From f1efc8a7e444c306a57acd53d8283586132b2c09 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Mon, 27 Sep 2021 17:14:23 +0200
Subject: Database: update to EPSG v10.036

---
 data/sql/grid_transformation.sql | 46 ++++++++++++++++++++++------------------
 1 file changed, 25 insertions(+), 21 deletions(-)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 6877aa5d..e4e6dbdd 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -3,7 +3,7 @@
 INSERT INTO "grid_transformation" VALUES('EPSG','1068','Guam 1963 to NAD83(HARN) (1)','NADCON method which expects longitudes positive west; EPSG GeogCRSs Guam 1963 and NAD83(HARN) (codes 4675 and 4152) have longitudes positive east. Can be used as approximation for tfm between Guam 1963 and WGS 84 - see tfm code 1069.','EPSG','9613','NADCON','EPSG','4675','EPSG','4152',5.0,'EPSG','8657','Latitude difference file','guhpgn.las','EPSG','8658','Longitude difference file','guhpgn.los',NULL,NULL,'NGS-Gum',0);
 INSERT INTO "usage" VALUES('EPSG','7989','grid_transformation','EPSG','1068','EPSG','3255','EPSG','1027');
 INSERT INTO "grid_transformation" VALUES('EPSG','1069','Guam 1963 to WGS 84 (2)','Parameter files are from Guam 1963 to NAD83(HARN) (1) (code 1068), but for many purposes NAD83(HARN) can be considered to be coincident with WGS 84 within the accuracy of the transformation.','EPSG','9613','NADCON','EPSG','4675','EPSG','4326',5.0,'EPSG','8657','Latitude difference file','guhpgn.las','EPSG','8658','Longitude difference file','guhpgn.los',NULL,NULL,'EPSG-Gum',0);
-INSERT INTO "usage" VALUES('EPSG','7990','grid_transformation','EPSG','1069','EPSG','3255','EPSG','1159');
+INSERT INTO "usage" VALUES('EPSG','7990','grid_transformation','EPSG','1069','EPSG','3255','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','1241','NAD27 to NAD83 (1)','Uses NADCON method which expects longitudes positive west; EPSG GeogCRS NAD27 (code 4267) and NAD83 (code 4269) have longitudes positive east.','EPSG','9613','NADCON','EPSG','4267','EPSG','4269',0.15,'EPSG','8657','Latitude difference file','conus.las','EPSG','8658','Longitude difference file','conus.los',NULL,NULL,'NGS-Usa Conus',0);
 INSERT INTO "usage" VALUES('EPSG','8162','grid_transformation','EPSG','1241','EPSG','2374','EPSG','1032');
 INSERT INTO "grid_transformation" VALUES('EPSG','1243','NAD27 to NAD83 (2)','Uses NADCON method which expects longitudes positive west; EPSG GeogCRS NAD27 (code 4267) and NAD83 (code 4269) have longitudes positive east. May be used as transformation to WGS 84 - see NAD27 to WGS 84 (85) (code 15864).','EPSG','9613','NADCON','EPSG','4267','EPSG','4269',0.5,'EPSG','8657','Latitude difference file','alaska.las','EPSG','8658','Longitude difference file','alaska.los',NULL,NULL,'NGS-Usa AK',0);
@@ -149,9 +149,9 @@ INSERT INTO "usage" VALUES('EPSG','8523','grid_transformation','EPSG','1602','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','1670','NZGD49 to WGS 84 (3)','Parameter file is from NZGD49 to NZGD2000 (3) (code 1568) and assumes WGS 84 is coincident with NZGD2000 to the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4272','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','nzgd2kgrid0005.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Nzl 1m',0);
 INSERT INTO "usage" VALUES('EPSG','8591','grid_transformation','EPSG','1670','EPSG','3285','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','1688','ATS77 to WGS 84 (1)','Parameter file is from ATS77 to NAD83(CSRS)v2 (1) (code 9237) assuming that NAD83(CSRS)v2 is equivalent to WGS 84 within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4122','EPSG','4326',1.5,'EPSG','8656','Latitude and longitude difference file','NB7783v2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Can NB',0);
-INSERT INTO "usage" VALUES('EPSG','8609','grid_transformation','EPSG','1688','EPSG','1447','EPSG','1151');
