From 643ce02edfb83a02c89650586562d2a3fe6a933b Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Wed, 16 Dec 2020 15:24:16 +0100
Subject: Database: update to EPSG v10.008

---
 data/sql/other_transformation.sql | 12 +++++++++---
 1 file changed, 9 insertions(+), 3 deletions(-)

(limited to 'data/sql/other_transformation.sql')

diff --git a/data/sql/other_transformation.sql b/data/sql/other_transformation.sql
index 9714c79b..9b3bb471 100644
--- a/data/sql/other_transformation.sql
+++ b/data/sql/other_transformation.sql
@@ -438,12 +438,18 @@ INSERT INTO "other_transformation" VALUES('EPSG','8359','Baltic 1957 height to B
 INSERT INTO "usage" VALUES('EPSG','10507','other_transformation','EPSG','8359','EPSG','1306','EPSG','1111');
 INSERT INTO "other_transformation" VALUES('EPSG','9371','Vienna height to GHA height (1)','Defines Wiener Null surface. GHA vertical reference surface is 156.68m below Wiener Null surface.','EPSG','9616','Vertical Offset','EPSG','8881','EPSG','5778',0.0,'EPSG','8603','Vertical Offset',156.68,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'BEV-Aut Wien',0);
 INSERT INTO "usage" VALUES('EPSG','13986','other_transformation','EPSG','9371','EPSG','4585','EPSG','1059');
-INSERT INTO "other_transformation" VALUES('EPSG','9446','ODN height to EVRF2019 mean-tide height (1)','Determined at Channel Tunnel portal.','EPSG','9616','Vertical Offset','EPSG','5701','EPSG','9390',0.02,'EPSG','8603','Vertical Offset',-0.173,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Gbr 2019m',0);
+INSERT INTO "other_transformation" VALUES('EPSG','9446','ODN height to EVRF2019 mean-tide height (1)','Determined at Channel Tunnel portal.','EPSG','9616','Vertical Offset','EPSG','5701','EPSG','9390',0.02,'EPSG','8603','Vertical Offset',-0.173,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Gbr 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14104','other_transformation','EPSG','9446','EPSG','2792','EPSG','1059');
-INSERT INTO "other_transformation" VALUES('EPSG','9447','Antalya height to EVRF2019 mean-tide height (1)','Determined at two points. No accuracy figure available. Applicable for points up to a maximum height of about 1000 m.','EPSG','9616','Vertical Offset','EPSG','5775','EPSG','9390',0.02,'EPSG','8603','Vertical Offset',-0.446,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Tur 2019m',0);
+INSERT INTO "other_transformation" VALUES('EPSG','9447','Antalya height to EVRF2019 mean-tide height (1)','Determined at two points. No accuracy figure available. Applicable for points up to a maximum height of about 1000 m.','EPSG','9616','Vertical Offset','EPSG','5775','EPSG','9390',0.02,'EPSG','8603','Vertical Offset',-0.446,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Tur 2019m',1);
 INSERT INTO "usage" VALUES('EPSG','14105','other_transformation','EPSG','9447','EPSG','3322','EPSG','1059');
-INSERT INTO "other_transformation" VALUES('EPSG','9448','Antalya height to EVRF2019 height (1)','Determined at two points. No accuracy figure available. Applicable for points up to a maximum height of about 1000 m.','EPSG','9616','Vertical Offset','EPSG','5775','EPSG','9389',0.02,'EPSG','8603','Vertical Offset',-0.392,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Tur 2019z',0);
+INSERT INTO "other_transformation" VALUES('EPSG','9448','Antalya height to EVRF2019 height (1)','Determined at two points. No accuracy figure available. Applicable for points up to a maximum height of about 1000 m.','EPSG','9616','Vertical Offset','EPSG','5775','EPSG','9389',0.02,'EPSG','8603','Vertical Offset',-0.392,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Tur 2019z',1);
 INSERT INTO "usage" VALUES('EPSG','14106','other_transformation','EPSG','9448','EPSG','3322','EPSG','1059');
+INSERT INTO "other_transformation" VALUES('EPSG','9551','Antalya height to EVRF2019 height (2)','Determined at two points. No accuracy figure available. Applicable for points up to a maximum height of about 1000 m.','EPSG','9616','Vertical Offset','EPSG','5775','EPSG','9389',0.02,'EPSG','8603','Vertical Offset',-0.394,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Tur 2019z 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14651','other_transformation','EPSG','9551','EPSG','3322','EPSG','1059');
+INSERT INTO "other_transformation" VALUES('EPSG','9552','Antalya height to EVRF2019 mean-tide height (2)','Determined at two points. No accuracy figure available. Applicable for points up to a maximum height of about 1000 m.','EPSG','9616','Vertical Offset','EPSG','5775','EPSG','9390',0.02,'EPSG','8603','Vertical Offset',-0.448,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Tur 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14650','other_transformation','EPSG','9552','EPSG','3322','EPSG','1059');
+INSERT INTO "other_transformation" VALUES('EPSG','9562','ODN height to EVRF2019 mean-tide height (2)','Determined at Channel Tunnel portal.','EPSG','9616','Vertical Offset','EPSG','5701','EPSG','9390',0.02,'EPSG','8603','Vertical Offset',-0.17,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Gbr 2019m 2020-09',0);
+INSERT INTO "usage" VALUES('EPSG','14640','other_transformation','EPSG','9562','EPSG','2792','EPSG','1059');
 INSERT INTO "other_transformation" VALUES('EPSG','10087','Jamaica 1875 / Jamaica (Old Grid) to JAD69 / Jamaica National Grid (1)','Derived by least squares fit at primary triangulation stations. Accuracy will be less outside of this network due to extrapolation.','EPSG','9624','Affine parametric transformation','EPSG','24100','EPSG','24200',1.5,'EPSG','8623','A0',82357.457,'EPSG','9001','EPSG','8624','A1',0.304794369,'EPSG','9203','EPSG','8625','A2',1.5417425e-05,'EPSG','9203','EPSG','8639','B0',28091.324,'EPSG','9001','EPSG','8640','B1',-1.5417425e-05,'EPSG','9203','EPSG','8641','B2',0.304794369,'EPSG','9203',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'SD-Jam',0);
 INSERT INTO "usage" VALUES('EPSG','11088','other_transformation','EPSG','10087','EPSG','3342','EPSG','1153');
 INSERT INTO "other_transformation" VALUES('EPSG','10088','JAD69 / Jamaica National Grid to Jamaica 1875 / Jamaica (Old Grid) (1)','Derived by least squares fit at primary triangulation stations. Accuracy will be less outside of this network due to extrapolation.','EPSG','9624','Affine parametric transformation','EPSG','24200','EPSG','24100',1.5,'EPSG','8623','A0',-270201.96,'EPSG','9005','EPSG','8624','A1',0.00016595792,'EPSG','9203','EPSG','8625','A2',3.2809005,'EPSG','9203','EPSG','8639','B0',-92178.51,'EPSG','9005','EPSG','8640','B1',3.2809005,'EPSG','9203','EPSG','8641','B2',-0.00016595792,'EPSG','9203',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'SD-Jam',1);
-- 
cgit v1.2.3

