF2019 mean-tide height (2)','Determined at 46 points, SD 0.022m. Offset: mean -0.606m, minimum -0.662m, maximum -0.548m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9390',0.044,'EPSG','8732','Vertical offset file','mk_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Mkd 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14667','grid_transformation','EPSG','9568','EPSG','1148','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9569','Trieste height to EVRF2019 height (3)','Determined at 10 points, SD 0.006m. Offset: mean -0.336m, minimum -0.346m, maximum -0.326m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9389',0.012,'EPSG','8732','Vertical offset file','ba_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bih 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14666','grid_transformation','EPSG','9569','EPSG','1050','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9570','Trieste height to EVRF2019 mean-tide height (3)','Determined at 10 points, SD 0.005m. Offset: mean -0.377m, minimum -0.386m, maximum -0.368m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5195','EPSG','9390',0.01,'EPSG','8732','Vertical offset file','ba_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bih 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14665','grid_transformation','EPSG','9570','EPSG','1050','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9571','Baltic 1982 height to EVRF2019 height (1)','Determined at 58 points, SD 0.024m. Offset: mean 0.228m, minimum 0.167m, maximum 0.277m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5786','EPSG','9389',0.048,'EPSG','8732','Vertical offset file','bgalt_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bgr 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14628','grid_transformation','EPSG','9571','EPSG','3224','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9572','Baltic 1982 height to EVRF2019 mean-tide height (1)','Determined at 58 points, SD 0.021m. Offset: mean 0.180m, minimum 0.123m, maximum 0.228m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5786','EPSG','9390',0.042,'EPSG','8732','Vertical offset file','bgalt_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Bgr 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14781','grid_transformation','EPSG','9572','EPSG','3224','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9573','N2000 height to EVRF2019 height (1)','Determined at 191 points, SD 0.002m. Offset: mean 0.002m, minimum -0.005m, maximum 0.007m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','3900','EPSG','9389',0.004,'EPSG','8732','Vertical offset file','fi_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Fin 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14664','grid_transformation','EPSG','9573','EPSG','3333','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9574','N2000 height to EVRF2019 mean-tide height (1)','Determined at 191 points, SD 0.012m. Offset: mean 0.054m, minimum 0.034m, maximum 0.079m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','3900','EPSG','9390',0.024,'EPSG','8732','Vertical offset file','fi_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Fin 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14663','grid_transformation','EPSG','9574','EPSG','3333','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9575','NGF-IGN69 height to EVRF2019 height (1)','Determined at 1228 points, SD 0.054m. Offset: mean -0.539m, minimum -0.651m, maximum -0.380m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5720','EPSG','9389',0.108,'EPSG','8732','Vertical offset file','fr_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Fra 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14662','grid_transformation','EPSG','9575','EPSG','1326','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9576','NGF-IGN69 height to EVRF2019 mean-tide height (1)','Determined at 1228 points, SD 0.043m. Offset: mean -0.561m, minimum -0.658m, maximum -0.430m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5720','EPSG','9390',0.086,'EPSG','8732','Vertical offset file','fr_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Fra 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14682','grid_transformation','EPSG','9576','EPSG','1326','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9577','EOMA height 1980 to EVRF2019 height (1)','Determined at 35 points, SD 0.003m. Offset: mean 0.163m, minimum 0.156m, maximum 0.171m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5787','EPSG','9389',0.006,'EPSG','8732','Vertical offset file','hu_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Hun 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14844','grid_transformation','EPSG','9577','EPSG','1119','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9578','EOMA 1980 height to EVRF2019 mean-tide height (1)','Determined at 35 points, SD 0.005m. Offset: mean 0.138m, minimum 0.127m, maximum 0.149m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5787','EPSG','9390',0.01,'EPSG','8732','Vertical offset file','hu_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Hun 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14686','grid_transformation','EPSG','9578','EPSG','1119','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9579','Latvia 