+INSERT INTO "usage" VALUES('EPSG','8609','grid_transformation','EPSG','1688','EPSG','1447','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','1689','ATS77 to WGS 84 (2)','Parameter file is from ATS77 to NAD83(CSRS)v2 (2) (code 9236) assuming that NAD83(CSRS)v2 is equivalent to WGS 84 within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4122','EPSG','4326',1.5,'EPSG','8656','Latitude and longitude difference file','PE7783V2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Can PEI',0);
-INSERT INTO "usage" VALUES('EPSG','8610','grid_transformation','EPSG','1689','EPSG','1533','EPSG','1151');
+INSERT INTO "usage" VALUES('EPSG','8610','grid_transformation','EPSG','1689','EPSG','1533','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','1690','NAD27(76) to WGS 84 (1)','Parameter file is from NAD27(76) to NAD83 (1) (code 1463) assuming that NAD83 is equivalent to WGS 84 within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4608','EPSG','4326',2.0,'EPSG','8656','Latitude and longitude difference file','May76v20.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Can On',0);
 INSERT INTO "usage" VALUES('EPSG','8611','grid_transformation','EPSG','1690','EPSG','1367','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','1691','NAD27(CGQ77) to WGS 84 (3)','Parameter file is from NAD27(CGQ77) to NAD83(CSRS)v2 (1) (code 9240) assuming that NAD83(CSRS)v2 is equivalent to WGS 84 within the accuracy of the transformation. Also distributed with file name CGQ77-98.gsb.','EPSG','9615','NTv2','EPSG','4609','EPSG','4326',1.5,'EPSG','8656','Latitude and longitude difference file','CQ77NA83.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Can Qc NT2',0);
@@ -297,7 +297,7 @@ INSERT INTO "usage" VALUES('EPSG','8770','grid_transformation','EPSG','1849','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','1850','ATS77 to NAD83(CSRS) (3)','Can be taken as an approximate transformation ATS77 to WGS 84 - see code 1851.','EPSG','9615','NTv2','EPSG','4122','EPSG','4617',1.5,'EPSG','8656','Latitude and longitude difference file','NS778301.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'NSGC-Can NS',1);
 INSERT INTO "usage" VALUES('EPSG','8771','grid_transformation','EPSG','1850','EPSG','2313','EPSG','1151');
 INSERT INTO "grid_transformation" VALUES('EPSG','1851','ATS77 to WGS 84 (3)','Parameter file is from ATS77 to NAD83(CSRS)v3 (3) (code 9235) assuming that NAD83(CSRS)v3 is equivalent to WGS 84 within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4122','EPSG','4326',1.5,'EPSG','8656','Latitude and longitude difference file','NS778301.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Can NS',0);
-INSERT INTO "usage" VALUES('EPSG','8772','grid_transformation','EPSG','1851','EPSG','2313','EPSG','1151');
+INSERT INTO "usage" VALUES('EPSG','8772','grid_transformation','EPSG','1851','EPSG','2313','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','3858','WGS 84 to EGM2008 height (1)','Replaces WGS 84 to EGM96 height (1) (CT code 15781). Grid spacing is 2.5 arc-minutes. For smaller spacing (in principle more exact) see CT code 3859. For reversible alternative see CT code 9704. An executable using spherical harmonics is also available.','EPSG','1025','Geographic3D to GravityRelatedHeight (EGM2008)','EPSG','4979','EPSG','3855',1.0,'EPSG','8666','Geoid (height correction) model file','Und_min2.5x2.5_egm2008_isw=82_WGS84_TideFree.gz',NULL,NULL,NULL,NULL,NULL,NULL,'NGA-World',0);
 INSERT INTO "usage" VALUES('EPSG','8948','grid_transformation','EPSG','3858','EPSG','1262','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','3859','WGS 84 to EGM2008 height (2)','Replaces WGS 84 to EGM96 height (1) (CT code 15781). Grid spacing is 1 arc-minute. For a larger grid spacing (in principle less exact) see CT code 3858. For reversible alternative see CT code 9618. An executable using spherical harmonics is available.','EPSG','1025','Geographic3D to GravityRelatedHeight (EGM2008)','EPSG','4979','EPSG','3855',0.5,'EPSG','8666','Geoid (height correction) model file','Und_min1x1_egm2008_isw=82_WGS84_TideFree.gz',NULL,NULL,NULL,NULL,NULL,NULL,'NGA-World',0);
