From 7b33d9180eec541f17470d628fe2bb3ed536803d Mon Sep 17 00:00:00 2001
From: Modern Slave <havingsexonthebeach@gmail.com>
Date: Thu, 14 Jan 2021 13:16:45 +0100
Subject: Database: update to EPSG v10.011

---
 data/sql/grid_transformation.sql | 16 ++++++++--------
 1 file changed, 8 insertions(+), 8 deletions(-)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 4c176837..7b1c2b5b 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -11,7 +11,7 @@ INSERT INTO "usage" VALUES('EPSG','8164','grid_transformation','EPSG','1243','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','1295','RGNC91-93 to NEA74 Noumea (4)','Emulation using NTv2 method of tfm NEA74 Noumea to RGNC91-93 (3) (code 15943). Note reversal of sign of parameter values in grid file.','EPSG','9615','NTv2','EPSG','4749','EPSG','4644',0.05,'EPSG','8656','Latitude and longitude difference file','RGNC1991_NEA74Noumea.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'ESRI-Ncl 0.05m',0);
 INSERT INTO "usage" VALUES('EPSG','8216','grid_transformation','EPSG','1295','EPSG','2823','EPSG','1027');
 INSERT INTO "grid_transformation" VALUES('EPSG','1312','NAD27 to NAD83 (3)','Uses NTv1 method. Replaced in Quebec by code 1462 and elsewhere in 1997 by NTv2 (transformation code 1313). Input expects longitudes to be positive west; EPSG GeogCRS NAD27 (code 4267) and NAD83 (code 4269) have longitudes positive east.','EPSG','9614','NTv1','EPSG','4267','EPSG','4269',1.0,'EPSG','8656','Latitude and longitude difference file','NTv1_0.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'GC-Can NT1',0);
-INSERT INTO "usage" VALUES('EPSG','8233','grid_transformation','EPSG','1312','EPSG','1061','EPSG','1197');
+INSERT INTO "usage" VALUES('EPSG','8233','grid_transformation','EPSG','1312','EPSG','4517','EPSG','1197');
 INSERT INTO "grid_transformation" VALUES('EPSG','1313','NAD27 to NAD83 (4)','Uses NTv2 data files. Replaces NTv1 (transformation code 1312) except in Quebec. Input expects longitudes to be positive west; EPSG GeogCRS NAD27 (code 4267) and (code 4269) have longitudes positive east. May be used as tfm to WGS 84 - see code 1693.','EPSG','9615','NTv2','EPSG','4267','EPSG','4269',1.5,'EPSG','8656','Latitude and longitude difference file','NTv2_0.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'GC-Can NT2',0);
 INSERT INTO "usage" VALUES('EPSG','8234','grid_transformation','EPSG','1313','EPSG','4517','EPSG','1151');
 INSERT INTO "grid_transformation" VALUES('EPSG','1451','NAD27(CGQ77) to NAD83 (1)','Replaced by NAD27(CGQ77) to NAD83 (2) (code 1575). Uses NT method which expects longitudes positive west; EPSG GeogCRSs CGQ77 (code 4609) and NAD83 (code 4269) have longitudes positive east.','EPSG','9614','NTv1','EPSG','4609','EPSG','4269',1.0,'EPSG','8656','Latitude and longitude difference file','PQV4.DAC',NULL,NULL,NULL,NULL,NULL,NULL,'SGQ-Can QC NT1',0);
@@ -373,7 +373,7 @@ INSERT INTO "usage" VALUES('EPSG','9489','grid_transformation','EPSG','5657','EP
 INSERT INTO "grid_transformation" VALUES('EPSG','5661','ED50 to ETRS89 (14)','When included in concatenation from and to projected CRSs, gives same results as ED50 / UTM zone 31N to ETRS89 / UTM zone 31N (1) - see CRS code 5166.','EPSG','9615','NTv2','EPSG','4230','EPSG','4258',0.05,'EPSG','8656','Latitude and longitude difference file','100800401.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'ICC-Esp Cat',0);
 INSERT INTO "usage" VALUES('EPSG','9492','grid_transformation','EPSG','5661','EPSG','3732','EPSG','1079');