2000 height to EVRF2019 height (1)','Determined at 134 points, SD 0.003m. Offset: mean 0.009m, minimum 0.000m, maximum 0.019m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7700','EPSG','9389',0.006,'EPSG','8732','Vertical offset file','lv_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Lva 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14687','grid_transformation','EPSG','9579','EPSG','3268','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9580','Latvia 2000 height to EVRF2019 mean-tide height (1)','Determined at 134 points, SD 0.004m. Offset: mean 0.031m, minimum 0.025m, maximum 0.045m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','7700','EPSG','9390',0.008,'EPSG','8732','Vertical offset file','lv_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Lva 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14780','grid_transformation','EPSG','9580','EPSG','3268','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9581','NAP height to EVRF2019 height (1)','Determined at 1095 points, SD 0.008m. Offset: mean 0.021m, minimum 0.009m, maximum 0.055m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5709','EPSG','9389',0.016,'EPSG','8732','Vertical offset file','nl_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Nld 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14689','grid_transformation','EPSG','9581','EPSG','1275','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9582','NAP height to EVRF2019 mean-tide height (1)','Determined at 1095 points, SD 0.006m. Offset: mean 0.021m, minimum 0.008m, maximum 0.047m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5709','EPSG','9390',0.012,'EPSG','8732','Vertical offset file','nl_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Nld 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14779','grid_transformation','EPSG','9582','EPSG','1275','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9583','Constanta height to EVRF2019 height (1)','Determined at 96 points, SD 0.006m. Offset: mean 0.050m, minimum 0.029m, maximum 0.063m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5781','EPSG','9389',0.12,'EPSG','8732','Vertical offset file','ro_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Rou 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14693','grid_transformation','EPSG','9583','EPSG','3295','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9645','Constanta height to EVRF2019 mean-tide height (1)','Determined at 96 points, SD 0.010m. Offset: mean 0.015m, minimum -0.006m, maximum 0.040m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5781','EPSG','9390',0.02,'EPSG','8732','Vertical offset file','ro_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Rou 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14692','grid_transformation','EPSG','9645','EPSG','3295','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9646','Alicante height to EVRF2019 height (1)','Determined at 155 points, SD 0.041m. Offset: mean -0.427m, minimum -0.555m, maximum -0.355m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5782','EPSG','9389',0.082,'EPSG','8732','Vertical offset file','es_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Esp 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14696','grid_transformation','EPSG','9646','EPSG','2366','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9647','Alicante height to EVRF2019 mean-tide height (1)','Determined at 155 points, SD 0.039m. Offset: mean -0.488m, minimum -0.603m, maximum -0.426m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5782','EPSG','9390',0.078,'EPSG','8732','Vertical offset file','es_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Esp 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14854','grid_transformation','EPSG','9647','EPSG','2366','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9648','RH2000 height to EVRF2019 height (1)','Determined at 3356 points, SD 0.003m. Offset: mean -0.003m, minimum -0.014m, maximum 0.003m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5613','EPSG','9389',0.006,'EPSG','8732','Vertical offset file','se_2019z.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Swe 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14697','grid_transformation','EPSG','9648','EPSG','3313','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9649','RH2000 height to EVRF2019 mean-tide height (1)','Determined at 3356 points, SD 0.016m. Offset: mean 0.036m, minimum 0.003m, maximum 0.071m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5613','EPSG','9390',0.032,'EPSG','8732','Vertical offset file','se_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Swe 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14778','grid_transformation','EPSG','9649','EPSG','3313','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 to NGF-IGN69 height (1)','May be used for transformations from WGS 84 to NGF-IGN69 height. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "usage" VALUES('EPSG','11001','grid_transformation','EPSG','10000','EPSG','1326','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF-IGN69 height (1)','Parameter values taken from RGF93 to NGF-IGN69 height (1) (code 10000) assuming that RGF93 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
-- 
cgit v1.2.3