@@ -325,7 +325,7 @@ INSERT INTO "usage" VALUES('EPSG','9348','grid_transformation','EPSG','5335','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','5338','OSGB36 to ETRS89 (1)','Approximate alternative to official OSTN02 method (tfm code 7952). Accuracy at 2000 test points compared to OSTN02 (tfm code 1039): latitude 0.5mm av, 17mm max; longitude 0.8mm av, 23mm max. May be taken as approximate CT to WGS 84 - see code 5339.','EPSG','9615','NTv2','EPSG','4277','EPSG','4258',0.03,'EPSG','8656','Latitude and longitude difference file','OSTN02_NTv2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OSGB-UK Gbr02 NT',0);
 INSERT INTO "usage" VALUES('EPSG','9349','grid_transformation','EPSG','5338','EPSG','4616','EPSG','1273');
 INSERT INTO "grid_transformation" VALUES('EPSG','5339','OSGB36 to WGS 84 (7)','Parameter values taken from OSGB36 to ETRS89 (1) (tfm code 5338) assuming that ETRS89 is coincident with WGS 84 within the accuracy of the tfm.','EPSG','9615','NTv2','EPSG','4277','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','OSTN02_NTv2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-UK Gbr02 NT',0);
-INSERT INTO "usage" VALUES('EPSG','9350','grid_transformation','EPSG','5339','EPSG','4616','EPSG','1041');
+INSERT INTO "usage" VALUES('EPSG','9350','grid_transformation','EPSG','5339','EPSG','4616','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','5409','NGVD29 height to NAVD88 height (1)','Interpolation within the gridded data file may be made using any of the horizontal CRSs NAD27, NAD83 or NAD83(HARN).','EPSG','9658','Vertical Offset by Grid Interpolation (VERTCON)','EPSG','5702','EPSG','5703',0.02,'EPSG','8732','Vertical offset file','vertconw.94',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US Conus W',1);
 INSERT INTO "usage" VALUES('EPSG','9377','grid_transformation','EPSG','5409','EPSG','2950','EPSG','1255');
 INSERT INTO "grid_transformation" VALUES('EPSG','5410','NGVD29 height to NAVD88 height (2)','Interpolation within the gridded data file may be made using any of the horizontal CRSs NAD27, NAD83 or NAD83(HARN).','EPSG','9658','Vertical Offset by Grid Interpolation (VERTCON)','EPSG','5702','EPSG','5703',0.02,'EPSG','8732','Vertical offset file','vertconc.94',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US Conus C',1);
@@ -355,13 +355,13 @@ INSERT INTO "usage" VALUES('EPSG','9461','grid_transformation','EPSG','5528','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','5529','SAD69(96) to SIRGAS 2000 (1)','May be used as transformation between SAD69(96) and WGS 84 - see tfm code 5543.','EPSG','9615','NTv2','EPSG','5527','EPSG','4674',0.5,'EPSG','8656','Latitude and longitude difference file','SAD96_003.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'IBGE-Bra',0);
 INSERT INTO "usage" VALUES('EPSG','9462','grid_transformation','EPSG','5529','EPSG','3887','EPSG','1067');
 INSERT INTO "grid_transformation" VALUES('EPSG','5540','Corrego Alegre 1961 to WGS 84 (1)','Parameters from Corrego Alegre 1961 to SIRGAS 2000 (1) (tfm code 5525) assuming that SIRGAS 2000 and WGS 84 are equal within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','5524','EPSG','4326',2.0,'EPSG','8656','Latitude and longitude difference file','CA61_003.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Bra',0);
-INSERT INTO "usage" VALUES('EPSG','9463','grid_transformation','EPSG','5540','EPSG','3874','EPSG','1042');