 INSERT INTO "grid_transformation" VALUES('EPSG','5891','MGI to ETRS89 (5)','Not to be used for cadastral purposes as it does not comply with the rules for control network tie-in as per Paragraph 3 of the Land Survey Regulations (Vermessungsverordnung) 2010.','EPSG','9615','NTv2','EPSG','4312','EPSG','4258',0.15,'EPSG','8656','Latitude and longitude difference file','AT_GIS_GRID.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'BEV-Aut NTv2',0);
-INSERT INTO "usage" VALUES('EPSG','9521','grid_transformation','EPSG','5891','EPSG','1037','EPSG','1139');
+INSERT INTO "usage" VALUES('EPSG','14324','grid_transformation','EPSG','5891','EPSG','1037','EPSG','1078');
 INSERT INTO "grid_transformation" VALUES('EPSG','6138','CIGD11 to GCVD54 height (ft) (1)','Care: source CRS heights are in metres, transformation file parameter values and target CRS heights are in feet.','EPSG','1050','Geographic3D to GravityRelatedHeight (CI)','EPSG','6134','EPSG','6130',0.03,'EPSG','8666','Geoid (height correction) model file','GCGM0811.TXT',NULL,NULL,NULL,NULL,NULL,NULL,'LSD-Cym',0);
 INSERT INTO "usage" VALUES('EPSG','9628','grid_transformation','EPSG','6138','EPSG','3185','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','6139','CIGD11 to LCVD61 height (ft) (1)','Care: source CRS heights are in metres, transformation file parameter values and target CRS heights are in feet.','EPSG','1050','Geographic3D to GravityRelatedHeight (CI)','EPSG','6134','EPSG','6131',0.03,'EPSG','8666','Geoid (height correction) model file','LCGM0811.TXT',NULL,NULL,NULL,NULL,NULL,NULL,'LSD-Cym',0);
@@ -462,7 +462,7 @@ INSERT INTO "grid_transformation" VALUES('EPSG','7864','NZVD2016 height to Gisbo
 INSERT INTO "usage" VALUES('EPSG','10298','grid_transformation','EPSG','7864','EPSG','3771','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','7865','NZVD2016 height to Lyttelton 1937 height (1)','Derived at 923 control points. Mean offset 0.34m, standard deviation 0.041m, maximum difference from mean 0.149m.','EPSG','1071','Vertical Offset by Grid Interpolation (NZLVD)','EPSG','7839','EPSG','5763',0.01,'EPSG','8732','Vertical offset file','lyttelton-1937-to-nzvd2016-conversion.csv',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ LYTT',0);
 INSERT INTO "usage" VALUES('EPSG','10299','grid_transformation','EPSG','7865','EPSG','3804','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','7866','NZVD2016 height to Moturiki 1953 height  (1)','Derived at 519 control points. Mean offset 0.309m, standard deviation 0.071m, maximum difference from mean 0.231m.','EPSG','1071','Vertical Offset by Grid Interpolation (NZLVD)','EPSG','7839','EPSG','5764',0.02,'EPSG','8732','Vertical offset file','moturiki-1953-to-nzvd2016-conversion.csv',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ MOTU',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','7866','NZVD2016 height to Moturiki 1953 height (1)','Derived at 519 control points. Mean offset 0.309m, standard deviation 0.071m, maximum difference from mean 0.231m.','EPSG','1071','Vertical Offset by Grid Interpolation (NZLVD)','EPSG','7839','EPSG','5764',0.02,'EPSG','8732','Vertical offset file','moturiki-1953-to-nzvd2016-conversion.csv',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ MOTU',0);
 INSERT INTO "usage" VALUES('EPSG','10300','grid_transformation','EPSG','7866','EPSG','3768','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','7867','NZVD2016 height to Napier 1962 height (1)','Derived at 207 control points. Mean offset 0.203m, standard deviation 0.034m, maximum difference from mean 0.096m.','EPSG','1071','Vertical Offset by Grid Interpolation (NZLVD)','EPSG','7839','EPSG','5765',0.02,'EPSG','8732','Vertical offset file','napier-1962-to-nzvd2016-conversion.csv',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ NAPI',0);
 INSERT INTO "usage" VALUES('EPSG','10301','grid_transformation','EPSG','7867','EPSG','3772','EPSG','1059');
