From 752696eb8ac0ecb9ff96432ec5849625ed452f74 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Sun, 16 May 2021 12:41:07 +0200
Subject: Database: update to EPSG v10.022

---
 data/sql/other_transformation.sql | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'data/sql/other_transformation.sql')

diff --git a/data/sql/other_transformation.sql b/data/sql/other_transformation.sql
index 990e369f..c9dfa173 100644
--- a/data/sql/other_transformation.sql
+++ b/data/sql/other_transformation.sql
@@ -450,6 +450,8 @@ INSERT INTO "other_transformation" VALUES('EPSG','9552','Antalya height to EVRF2
 INSERT INTO "usage" VALUES('EPSG','14650','other_transformation','EPSG','9552','EPSG','3322','EPSG','1059');
 INSERT INTO "other_transformation" VALUES('EPSG','9562','ODN height to EVRF2019 mean-tide height (2)','Determined at Channel Tunnel portal.','EPSG','9616','Vertical Offset','EPSG','5701','EPSG','9390',0.02,'EPSG','8603','Vertical Offset',-0.17,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'EuG-Gbr 2019m 2020-09',0);
 INSERT INTO "usage" VALUES('EPSG','14640','other_transformation','EPSG','9562','EPSG','2792','EPSG','1059');
+INSERT INTO "other_transformation" VALUES('EPSG','9726','Genoa 1942 height to Catania 1965 height (1)','','EPSG','9616','Vertical Offset','EPSG','5214','EPSG','9721',0.01,'EPSG','8603','Vertical Offset',0.141,'EPSG','9001',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'IGMI-Ita Sicily',0);
+INSERT INTO "usage" VALUES('EPSG','15279','other_transformation','EPSG','9726','EPSG','2340','EPSG','1184');
 INSERT INTO "other_transformation" VALUES('EPSG','10087','Jamaica 1875 / Jamaica (Old Grid) to JAD69 / Jamaica National Grid (1)','Derived by least squares fit at primary triangulation stations. Accuracy will be less outside of this network due to extrapolation.','EPSG','9624','Affine parametric transformation','EPSG','24100','EPSG','24200',1.5,'EPSG','8623','A0',82357.457,'EPSG','9001','EPSG','8624','A1',0.304794369,'EPSG','9203','EPSG','8625','A2',1.5417425e-05,'EPSG','9203','EPSG','8639','B0',28091.324,'EPSG','9001','EPSG','8640','B1',-1.5417425e-05,'EPSG','9203','EPSG','8641','B2',0.304794369,'EPSG','9203',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'SD-Jam',0);
 INSERT INTO "usage" VALUES('EPSG','11088','other_transformation','EPSG','10087','EPSG','3342','EPSG','1153');
 INSERT INTO "other_transformation" VALUES('EPSG','10088','JAD69 / Jamaica National Grid to Jamaica 1875 / Jamaica (Old Grid) (1)','Derived by least squares fit at primary triangulation stations. Accuracy will be less outside of this network due to extrapolation.','EPSG','9624','Affine parametric transformation','EPSG','24200','EPSG','24100',1.5,'EPSG','8623','A0',-270201.96,'EPSG','9005','EPSG','8624','A1',0.00016595792,'EPSG','9203','EPSG','8625','A2',3.2809005,'EPSG','9203','EPSG','8639','B0',-92178.51,'EPSG','9005','EPSG','8640','B1',3.2809005,'EPSG','9203','EPSG','8641','B2',-0.00016595792,'EPSG','9203',NULL,NULL,NULL,NULL,NULL,NULL,NULL,NULL,'SD-Jam',1);
-- 
cgit v1.2.3