+INSERT INTO "usage" VALUES('EPSG','9463','grid_transformation','EPSG','5540','EPSG','3874','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','5541','Corrego Alegre 1970-72 to WGS 84 (2)','Parameters from Corrego Alegre 1970-72 to SIRGAS 2000 (1) (tfm code 5526) assuming that SIRGAS 2000 and WGS 84 are equal within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4225','EPSG','4326',2.0,'EPSG','8656','Latitude and longitude difference file','CA7072_003.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Bra',0);
-INSERT INTO "usage" VALUES('EPSG','9464','grid_transformation','EPSG','5541','EPSG','1293','EPSG','1042');
-INSERT INTO "grid_transformation" VALUES('EPSG','5542','SAD69 to WGS 84 (15)','Parameters from SAD69 to SIRGAS 2000 (2) (tfm code 5528) assuming that SIRGAS 2000 and WGS 84 are equal within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4618','EPSG','4326',2.0,'EPSG','8656','Latitude and longitude difference file','SAD69_003.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Bra',0);
-INSERT INTO "usage" VALUES('EPSG','9465','grid_transformation','EPSG','5542','EPSG','3887','EPSG','1068');
-INSERT INTO "grid_transformation" VALUES('EPSG','5543','SAD69(96) to WGS 84 (1)','Parameters from SAD69(96) to SIRGAS 2000 (1) (tfm code 5529) assuming that SIRGAS 2000 and WGS 84 are equal within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','5527','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','SAD96_003.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Bra',0);
-INSERT INTO "usage" VALUES('EPSG','9466','grid_transformation','EPSG','5543','EPSG','3887','EPSG','1067');
+INSERT INTO "usage" VALUES('EPSG','9464','grid_transformation','EPSG','5541','EPSG','1293','EPSG','1252');
+INSERT INTO "grid_transformation" VALUES('EPSG','5542','SAD69 to WGS 84 (15)','Parameters values taken from SAD69 to SIRGAS 2000 (2) (tfm code 5528) assuming that SIRGAS 2000 and WGS 84 are equal within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4618','EPSG','4326',2.0,'EPSG','8656','Latitude and longitude difference file','SAD69_003.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Bra',0);
+INSERT INTO "usage" VALUES('EPSG','9465','grid_transformation','EPSG','5542','EPSG','3887','EPSG','1252');
+INSERT INTO "grid_transformation" VALUES('EPSG','5543','SAD69(96) to WGS 84 (1)','Parameters values taken from SAD69(96) to SIRGAS 2000 (1) (tfm code 5529) assuming that SIRGAS 2000 and WGS 84 are equal within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','5527','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','SAD96_003.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Bra',0);
+INSERT INTO "usage" VALUES('EPSG','9466','grid_transformation','EPSG','5543','EPSG','3887','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','5594','FEH2010 to FCSVR10 height (1)','','EPSG','1030','Geographic3D to GravityRelatedHeight (NZgeoid)','EPSG','5592','EPSG','5597',0.1,'EPSG','8666','Geoid (height correction) model file','fehmarn_geoid10.gri',NULL,NULL,NULL,NULL,NULL,NULL,'FEM-Dnk-Deu Feh',1);
 INSERT INTO "usage" VALUES('EPSG','9477','grid_transformation','EPSG','5594','EPSG','3890','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','5626','FEH2010 to FCSVR10 height (1)','For reversible alternative to this transformation see FEH2010 to FEH2010 + FCSVR10 height (1) (code 9619).','EPSG','1047','Geographic3D to GravityRelatedHeight (Gravsoft)','EPSG','5592','EPSG','5597',0.1,'EPSG','8666','Geoid (height correction) model file','fehmarn_geoid10.gri',NULL,NULL,NULL,NULL,NULL,NULL,'FEM-Dnk-Deu Feh',0);
@@ -401,7 +401,7 @@ INSERT INTO "usage" VALUES('EPSG','9756','grid_transformation','EPSG','6740','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','6946','TM75 to ETRS89 (3)','Approximate alternative to official OS polynomial method (tfm code 1041). May be taken as approximate transformation TM75 to WGS 84 - see code 6947.','EPSG','9615','NTv2','EPSG','4300','EPSG','4258',0.41,'EPSG','8656','Latitude and longitude difference file','tm75_etrs89.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OSI-Ire NT',0);