@@ -500,9 +500,9 @@ INSERT INTO "grid_transformation" VALUES('EPSG','8271','RGF93 to NGF IGN69 heigh
 INSERT INTO "usage" VALUES('EPSG','10464','grid_transformation','EPSG','8271','EPSG','1326','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','8272','RGF93 to IGN78 Corsica height (1)','Replaces RGF93 to NGF IGN69 height (1) (code 10002). Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5721',0.05,'EPSG','8666','Geoid (height correction) model file','RAC09.mnt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra Cor 09',1);
 INSERT INTO "usage" VALUES('EPSG','10465','grid_transformation','EPSG','8272','EPSG','1327','EPSG','1133');
-INSERT INTO "grid_transformation" VALUES('EPSG','8361','ETRS89 to ETRS89 + Baltic 1957 height (1)','Uses ETRS89 (realization ETRF2000) and quasigeoid model DVRM05. 1 sigma = 34 mm (test performed on 563 independent points). Uses method 9635 rather than method 9665 to facilitate Baltic 1957 to EVRF2007 transformation (see transformation code 8363).','EPSG','9635','Geog3D to Geog2D+GravityRelatedHeight (US .gtx)','EPSG','4937','EPSG','8360',0.03,'EPSG','8666','Geoid (height correction) model file','Slovakia_ETRS89h_to_Baltic1957.gtx',NULL,NULL,NULL,NULL,NULL,NULL,'UGKK-Svk',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','8361','ETRS89 to ETRS89 + Baltic 1957 height (1)','Uses ETRS89 (realization ETRF2000) and quasigeoid model DVRM05. 1 sigma = 34 mm (test performed on 563 independent points). Recommended as part of transformation between Baltic 1957 height and EVRF2007 height (see concatenated operation code 8363).','EPSG','1088','Geog3D to Geog2D+GravityRelatedHeight (gtx)','EPSG','4937','EPSG','8360',0.03,'EPSG','8666','Geoid (height correction) model file','Slovakia_ETRS89h_to_Baltic1957.gtx',NULL,NULL,NULL,NULL,'EPSG','4258','UGKK-Svk',0);
 INSERT INTO "usage" VALUES('EPSG','10508','grid_transformation','EPSG','8361','EPSG','1211','EPSG','1186');
-INSERT INTO "grid_transformation" VALUES('EPSG','8362','ETRS89 to ETRS89 + EVRF2007 height (1)','Uses ETRS89 (realization ETRF2000) and quasigeoid model DMQSK2014E. 1 sigma = 29 mm (test performed on 93 independent points). Uses method 9635 rather than method 9665 to facilitate Baltic 1957 to EVRF2007 transformation (see transformation code 8363).','EPSG','9635','Geog3D to Geog2D+GravityRelatedHeight (US .gtx)','EPSG','4937','EPSG','7423',0.03,'EPSG','8666','Geoid (height correction) model file','Slovakia_ETRS89h_to_EVRF2007.gtx',NULL,NULL,NULL,NULL,NULL,NULL,'UGKK-Svk',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','8362','ETRS89 to ETRS89 + EVRF2007 height (1)','Uses ETRS89 (realization ETRF2000) and quasigeoid model DMQSK2014E. 1 sigma = 29 mm (test performed on 93 independent points). Recommended as part of transformation between Baltic 1957 height and EVRF2007 height (see concatenated operation code 8363).','EPSG','1088','Geog3D to Geog2D+GravityRelatedHeight (gtx)','EPSG','4937','EPSG','7423',0.03,'EPSG','8666','Geoid (height correction) model file','Slovakia_ETRS89h_to_EVRF2007.gtx',NULL,NULL,NULL,NULL,'EPSG','4258','UGKK-Svk',0);
 INSERT INTO "usage" VALUES('EPSG','10509','grid_transformation','EPSG','8362','EPSG','1211','EPSG','1186');
 INSERT INTO "grid_transformation" VALUES('EPSG','8364','S-JTSK [JTSK03] to S-JTSK (1)','Derived at 684 identical points.','EPSG','9613','NADCON','EPSG','8351','EPSG','4156',0.05,'EPSG','8657','Latitude difference file','Slovakia_JTSK03_to_JTSK.LAS','EPSG','8658','Longitude difference file','Slovakia_JTSK03_to_JTSK.LOS',NULL,NULL,'UGKK-Svk',0);
 INSERT INTO "usage" VALUES('EPSG','10511','grid_transformation','EPSG','8364','EPSG','1211','EPSG','1079');
