From 58b69a9fdfbc8b4798c66f34ddbf0e73ccee271d Mon Sep 17 00:00:00 2001
From: jmckenna <jmckenna@gatewaygeomatics.com>
Date: Fri, 31 Jul 2020 17:53:22 -0300
Subject: Database: update to EPSG v9.8.15 database

Co-authored-by: jmckenna <jmckenna@gatewaygeomatics.com>
Co-authored-by: Javier Jimenez Shaw <j1@jimenezshaw.com>
Co-authored-by: Even Rouault <even.rouault@spatialys.com>
---
 data/sql/grid_transformation_custom.sql | 12 ------------
 1 file changed, 12 deletions(-)

(limited to 'data/sql/grid_transformation_custom.sql')

diff --git a/data/sql/grid_transformation_custom.sql b/data/sql/grid_transformation_custom.sql
index e04f3ace..38210c00 100644
--- a/data/sql/grid_transformation_custom.sql
+++ b/data/sql/grid_transformation_custom.sql
@@ -84,15 +84,3 @@ INSERT INTO "grid_transformation" VALUES(
     NULL,
     'EPSG','8666','Geoid (height correction) model file','Icegeoid_ISN2016.gtx',
     NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
--- Spain
-
-INSERT INTO "grid_transformation" VALUES(
-    'PROJ','EPSG_4937_TO_EPSG_5782','ETRS89 to Alicante height',
-    NULL,NULL,
-    'EPSG','9665','Geographic3D to GravityRelatedHeight (gtx)',
-    'EPSG','4937', -- source CRS (ETRS89 geographic 3D)
-    'EPSG','5782', -- target CRS (Alicante height)
-    'EPSG','2366', -- area of use: Spain - mainland onshore
-    NULL,
-    'EPSG','8666','Geoid (height correction) model file','EGM08_REDNAP.asc',
-    NULL,NULL,NULL,NULL,NULL,NULL,NULL,0);
-- 
cgit v1.2.3