 INSERT INTO "usage" VALUES('EPSG','9849','grid_transformation','EPSG','6946','EPSG','1305','EPSG','1137');
 INSERT INTO "grid_transformation" VALUES('EPSG','6947','TM75 to WGS 84 (4)','Parameter values taken from TM75 to ETRS89 (3) (tfm code 6946) assuming that ETRS89 is coincident with WGS 84 within the accuracy of the tfm. Within accuracy of the tfm equivalent to TM75 to WGS 84 (1) (tfm code 1042).','EPSG','9615','NTv2','EPSG','4300','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','tm75_etrs89.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Ire NT',0);
-INSERT INTO "usage" VALUES('EPSG','9850','grid_transformation','EPSG','6947','EPSG','1305','EPSG','1137');
+INSERT INTO "usage" VALUES('EPSG','9850','grid_transformation','EPSG','6947','EPSG','1305','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','6948','RD/83 to ETRS89 (2)','Recommended by Saxony State Spatial Data and Land Survey Corporation for transformations based on official geospatial data of Saxony. Accuracy 3mm within Saxony; within the rest of RD/83 definition area results at least coincide with EPSG CT code15868.','EPSG','9615','NTv2','EPSG','4745','EPSG','4258',0.03,'EPSG','8656','Latitude and longitude difference file','NTv2_SN.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'GeoSN-Deu SN',0);
 INSERT INTO "usage" VALUES('EPSG','9851','grid_transformation','EPSG','6948','EPSG','2545','EPSG','1028');
 INSERT INTO "grid_transformation" VALUES('EPSG','7000','Amersfoort to ETRS89 (7)','Consistent to within 1mm with official RNAPTRANS(TM)2008 at ground level onshore and at MSL offshore. The horizontal deviation using this NTv2 grid is approximately 1mm per 50m height difference from ground level or MSL.','EPSG','9615','NTv2','EPSG','4289','EPSG','4258',0.001,'EPSG','8656','Latitude and longitude difference file','rdtrans2008.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'RDNAP-Nld 2008',0);
@@ -1114,13 +1114,17 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9787','RGF93 v2b to RGF93 v2b +
 INSERT INTO "usage" VALUES('EPSG','16690','grid_transformation','EPSG','9787','EPSG','1326','EPSG','1270');
 INSERT INTO "grid_transformation" VALUES('EPSG','9795','NAD83 to NAD83(CSRS)v7 (1)','Also distributed through Alberta Environment and Parks Lands Division named ABCSRSV7.DAC.','EPSG','9615','NTv2','EPSG','4269','EPSG','8255',0.1,'EPSG','8656','Latitude and longitude difference file','ABCSRSV7.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'NRCan-Can AB',0);
 INSERT INTO "usage" VALUES('EPSG','16635','grid_transformation','EPSG','9795','EPSG','2376','EPSG','1031');
+INSERT INTO "grid_transformation" VALUES('EPSG','9876','RGF93 v2b to NGF-IGN69 height (5)','Replaces RAF18b geoid model [RGF93 v2 to NGF-IGN69 height (4)]. Accuracy at each grid node is in the geoid model file. Recommended interpolation method is bilinear. For reversible alternative see RGF93 v2b to RGF93 v2b + NGF-IGN69 height (5) (code 9877).','EPSG','1073','Geographic3D to GravityRelatedHeight (IGN2009)','EPSG','9781','EPSG','5720',0.01,'EPSG','8666','Geoid (height correction) model file','RAF20.tac',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra 20',0);
+INSERT INTO "usage" VALUES('EPSG','16930','grid_transformation','EPSG','9876','EPSG','1326','EPSG','1133');
+INSERT INTO "grid_transformation" VALUES('EPSG','9877','RGF93 v2b to RGF93 v2b + NGF-IGN69 height (5)','Reversible alternative to RGF93 v2b to NGF-IGN69 height (5) (CT code 9876). Replaces RGF93 v2b to RGF93 v2b + NGF-IGN69 height (4) (CT code 9787).','EPSG','1095','Geog3D to Geog2D+GravityRelatedHeight (IGN2009)','EPSG','9781','EPSG','9785',0.01,'EPSG','8666','Geoid (height correction) model file','RAF20.tac',NULL,NULL,NULL,NULL,'EPSG','9782','IGN Fra 20',0);
