From 9e6dc013e9b2d3db82eaf5d9a3a57eaff2c027c5 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Sun, 13 Feb 2022 11:26:05 +0100
Subject: Database: update to EPSG v10.054

---
 data/sql/grid_transformation.sql | 6 ++++++
 1 file changed, 6 insertions(+)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index af3f9152..19c29798 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -1146,6 +1146,10 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9902','Baltic 1977 height to EV
 INSERT INTO "usage" VALUES('EPSG','17066','grid_transformation','EPSG','9902','EPSG','3324','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','9903','Baltic 1977 height to EVRF2019 mean-tide height (1)','Determined at 154 points, SD 0.032m. Offset: mean 0.131m, minimum 0.066m, maximum 0.268m.','EPSG','1085','Vertical Offset by Grid Interpolation (asc)','EPSG','5705','EPSG','9390',0.064,'EPSG','8732','Vertical offset file','ua_2019m.asc',NULL,NULL,NULL,NULL,'EPSG','4258','EuG-Ukr 2019m 2021',0);
 INSERT INTO "usage" VALUES('EPSG','17067','grid_transformation','EPSG','9903','EPSG','3324','EPSG','1059');
+INSERT INTO "grid_transformation" VALUES('EPSG','9908','ETRS89 to Ostend height (1)','Based on gravimetric quasi-geoid NLGEO2018 fitted to 3707 benchmarks of the Ostend height leveling network. SD of 1 cm. In use from 2018-08-01. For reversible alternative to this transformation see ETRS89 to ETRS89 + Ostend height (1) (code 9909).','EPSG','1082','Geographic3D to GravityRelatedHeight (txt)','EPSG','4937','EPSG','5710',0.02,'EPSG','8666','Geoid (height correction) model file','hBG18.dat',NULL,NULL,NULL,NULL,NULL,NULL,'NGI-Bel 2018',0);
+INSERT INTO "usage" VALUES('EPSG','17367','grid_transformation','EPSG','9908','EPSG','1347','EPSG','1133');
+INSERT INTO "grid_transformation" VALUES('EPSG','9909','ETRS89 to ETRS89 + Ostend height (1)','Reversible alternative to ETRS89 to Ostend height (1) (code 9908). In use from 2018-08-01.','EPSG','1098','Geog3D to Geog2D+GravityRelatedHeight (txt)','EPSG','4937','EPSG','9907',0.02,'EPSG','8666','Geoid (height correction) model file','hBG18.dat',NULL,NULL,NULL,NULL,'EPSG','4258','NGI-Bel 2018',0);
+INSERT INTO "usage" VALUES('EPSG','17373','grid_transformation','EPSG','9909','EPSG','1347','EPSG','1270');
 INSERT INTO "grid_transformation" VALUES('EPSG','9914','ETRS89 to BI height (1)','For reversible alternative to this transformation see ETRS89 to ETRS89 + BI height (1) (code 9915).','EPSG','9663','Geographic3D to GravityRelatedHeight (OSGM-GB)','EPSG','4937','EPSG','9451',0.02,'EPSG','8666','Geoid (height correction) model file','OSTN15_OSGM15_GB.txt',NULL,NULL,NULL,NULL,NULL,NULL,'OS-Gbr 2015',0);
 INSERT INTO "usage" VALUES('EPSG','17330','grid_transformation','EPSG','9914','EPSG','4390','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9915','ETRS89 to ETRS89 + BI height (1)','Reversible alternative to ETRS89 to BI height (1) (code 9914).','EPSG','1097','Geog3D to Geog2D+GravityRelatedHeight (OSGM-GB)','EPSG','4937','EPSG','9452',0.02,'EPSG','8666','Geoid (height correction) model file','OSTN15_OSGM15_GB.txt',NULL,NULL,NULL,NULL,'EPSG','4258','OS-Gbr 2015',0);
@@ -1166,6 +1170,8 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9926','ETRS89 to ETRS89 + DHHN2
 INSERT INTO "usage" VALUES('EPSG','17170','grid_transformation','EPSG','9926','EPSG','3339','EPSG','1270');
 INSERT INTO "grid_transformation" VALUES('EPSG','9940','DHDN to ETRS89 (11)','Official transformation of Hesse for the land survey register (ALKIS).','EPSG','9615','NTv2','EPSG','4314','EPSG','4258',0.1,'EPSG','8656','Latitude and longitude difference file','HeTa2010.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'LVGL-Deu HE 2010',0);
 INSERT INTO "usage" VALUES('EPSG','17340','grid_transformation','EPSG','9940','EPSG','4660','EPSG','1055');
+INSERT INTO "grid_transformation" VALUES('EPSG','9941','ETRS89 to EBBWV14-IRF (1)','In conjunction with EBBWV14-TM map projection (code 9942) applied to EBBWV14-IRF (code 9939), emulates the EBBWV14 Snake projection. Applied to ETRS89 (as realized through the OSNet v2009) defines EBBWV14-IRF hence is errorless.						','EPSG','9615','NTv2','EPSG','4258','EPSG','9939',0.0,'EPSG','8656','Latitude and longitude difference file','TN15-ETRS89-to-EBBWV14-IRF.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'NR-Gbr EBBWV14 OSNet2009',0);
+INSERT INTO "usage" VALUES('EPSG','17356','grid_transformation','EPSG','9941','EPSG','4661','EPSG','1141');
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 v1 to NGF-IGN69 height (1)','May be used for transformations from WGS 84 to NGF-IGN69 height. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "usage" VALUES('EPSG','11001','grid_transformation','EPSG','10000','EPSG','1326','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF-IGN69 height (1)','Parameter values taken from RGF93 v1 to NGF-IGN69 height (1) (code 10000) assuming that RGF93 v1 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
-- 
cgit v1.2.3

