From ee743a74c21892b53946941c69b94f1263ac42e8 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Fri, 19 Jun 2020 13:50:12 +0200
Subject: Database: update to EPSG v9.8.12

---
 data/sql/grid_transformation.sql | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'data/sql/grid_transformation.sql')

diff --git a/data/sql/grid_transformation.sql b/data/sql/grid_transformation.sql
index 83f9b90c..298b5080 100644
--- a/data/sql/grid_transformation.sql
+++ b/data/sql/grid_transformation.sql
@@ -316,7 +316,7 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9168','NAD83(FBN) to NAVD88 hei
 INSERT INTO "grid_transformation" VALUES('EPSG','9169','NAD83(HARN) to NAVD88 height (9)','Uses Geoid06 hybrid model. Replaced by Geoid09 model (CT code 9174).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','4957','EPSG','5703','EPSG','1330',0.02,'EPSG','8666','Geoid (height correction) model file','geoid06_ak.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US AK',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9170','NAD83(FBN) to ASVD02 height (1)','Uses Geoid09 hybrid model. Replaced by Geoid12 model (CT code 7650).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','8542','EPSG','6643','EPSG','2288',0.05,'EPSG','8666','Geoid (height correction) model file','g2009s01.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Asm 09',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9171','NAD83(FBN) to GUVD04 height (1)','Uses Geoid09 hybrid model. Replaced by Geoid12 model (CT code 7648).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','8542','EPSG','6644','EPSG','3255',0.05,'EPSG','8666','Geoid (height correction) model file','g2009g01.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Gum 09',0);
-INSERT INTO "grid_transformation" VALUES('EPSG','9172','NAD83(FBN) to NMVD03 height (1)','Uses Geoid09 hybrid model. Replaced by Geoid12 model (CT code 7649).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','8542','EPSG','6640','EPSG','4171',0.05,'EPSG','8666','Geoid (height correction) model file','g2009g01.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Mnp 12B',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9172','NAD83(FBN) to NMVD03 height (1)','Uses Geoid09 hybrid model. Replaced by Geoid12 model (CT code 7649).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','8542','EPSG','6640','EPSG','4171',0.05,'EPSG','8666','Geoid (height correction) model file','g2009g01.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Mnp 09',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9173','NAD83(NSRS2007) to NAVD88 height (1)','Uses Geoid09 hybrid model. Replaced by 2012 model (CT code 6326).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','4893','EPSG','5703','EPSG','1323',0.05,'EPSG','8666','Geoid (height correction) model file','geoid09_conus.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US Conus 09',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9174','NAD83(NSRS2007) to NAVD88 height (2)','Uses Geoid09 hybrid model. Replaced by Geoid12 model (CT code 6327).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','4893','EPSG','5703','EPSG','1330',0.05,'EPSG','8666','Geoid (height correction) model file','geoid09_ak.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US AK 09',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9175','NAD83(NSRS2007) to PRVD02 height (1)','Uses Geoid09 hybrid model. Replaced by Geoid12 model (CT code 7646).','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','4893','EPSG','6641','EPSG','3294',0.05,'EPSG','8666','Geoid (height correction) model file','g2009p01.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Pri 09',0);
@@ -325,7 +325,7 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9187','RGAF09 to IGN 1988 SB he