+INSERT INTO "usage" VALUES('EPSG','16932','grid_transformation','EPSG','9877','EPSG','1326','EPSG','1270');
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 v1 to NGF-IGN69 height (1)','May be used for transformations from WGS 84 to NGF-IGN69 height. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "usage" VALUES('EPSG','11001','grid_transformation','EPSG','10000','EPSG','1326','EPSG','1133');
-INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF-IGN69 height (1)','Parameter values taken from RGF93 to NGF-IGN69 height (1) (code 10000) assuming that RGF93 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF-IGN69 height (1)','Parameter values taken from RGF93 v1 to NGF-IGN69 height (1) (code 10000) assuming that RGF93 v1 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "usage" VALUES('EPSG','11002','grid_transformation','EPSG','10001','EPSG','1326','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','10002','RGF93 v1 to NGF-IGN78 height (1)','May be used for transformations from WGS 84 to NGF-IGN78 height. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5721',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a_corse.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra Cor',0);
 INSERT INTO "usage" VALUES('EPSG','11003','grid_transformation','EPSG','10002','EPSG','1327','EPSG','1133');
-INSERT INTO "grid_transformation" VALUES('EPSG','10003','ETRS89 to NGF-IGN78 height (1)','Parameter values taken from RGF93 to NGF-IGN78 height (1) (code 10002) assuming that RGF93 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5721',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a_corse.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra Cor',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','10003','ETRS89 to NGF-IGN78 height (1)','Parameter values taken from RGF93 v1 to NGF-IGN78 height (1) (code 10002) assuming that RGF93 v1 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5721',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a_corse.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra Cor',0);
 INSERT INTO "usage" VALUES('EPSG','11004','grid_transformation','EPSG','10003','EPSG','1327','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','10004','RRAF 1991 to Martinique 1987 height (1)','May be used for transformations from WGS 84 to IGN 1987. Accuracy at each 0.025 deg x 0.025 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4973','EPSG','5756',998.0,'EPSG','8666','Geoid (height correction) model file','ggm00.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Mtq',1);
 INSERT INTO "usage" VALUES('EPSG','11005','grid_transformation','EPSG','10004','EPSG','1156','EPSG','1133');
@@ -1329,7 +1333,7 @@ INSERT INTO "usage" VALUES('EPSG','11918','grid_transformation','EPSG','15907','
 INSERT INTO "grid_transformation" VALUES('EPSG','15932','ED50 to ETRS89 (12)','Replaces ED50 to ETRS89 (11) (code 15895) - see supersession record. May be taken as approximate transformation ED50 to WGS 84 - see code 15933.','EPSG','9615','NTv2','EPSG','4230','EPSG','4258',0.2,'EPSG','8656','Latitude and longitude difference file','SPED2ETV2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'IGN-Esp v2',0);
 INSERT INTO "usage" VALUES('EPSG','11943','grid_transformation','EPSG','15932','EPSG','3429','EPSG','1152');
 INSERT INTO "grid_transformation" VALUES('EPSG','15933','ED50 to WGS 84 (41)','Parameter values from ED50 to ETRS89 (12) (code 15932). Assumes ETRS89 and WGS 84 can be considered the same to within the accuracy of the transformation. Replaces ED50 to WGS 84 (40) - see supersession record.','EPSG','9615','NTv2','EPSG','4230','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','SPED2ETV2.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Esp v2',0);
