From 0c487cda1ef70a89d8acefcfc0be658932a1e412 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Tue, 15 Oct 2019 21:05:36 +0200
Subject: Database: update to EPSG v9.8.3

Note: a hack has been added into customizations.sql to cancel deprecatation
of USA geoid2012 grids by geoid2018 grids, as the later are not yet available
in proj-datumgrid-northamerica (https://github.com/OSGeo/proj-datumgrid/issues/55)
---
 data/sql/grid_transformation.sql | 8 +++++++-
 1 file changed, 7 insertions(+), 1 deletion(-)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 222cce34..38d8ae0a 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -276,7 +276,7 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9114','NAD27 to NAD83(CSRS)v3 (
 INSERT INTO "grid_transformation" VALUES('EPSG','9115','NAD27 to NAD83(CSRS)v4 (10)','Derived through NAD83(CSRS)v4.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4267','EPSG','8246','EPSG','4535',1.5,'EPSG','8656','Latitude and longitude difference file','BC_27_05.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC mainland',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9116','NAD83 to NAD83(CSRS)v2 (6)','Derived through NAD83(CSRS)v2. Replaced by NAD83 to NAD83(CSRS) (7) (CT code 9117) for CRD, NAD83 to NAD83(CSRS) (8) (CT code 9118) for north Vancouver Island and NAD83 to NAD83(CSRS) (9) (CT code 9119) for mainland.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4269','EPSG','8237','EPSG','2832',0.1,'EPSG','8656','Latitude and longitude difference file','BC_93_98.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC CSRSv2',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9117','NAD83 to NAD83(CSRS)v3 (7)','Derived through NAD83(CSRS)v3.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4269','EPSG','8240','EPSG','4533',0.1,'EPSG','8656','Latitude and longitude difference file','CRD93_00.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC CRD',0);
-INSERT INTO "grid_transformation" VALUES('EPSG','9118','NAD27 to NAD83(CSRS)v3 (8)','Derived through NAD83(CSRS)v3.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4269','EPSG','8240','EPSG','4534',0.1,'EPSG','8656','Latitude and longitude difference file','NVI93_05.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC NVI',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9118','NAD83 to NAD83(CSRS)v3 (8)','Derived through NAD83(CSRS)v3.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4269','EPSG','8240','EPSG','4534',0.1,'EPSG','8656','Latitude and longitude difference file','NVI93_05.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC NVI',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9119','NAD83 to NAD83(CSRS)v4 (9)','Derived through NAD83(CSRS)v4.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4269','EPSG','8246','EPSG','4535',0.1,'EPSG','8656','Latitude and longitude difference file','BC_93_05.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC mainland',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9120','NAD83(CSRS)v2 to NAD83(CSRS)v3 (1)','','Spatial referencing.','EPSG','9615','NTv2','EPSG','8237','EPSG','8240','EPSG','4533',0.1,'EPSG','8656','Latitude and longitude difference file','CRD98_00.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC CRD',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9121','NAD83(CSRS)v2 to NAD83(CSRS)v3 (2)','','Spatial referencing.','EPSG','9615','NTv2','EPSG','8237','EPSG','8240','EPSG','4534',0.1,'EPSG','8656','Latitude and longitude difference file','NVI98_05.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC NVI',0);
@@ -310,6 +310,12 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9175','NAD83(NSRS2007) to PRVD0
 INSERT INTO "grid_transformation" VALUES('EPSG','9176','NAD83(NSRS2007) to VIVD09 height (1)','Uses Geoid09 hybrid model. Replaced by Geoid12 model (CT code 7647).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (US .gtx)','EPSG','4893','EPSG','6642','EPSG','3330',0.05,'EPSG','8666','Geoid (height correction) model file','g2009p01.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Vir 09',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9187','RGAF09 to IGN 1988 SB height (2)','Accuracy 0.05m to 0.1m. Replaces RGAF09 to IGN 1988 SB height (1), transformation code 5508.','Derivation of gravity-related heights from GPS observations.','EPSG','1073','Geographic3D to GravityRelatedHeight (IGN2009)','EPSG','5488','EPSG','5619','EPSG','2891',0.1,'EPSG','8666','Geoid (height correction) model file','gg10_sbv2.mnt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Glp StB',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9188','RGAF09 to IGN 1988 SM height (2)','Accuracy 0.05m to 0.1m. Replaces RGAF09 to IGN 1988 SM height (1), transformation code 5505.','Derivation of gravity-related heights from GPS observations.','EPSG','1073','Geographic3D to GravityRelatedHeight (IGN2009)','EPSG','5488','EPSG','5620','EPSG','2890',0.1,'EPSG','8666','Geoid (height correction) model file','gg10_smv2.mnt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Glp StM',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9228','RGSPM06 to Danger 1950 height (2)','Accuracy 0.01m to 0.05m within onshore area. Replaces RGSPM06 to Danger 1950 height (1), CT code 9137.','Derivation of gravity-related heights from GPS observations.','EPSG','1073','Geographic3D to GravityRelatedHeight (IGN2009)','EPSG','4466','EPSG','5792','EPSG','1220',0.05,'EPSG','8666','Geoid (height correction) model file','RASPM2018.mnt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN-SPM',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9229','NAD83(2011) to NAVD88 height (3)','Uses Geoid18 hybrid model. Replaces 12B model. See information source for further information.','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (US .gtx)','EPSG','6319','EPSG','5703','EPSG','1323',0.015,'EPSG','8666','Geoid (height correction) model file','g2018u0.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US Conus 18',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9230','NAD83(2011) to PRVD02 height (2)','Uses Geoid18 hybrid model. Replaces 12B model. See information source for further information.','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (US .gtx)','EPSG','6319','EPSG','6641','EPSG','3294',0.015,'EPSG','8666','Geoid (height correction) model file','g2018p0.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Pri 12B',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9231','NAD83(2011) to VIVD09 height (2)','Uses Geoid18 hybrid model. Replaces 12B model. See information source for further information.','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (US .gtx)','EPSG','6319','EPSG','6642','EPSG','3330',0.015,'EPSG','8666','Geoid (height correction) model file','g2018p0.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Vir 18',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9232','ISN93 to ISN2016 (1)','Grid transformation based on Kriging between ISN93 and ISN2016. Accuracy is better than 5 cm in stable areas but can be around 25 cm in areas that have suffered deformation due to earthquake or volcanic eruption.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4659','EPSG','8086','EPSG','1120',0.05,'EPSG','8656','Latitude and longitude difference file','ISN93_ISN2016.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'LMI-Isl',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9233','ISN2004 to ISN2016 (1)','Grid transformation based on Kriging between ISN2004 and ISN2016. Accuracy is better than 5 cm in stable areas but can be around 25 cm in areas that have suffered deformation due to earthquake or volcanic eruption.','Spatial referencing.','EPSG','9615','NTv2','EPSG','5324','EPSG','8086','EPSG','1120',0.05,'EPSG','8656','Latitude and longitude difference file','ISN2004_ISN2016.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'LMI-Isl',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 to NGF IGN69 height (1)','May be used for transformations from WGS 84 to NGF IGN69. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720','EPSG','1326',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF IGN69 height (1)','Parameter values taken from RGF93 to NGF IGN69 (1) (code 10000) assuming that RGF93 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720','EPSG','1326',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10002','RGF93 to IGN78 Corsica height (1)','May be used for transformations from WGS 84 to IGN78 Corsica. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5721','EPSG','1327',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a_corse.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra Cor',0);
-- 
cgit v1.2.3