 INSERT INTO "grid_transformation" VALUES('EPSG','9188','RGAF09 to IGN 1988 SM height (2)','Accuracy 0.05m to 0.1m. Replaces RGAF09 to IGN 1988 SM height (1), transformation code 5505.','Derivation of gravity-related heights from GPS observations.','EPSG','1073','Geographic3D to GravityRelatedHeight (IGN2009)','EPSG','5488','EPSG','5620','EPSG','2890',0.1,'EPSG','8666','Geoid (height correction) model file','gg10_smv2.mnt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Glp StM',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9228','RGSPM06 to Danger 1950 height (2)','Accuracy 0.01m to 0.05m within onshore area. Replaces RGSPM06 to Danger 1950 height (1), CT code 9137.','Derivation of gravity-related heights from GPS observations.','EPSG','1073','Geographic3D to GravityRelatedHeight (IGN2009)','EPSG','4466','EPSG','5792','EPSG','1220',0.05,'EPSG','8666','Geoid (height correction) model file','RASPM2018.mnt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN-SPM',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9229','NAD83(2011) to NAVD88 height (3)','Uses Geoid18 hybrid model. Replaces 12B model. See information source for further information.','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','6319','EPSG','5703','EPSG','1323',0.015,'EPSG','8666','Geoid (height correction) model file','g2018u0.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-US Conus 18',0);
-INSERT INTO "grid_transformation" VALUES('EPSG','9230','NAD83(2011) to PRVD02 height (2)','Uses Geoid18 hybrid model. Replaces 12B model. See information source for further information.','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','6319','EPSG','6641','EPSG','3294',0.015,'EPSG','8666','Geoid (height correction) model file','g2018p0.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Pri 12B',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9230','NAD83(2011) to PRVD02 height (2)','Uses Geoid18 hybrid model. Replaces 12B model. See information source for further information.','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','6319','EPSG','6641','EPSG','3294',0.015,'EPSG','8666','Geoid (height correction) model file','g2018p0.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Pri 18',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9231','NAD83(2011) to VIVD09 height (2)','Uses Geoid18 hybrid model. Replaces 12B model. See information source for further information.','Derivation of approximate gravity-related heights from GPS observations.','EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)','EPSG','6319','EPSG','6642','EPSG','3330',0.015,'EPSG','8666','Geoid (height correction) model file','g2018p0.bin',NULL,NULL,NULL,NULL,NULL,NULL,'NGS-Vir 18',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9232','ISN93 to ISN2016 (1)','Grid transformation based on Kriging between ISN93 and ISN2016. Accuracy is better than 5 cm in stable areas but can be around 25 cm in areas that have suffered deformation due to earthquake or volcanic eruption.','Spatial referencing.','EPSG','9615','NTv2','EPSG','4659','EPSG','8086','EPSG','1120',0.05,'EPSG','8656','Latitude and longitude difference file','ISN93_ISN2016.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'LMI-Isl',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9233','ISN2004 to ISN2016 (1)','Grid transformation based on Kriging between ISN2004 and ISN2016. Accuracy is better than 5 cm in stable areas but can be around 25 cm in areas that have suffered deformation due to earthquake or volcanic eruption.','Spatial referencing.','EPSG','9615','NTv2','EPSG','5324','EPSG','8086','EPSG','1120',0.05,'EPSG','8656','Latitude and longitude difference file','ISN2004_ISN2016.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'LMI-Isl',0);
@@ -371,7 +371,10 @@ INSERT INTO "grid_transformation" VALUES('EPSG','9329','IGN72 Grande Terre to RG
 INSERT INTO "grid_transformation" VALUES('EPSG','9330','IGN72 Grande Terre to RGNC91-93 (5)','Developed in July 2002 and officially adopted in August 2005.','Accuracy 5-10cm.','EPSG','1087','Geocentric translation by Grid Interpolation (IGN)','EPSG','4662','EPSG','4749','EPSG','2823',0.05,'EPSG','8727','Geocentric translation file','gr3dnc02b.mnt',NULL,NULL,NULL,NULL,'EPSG','4749','BGN-Ncl Noum 0.05m',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9338','DHDN to ETRS89 (9)','Official transformation for the state of Baden-Württemberg. Used in ATKIS (Amtliches Topographisch-Kartographisches Informationssystem [Official Topographic and Cartographic Information System]).','Cadastre, engineering survey, topographic mapping (large scale).','EPSG','9615','NTv2','EPSG','4314','EPSG','4258','EPSG','4580',0.1,'EPSG','8656','Latitude and longitude difference file','BWTA2017.