-INSERT INTO "usage" VALUES('EPSG','11944','grid_transformation','EPSG','15933','EPSG','3429','EPSG','1041');
+INSERT INTO "usage" VALUES('EPSG','11944','grid_transformation','EPSG','15933','EPSG','3429','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','15940','NTF to RGF93 (2)','Emulation using NTv2 method of France Geocentric Interpolation method tfm NTF to RGF93 (1), code 1053. May be taken as approximate transformation to ETRS89 or WGS 84 - see tfm codes 15941 and 15942.','EPSG','9615','NTv2','EPSG','4275','EPSG','4171',1.0,'EPSG','8656','Latitude and longitude difference file','rgf93_ntf.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'ESRI-Fra 1m emulation',1);
 INSERT INTO "usage" VALUES('EPSG','11951','grid_transformation','EPSG','15940','EPSG','1326','EPSG','1041');
 INSERT INTO "grid_transformation" VALUES('EPSG','15941','NTF to ETRS89 (3)','These parameter values are taken from NTF to RGR93 (2) (code 15940) as RGR93 may be considered equivalent to ETRS89 within the accuracy of the transformation. Emulation of France Geocentric Interpolation method tfm code 1054.','EPSG','9615','NTv2','EPSG','4275','EPSG','4258',1.0,'EPSG','8656','Latitude and longitude difference file','rgf93_ntf.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Fra 1m emulation',1);
@@ -1343,17 +1347,17 @@ INSERT INTO "usage" VALUES('EPSG','11958','grid_transformation','EPSG','15947','
 INSERT INTO "grid_transformation" VALUES('EPSG','15948','DHDN to ETRS89 (8)','Developed for ATKIS (Amtliches Topographisch-Kartographisches Informationssystem [Official Topographic and Cartographic Information System]). Provides a uniform transformation across the whole country. May be used as tfm to WGS84 - see tfm code 15949.','EPSG','9615','NTv2','EPSG','4314','EPSG','4258',0.9,'EPSG','8656','Latitude and longitude difference file','BETA2007.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'BKG-Deu BeTA2007',0);
 INSERT INTO "usage" VALUES('EPSG','11959','grid_transformation','EPSG','15948','EPSG','3339','EPSG','1041');
 INSERT INTO "grid_transformation" VALUES('EPSG','15949','DHDN to WGS 84 (4)','These parameter values are taken from DHDN to ETRS89 (8) (code 15948) as ETRS89 may be considered equivalent to WGS 84 within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4314','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','BETA2007.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Deu BeTA2007',0);
-INSERT INTO "usage" VALUES('EPSG','11960','grid_transformation','EPSG','15949','EPSG','3339','EPSG','1041');
-INSERT INTO "grid_transformation" VALUES('EPSG','15954','RD/83 to WGS 84 (1)','These parameter values are taken from DHDN to ETRS89 (8) (code 15948) as RD/83 and ETRS89 may be considered equivalent to DHDN and WGS 84 respectively within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4745','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','BETA2007.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Deu BeTA2007',0);
-INSERT INTO "usage" VALUES('EPSG','11965','grid_transformation','EPSG','15954','EPSG','2545','EPSG','1041');
-INSERT INTO "grid_transformation" VALUES('EPSG','15955','PD/83 to WGS 84 (1)','These parameter values are taken from DHDN to ETRS89 (8) (code 15948) as PD/83 and ETRS89 may be considered equivalent to DHDN and WGS 84 respectively within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4746','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','BETA2007.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Deu BeTA2007',0);
-INSERT INTO "usage" VALUES('EPSG','11966','grid_transformation','EPSG','15955','EPSG','2544','EPSG','1041');
+INSERT INTO "usage" VALUES('EPSG','11960','grid_transformation','EPSG','15949','EPSG','3339','EPSG','1252');