@@ -589,7 +589,7 @@ INSERT INTO "usage" VALUES('EPSG','10935','grid_transformation','EPSG','9121','E
 INSERT INTO "grid_transformation" VALUES('EPSG','9122','NAD83(CSRS)v2 to NAD83(CSRS)v4 (1)','','EPSG','9615','NTv2','EPSG','8237','EPSG','8240',0.1,'EPSG','8656','Latitude and longitude difference file','BC_98_05.GSB',NULL,NULL,NULL,NULL,NULL,NULL,'GeoBC-Can BC mainland',0);
 INSERT INTO "usage" VALUES('EPSG','10936','grid_transformation','EPSG','9122','EPSG','4535','EPSG','1027');
 INSERT INTO "grid_transformation" VALUES('EPSG','9123','NAD83(CSRS) to CGVD28 height (1)','Derived through NAD83(CSRS)v3.','EPSG','1060','Geographic3D to GravityRelatedHeight (CGG2013)','EPSG','4955','EPSG','5713',0.05,'EPSG','8666','Geoid (height correction) model file','HT2_0.byn',NULL,NULL,NULL,NULL,NULL,NULL,'NRC Can CGG2000',0);
-INSERT INTO "usage" VALUES('EPSG','10937','grid_transformation','EPSG','9123','EPSG','1061','EPSG','1133');
+INSERT INTO "usage" VALUES('EPSG','10937','grid_transformation','EPSG','9123','EPSG','1289','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9124','ITRF2008 to CGVD2013(CGG2013) height (1)','Uses CGG2013 model derived through NAD83(CSRS)v6 which uses bi-quadratic interpolation; bi-linear interpolation of the grid file will give results agreeing to within 1cm 99.97% of the time. Replaced by CT code 9125.','EPSG','1060','Geographic3D to GravityRelatedHeight (CGG2013)','EPSG','7911','EPSG','6647',0.03,'EPSG','8666','Geoid (height correction) model file','CGG2013i83.byn',NULL,NULL,NULL,NULL,NULL,NULL,'NRC Can CGG2013',0);
 INSERT INTO "usage" VALUES('EPSG','10938','grid_transformation','EPSG','9124','EPSG','1061','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9125','ITRF2008 to CGVD2013(CGG2013a) height (2)','Uses CGG2013a model derived through NAD83(CSRS)v6 which uses bi-quadratic interpolation; bi-linear interpolation of the grid file will give results agreeing to within 1cm 99.97% of the time. Replaces CT code 9124.','EPSG','1060','Geographic3D to GravityRelatedHeight (CGG2013)','EPSG','7911','EPSG','9245',0.03,'EPSG','8666','Geoid (height correction) model file','CGG2013i08a.byn',NULL,NULL,NULL,NULL,NULL,NULL,'NRC Can CGG2013a',0);
@@ -690,7 +690,7 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9276','ETRS89 to EVRF2000 Austr
 INSERT INTO "usage" VALUES('EPSG','14189','grid_transformation','EPSG','9276','EPSG','1037','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9277','MGI to EVRF2000 Austria height (1)','Austrian Geoid 2008 (Bessel ellipsoid). Accuracy 5cm (1 sigma). The transformation is implemented in BEV-Transformator.','EPSG','1081','Geographic3D to GravityRelatedHeight (BEV AT)','EPSG','9267','EPSG','9274',0.05,'EPSG','8666','Geoid (height correction) model file','GEOID_BESSEL_Oesterreich.csv',NULL,NULL,NULL,NULL,'EPSG','4312','BEV-Aut',0);
 INSERT INTO "usage" VALUES('EPSG','14192','grid_transformation','EPSG','9277','EPSG','1037','EPSG','1133');
-INSERT INTO "grid_transformation" VALUES('EPSG','9278','ETRS89 to GHA height (1)','This transformation gives same result as concatenation of ETRS89 to EVRF2000 Austria height and EVRF2000 Austria height to GHA height transformations, CTs code 9276 and 9275. Accuracy 5cm (1 sigma). The transformation is implemented in BEV-Transformator.','EPSG','1081','Geographic3D to GravityRelatedHeight (BEV AT)','EPSG','4937','EPSG','5778',0.05,'EPSG','8666','Geoid (height correction) model file','GV_Hoehengrid_plus_Geoid_V3.csv',NULL,NULL,NULL,NULL,'EPSG','4258','BEV-Aut',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9278','ETRS89 to GHA height (1)','This transformation gives same result as concatenation of ETRS89 to EVRF2000 Austria height and EVRF2000 Austria height to GHA height transformations, CTs code 9276 and 9275. Accuracy 5cm (1 sigma). The transformation is implemented in BEV-Transformator.','EPSG','1081','Geographic3D to GravityRelatedHeight (BEV AT)','EPSG','4937','EPSG','5778',0.05,'EPSG','8666','Geoid (height correction) model file','GV_Hoehengrid_plus_Geoid_V3.csv',NULL,NULL,NULL,NULL,'EPSG','4258','BEV-Aut',1);