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'LGL-Deu BWTA2017',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9352','RGNC91-93 to NGNC08 height (1)','Geoid model RANC08 realizes NGNC08 height (CRS code 9351) to a precision of 2-5cm.','Derivation of gravity-related heights from GNSS observations.','EPSG','1073','Geographic3D to GravityRelatedHeight (IGN2009)','EPSG','4907','EPSG','9351','EPSG','3430',0.03,'EPSG','8666','Geoid (height correction) model file','Ranc08_Circe.mnt',NULL,NULL,NULL,NULL,NULL,NULL,'BGN-Ncl RANC08',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9355','KSA-GRF17 to KSA-VRF14 height (1)','Hybrid geoid, grid resolution 0.02° latitude x 0.025° longitude. Accuracy ~2 cm in the Eastern region and ~10-20 cm in the rest of KSA. Also available in IGN2009 format (method 1073). To access KSA-GEOID17 contact GCS by e-mail to info@gcs.gov.sa.','Derivation of gravity-related heights from GNSS observations.','EPSG','1047','Geographic3D to GravityRelatedHeight (Gravsoft)','EPSG','9332','EPSG','9335','EPSG','3303',0.1,'EPSG','8666','Geoid (height correction) model file','KSA-GEOID17.gra',NULL,NULL,NULL,NULL,NULL,NULL,'GCS-Sau',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9363','Ain el Abd to KSA-GRF17 (2)','Accuracy 5-10 cm.','Geodesy.','EPSG','1087','Geocentric translation by Grid Interpolation (IGN)','EPSG','4204','EPSG','9333','EPSG','3303',0.1,'EPSG','8727','Geocentric translation file','ARAMCO_AAA-KSAGRF_6.tac',NULL,NULL,NULL,NULL,'EPSG','9333','GCS-Sau 0.1m',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','9365','ETRS89 to TPEN11-IRF (1)','In conjunction with the TPEN11-TM map projection (code 9366) applied to TPEN11-IRF (code 9364), emulates the TPEN11 Snake and TPEN11ext Snake projections. Applied to ETRS89 (as realized through the OSNet v2009 CORS) defines TPEN11-IRF hence is errorless.','Engineering survey and topographic mapping for railway applications.','EPSG','9615','NTv2','EPSG','4258','EPSG','9364','EPSG','4583',0.0,'EPSG','8656','Latitude and longitude difference file','TN15-ETRS89-to-TPEN11-IRF.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'NR-Gbr TPEN11 OSNet2009',0);
+INSERT INTO "grid_transformation" VALUES('EPSG','9369','ETRS89 to MML07-IRF (1)','In conjunction with the MML07-TM map projection (code 9370) applied to MML07-IRF (code 9372), emulates the MML07 Snake projection. Applied to ETRS89 (as realized through the OSNet v2009 CORS) defines MML07-IRF hence is errorless.','Engineering survey and topographic mapping for railway applications.','EPSG','9615','NTv2','EPSG','4258','EPSG','9372','EPSG','4588',0.0,'EPSG','8656','Latitude and longitude difference file','TN15-ETRS89-to-MML07-IRF.gsb',NULL,NULL,NULL,NULL,NULL,NULL,'NR-Gbr MML07 OSNet2009',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10000','RGF93 to NGF-IGN69 height (1)','May be used for transformations from WGS 84 to NGF-IGN69. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5720','EPSG','1326',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10001','ETRS89 to NGF-IGN69 height (1)','Parameter values taken from RGF93 to NGF-IGN69 (1) (code 10000) assuming that RGF93 is equivalent to ETRS89 within the accuracy of the transformation. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4937','EPSG','5720','EPSG','1326',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra',0);
 INSERT INTO "grid_transformation" VALUES('EPSG','10002','RGF93 to NGF-IGN78 height (1)','May be used for transformations from WGS 84 to NGF-IGN78. Accuracy at each 0.1 deg x 0.1 degree grid node is given within the geoid model file.','Derivation of gravity-related heights from GPS observations.','EPSG','9664','Geographic3D to GravityRelatedHeight (IGN1997)','EPSG','4965','EPSG','5721','EPSG','1327',0.5,'EPSG','8666','Geoid (height correction) model file','ggf97a_corse.txt',NULL,NULL,NULL,NULL,NULL,NULL,'IGN Fra Cor',0);
-- 
cgit v1.2.3