+INSERT INTO "grid_transformation" VALUES('EPSG','15954','RD/83 to WGS 84 (1)','Parameter values from taken DHDN to ETRS89 (8) (code 15948) as RD/83 and ETRS89 may be considered equivalent to DHDN and WGS 84 respectively within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4745','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','BETA2007.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Deu BeTA2007',0);
+INSERT INTO "usage" VALUES('EPSG','11965','grid_transformation','EPSG','15954','EPSG','2545','EPSG','1252');
+INSERT INTO "grid_transformation" VALUES('EPSG','15955','PD/83 to WGS 84 (1)','Parameter values taken from DHDN to ETRS89 (8) (code 15948) as PD/83 and ETRS89 may be considered equivalent to DHDN and WGS 84 respectively within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4746','EPSG','4326',1.0,'EPSG','8656','Latitude and longitude difference file','BETA2007.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'OGP-Deu BeTA2007',0);
+INSERT INTO "usage" VALUES('EPSG','11966','grid_transformation','EPSG','15955','EPSG','2544','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','15958','RGF93 v1 to NTF (2)','Emulation using NTv2 method of transformation NTF to RGF93 v1 (1), code 9327. Note that grid file parameters are of opposite sign. May be taken as approximate transformation to ETRS89 or WGS 84 - see tfm codes 15959 and 15960.','EPSG','9615','NTv2','EPSG','4171','EPSG','4275',1.0,'EPSG','8656','Latitude and longitude difference file','rgf93_ntf.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'ESRI-Fra 1m emulation',0);
 INSERT INTO "usage" VALUES('EPSG','11969','grid_transformation','EPSG','15958','EPSG','3694','EPSG','1041');
 INSERT INTO "grid_transformation" VALUES('EPSG','15959','ETRS89 to NTF (3)','These parameter values are taken from RGF93 to NTF (2) (code 15958) as RGF93 may be considered equivalent to ETRS89 within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4258','EPSG','4275',1.0,'EPSG','8656','Latitude and longitude difference file','rgf93_ntf.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Fra 1m emulation',0);
 INSERT INTO "usage" VALUES('EPSG','11970','grid_transformation','EPSG','15959','EPSG','3694','EPSG','1041');
 INSERT INTO "grid_transformation" VALUES('EPSG','15960','WGS 84 to NTF (3)','These parameter values are taken from RGF93 to NTF (2) (code 15958) as RGF93 may be considered equivalent to WGS 84 within the accuracy of the transformation.','EPSG','9615','NTv2','EPSG','4326','EPSG','4275',1.0,'EPSG','8656','Latitude and longitude difference file','rgf93_ntf.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'EPSG-Fra 1m emulation',0);
-INSERT INTO "usage" VALUES('EPSG','11971','grid_transformation','EPSG','15960','EPSG','3694','EPSG','1041');
+INSERT INTO "usage" VALUES('EPSG','11971','grid_transformation','EPSG','15960','EPSG','3694','EPSG','1252');
 INSERT INTO "grid_transformation" VALUES('EPSG','15961','RGNC91-93 to NEA74 Noumea (4)','Emulation using NTv2 method of tfm NEA74 Noumea to RGNC91-93 (3) (code 15943). Note reversal of sign of parameter values in grid file.','EPSG','9615','NTv2','EPSG','4749','EPSG','4644',0.05,'EPSG','8656','Latitude and longitude difference file','RGNC1991_IGN72GrandeTerre.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'ESRI-Ncl 0.05m',1);
 INSERT INTO "usage" VALUES('EPSG','11972','grid_transformation','EPSG','15961','EPSG','2823','EPSG','1027');
 INSERT INTO "grid_transformation" VALUES('EPSG','15962','RGNC91-93 to IGN72 Grande Terre (6)','Emulation using NTv2 method of tfm IGN72 Grande Terre to RGNC91-93 (4) (code 9329). Note reversal sign of of parameter values in grid file.','EPSG','9615','NTv2','EPSG','4749','EPSG','4662',0.1,'EPSG','8656','Latitude and longitude difference file','RGNC1991_IGN72GrandeTerre.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'ESRI-Ncl 0.1m',0);
-- 
cgit v1.2.3