 INSERT INTO "usage" VALUES('EPSG','13936','grid_transformation','EPSG','9278','EPSG','1037','EPSG','1133');
 INSERT INTO "grid_transformation" VALUES('EPSG','9280','ITRF2005 to SA LLD height (1)','Hybrid geoid referenced to ITRF2005@2010.02. Accuracy 7cm at 1 sigma.','EPSG','1082','Geographic3D to GravityRelatedHeight (SA 2010)','EPSG','7910','EPSG','9279',0.07,'EPSG','8666','Geoid (height correction) model file','SAGEOID2010.dat',NULL,NULL,NULL,NULL,NULL,NULL,'NGI-Zaf',0);
 INSERT INTO "usage" VALUES('EPSG','13937','grid_transformation','EPSG','9280','EPSG','3309','EPSG','1133');
@@ -718,7 +718,7 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9316','NZVD2016 height to Gisbo
 INSERT INTO "usage" VALUES('EPSG','13945','grid_transformation','EPSG','9316','EPSG','3771','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','9317','NZVD2016 height to Lyttelton 1937 height (2)','Derived at 923 control points. Mean offset 0.34m, standard deviation 0.041m, maximum difference from mean 0.149m. Supersedes NZVD2016 height to Lyttelton 1937 height (1) (code 7865) after change of grid file format.','EPSG','1084','Vertical Offset by Grid Interpolation (gtx)','EPSG','7839','EPSG','5763',0.01,'EPSG','8732','Vertical offset file','lyttht1937-nzvd2016.gtx',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ LYTT gtx',0);
 INSERT INTO "usage" VALUES('EPSG','13946','grid_transformation','EPSG','9317','EPSG','3804','EPSG','1059');
-INSERT INTO "grid_transformation" VALUES('EPSG','9318','NZVD2016 height to Moturiki 1953 height  (2)','Derived at 519 control points. Mean offset 0.309m, standard deviation 0.071m, maximum difference from mean 0.231m. Supersedes NZVD2016 height to Moturiki 1953 height (1) (code 7866) after change of grid file format.','EPSG','1084','Vertical Offset by Grid Interpolation (gtx)','EPSG','7839','EPSG','5764',0.02,'EPSG','8732','Vertical offset file','motuht1953-nzvd2016.gtx',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ MOTU gtx',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9318','NZVD2016 height to Moturiki 1953 height (2)','Derived at 519 control points. Mean offset 0.309m, standard deviation 0.071m, maximum difference from mean 0.231m. Supersedes NZVD2016 height to Moturiki 1953 height (1) (code 7866) after change of grid file format.','EPSG','1084','Vertical Offset by Grid Interpolation (gtx)','EPSG','7839','EPSG','5764',0.02,'EPSG','8732','Vertical offset file','motuht1953-nzvd2016.gtx',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ MOTU gtx',0);
 INSERT INTO "usage" VALUES('EPSG','13947','grid_transformation','EPSG','9318','EPSG','3768','EPSG','1059');
 INSERT INTO "grid_transformation" VALUES('EPSG','9319','NZVD2016 height to Napier 1962 height (2)','Derived at 207 control points. Mean offset 0.203m, standard deviation 0.034m, maximum difference from mean 0.096m. Supersedes NZVD2016 height to Napier 1962 height (1) (code 7867) after change of grid file format.','EPSG','1084','Vertical Offset by Grid Interpolation (gtx)','EPSG','7839','EPSG','5765',0.02,'EPSG','8732','Vertical offset file','napiht1962-nzvd2016.gtx',NULL,NULL,NULL,NULL,'EPSG','4167','LINZ-NZ NAPI gtx',0);
 INSERT INTO "usage" VALUES('EPSG','13948','grid_transformation','EPSG','9319','EPSG','3772','EPSG','1059');
-- 
cgit v1.2.3

