From 230012325a04876da43e67dbcff76acbaff67c3e Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Thu, 10 Jun 2021 12:25:35 +0200
Subject: Database: update to EPSG v10.026

---
 data/sql/projected_crs.sql | 120 +++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 120 insertions(+)

(limited to 'data/sql/projected_crs.sql')

diff --git a/data/sql/projected_crs.sql b/data/sql/projected_crs.sql
index df597bcf..42bc15d9 100644
--- a/data/sql/projected_crs.sql
+++ b/data/sql/projected_crs.sql
@@ -7323,6 +7323,10 @@ INSERT INTO "projected_crs" VALUES('EPSG','9716','IGM95 / UTM zone 34N',NULL,'EP
 INSERT INTO "usage" VALUES('EPSG','15325','projected_crs','EPSG','9716','EPSG','4187','EPSG','1027');
 INSERT INTO "projected_crs" VALUES('EPSG','9741','EOS21 Grid',NULL,'EPSG','4400','EPSG','9739','EPSG','9738',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','15317','projected_crs','EPSG','9741','EPSG','4620','EPSG','1141');
+INSERT INTO "projected_crs" VALUES('EPSG','9748','NAD83(2011) / Alabama East (ftUS)',NULL,'EPSG','4497','EPSG','6318','EPSG','9746',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15376','projected_crs','EPSG','9748','EPSG','2154','EPSG','1142');
+INSERT INTO "projected_crs" VALUES('EPSG','9749','NAD83(2011) / Alabama West (ftUS)',NULL,'EPSG','4497','EPSG','6318','EPSG','9747',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15375','projected_crs','EPSG','9749','EPSG','2155','EPSG','1142');
 INSERT INTO "projected_crs" VALUES('EPSG','20004','Pulkovo 1995 / Gauss-Kruger zone 4',NULL,'EPSG','4530','EPSG','4200','EPSG','16204',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6177','projected_crs','EPSG','20004','EPSG','1763','EPSG','1211');
 INSERT INTO "projected_crs" VALUES('EPSG','20005','Pulkovo 1995 / Gauss-Kruger zone 5',NULL,'EPSG','4530','EPSG','4200','EPSG','16205',NULL,0);
@@ -7517,12 +7521,128 @@ INSERT INTO "projected_crs" VALUES('EPSG','20823','Aratu / UTM zone 23S',NULL,'E
 INSERT INTO "usage" VALUES('EPSG','6272','projected_crs','EPSG','20823','EPSG','1573','EPSG','1136');
 INSERT INTO "projected_crs" VALUES('EPSG','20824','Aratu / UTM zone 24S',NULL,'EPSG','4400','EPSG','4208','EPSG','16124',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6273','projected_crs','EPSG','20824','EPSG','1574','EPSG','1136');
+INSERT INTO "projected_crs" VALUES('EPSG','20904','GSK-2011 / Gauss-Kruger zone 4',NULL,'EPSG','4530','EPSG','7683','EPSG','16204',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15388','projected_crs','EPSG','20904','EPSG','1763','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20905','GSK-2011 / Gauss-Kruger zone 5',NULL,'EPSG','4530','EPSG','7683','EPSG','16205',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15473','projected_crs','EPSG','20905','EPSG','1764','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20906','GSK-2011 / Gauss-Kruger zone 6',NULL,'EPSG','4530','EPSG','7683','EPSG','16206',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15447','projected_crs','EPSG','20906','EPSG','1765','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20907','GSK-2011 / Gauss-Kruger zone 7',NULL,'EPSG','4530','EPSG','7683','EPSG','16207',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15448','projected_crs','EPSG','20907','EPSG','1766','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20908','GSK-2011 / Gauss-Kruger zone 8',NULL,'EPSG','4530','EPSG','7683','EPSG','16208',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15474','projected_crs','EPSG','20908','EPSG','1767','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20909','GSK-2011 / Gauss-Kruger zone 9',NULL,'EPSG','4530','EPSG','7683','EPSG','16209',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15475','projected_crs','EPSG','20909','EPSG','1768','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20910','GSK-2011 / Gauss-Kruger zone 10',NULL,'EPSG','4530','EPSG','7683','EPSG','16210',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15476','projected_crs','EPSG','20910','EPSG','1769','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20911','GSK-2011 / Gauss-Kruger zone 11',NULL,'EPSG','4530','EPSG','7683','EPSG','16211',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15477','projected_crs','EPSG','20911','EPSG','1770','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20912','GSK-2011 / Gauss-Kruger zone 12',NULL,'EPSG','4530','EPSG','7683','EPSG','16212',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15478','projected_crs','EPSG','20912','EPSG','1771','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20913','GSK-2011 / Gauss-Kruger zone 13',NULL,'EPSG','4530','EPSG','7683','EPSG','16213',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15479','projected_crs','EPSG','20913','EPSG','1772','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20914','GSK-2011 / Gauss-Kruger zone 14',NULL,'EPSG','4530','EPSG','7683','EPSG','16214',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15480','projected_crs','EPSG','20914','EPSG','1773','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20915','GSK-2011 / Gauss-Kruger zone 15',NULL,'EPSG','4530','EPSG','7683','EPSG','16215',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15481','projected_crs','EPSG','20915','EPSG','1774','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20916','GSK-2011 / Gauss-Kruger zone 16',NULL,'EPSG','4530','EPSG','7683','EPSG','16216',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15482','projected_crs','EPSG','20916','EPSG','1775','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20917','GSK-2011 / Gauss-Kruger zone 17',NULL,'EPSG','4530','EPSG','7683','EPSG','16217',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15483','projected_crs','EPSG','20917','EPSG','1776','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20918','GSK-2011 / Gauss-Kruger zone 18',NULL,'EPSG','4530','EPSG','7683','EPSG','16218',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15567','projected_crs','EPSG','20918','EPSG','1777','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20919','GSK-2011 / Gauss-Kruger zone 19',NULL,'EPSG','4530','EPSG','7683','EPSG','16219',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15485','projected_crs','EPSG','20919','EPSG','1778','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20920','GSK-2011 / Gauss-Kruger zone 20',NULL,'EPSG','4530','EPSG','7683','EPSG','16220',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15487','projected_crs','EPSG','20920','EPSG','1779','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20921','GSK-2011 / Gauss-Kruger zone 21',NULL,'EPSG','4530','EPSG','7683','EPSG','16221',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15488','projected_crs','EPSG','20921','EPSG','1780','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20922','GSK-2011 / Gauss-Kruger zone 22',NULL,'EPSG','4530','EPSG','7683','EPSG','16222',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15489','projected_crs','EPSG','20922','EPSG','1781','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20923','GSK-2011 / Gauss-Kruger zone 23',NULL,'EPSG','4530','EPSG','7683','EPSG','16223',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15490','projected_crs','EPSG','20923','EPSG','1782','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20924','GSK-2011 / Gauss-Kruger zone 24',NULL,'EPSG','4530','EPSG','7683','EPSG','16224',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15491','projected_crs','EPSG','20924','EPSG','1783','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20925','GSK-2011 / Gauss-Kruger zone 25',NULL,'EPSG','4530','EPSG','7683','EPSG','16225',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15492','projected_crs','EPSG','20925','EPSG','1784','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20926','GSK-2011 / Gauss-Kruger zone 26',NULL,'EPSG','4530','EPSG','7683','EPSG','16226',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15493','projected_crs','EPSG','20926','EPSG','1785','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20927','GSK-2011 / Gauss-Kruger zone 27',NULL,'EPSG','4530','EPSG','7683','EPSG','16227',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15494','projected_crs','EPSG','20927','EPSG','1786','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20928','GSK-2011 / Gauss-Kruger zone 28',NULL,'EPSG','4530','EPSG','7683','EPSG','16228',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15499','projected_crs','EPSG','20928','EPSG','1787','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20929','GSK-2011 / Gauss-Kruger zone 29',NULL,'EPSG','4530','EPSG','7683','EPSG','16229',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15495','projected_crs','EPSG','20929','EPSG','1788','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20930','GSK-2011 / Gauss-Kruger zone 30',NULL,'EPSG','4530','EPSG','7683','EPSG','16230',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15496','projected_crs','EPSG','20930','EPSG','1789','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20931','GSK-2011 / Gauss-Kruger zone 31',NULL,'EPSG','4530','EPSG','7683','EPSG','16231',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15497','projected_crs','EPSG','20931','EPSG','1790','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','20932','GSK-2011 / Gauss-Kruger zone 32',NULL,'EPSG','4530','EPSG','7683','EPSG','16232',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15498','projected_crs','EPSG','20932','EPSG','1791','EPSG','1211');
 INSERT INTO "projected_crs" VALUES('EPSG','20934','Arc 1950 / UTM zone 34S',NULL,'EPSG','4400','EPSG','4209','EPSG','16134',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6274','projected_crs','EPSG','20934','EPSG','1575','EPSG','1142');
 INSERT INTO "projected_crs" VALUES('EPSG','20935','Arc 1950 / UTM zone 35S',NULL,'EPSG','4400','EPSG','4209','EPSG','16135',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6275','projected_crs','EPSG','20935','EPSG','1576','EPSG','1142');
 INSERT INTO "projected_crs" VALUES('EPSG','20936','Arc 1950 / UTM zone 36S',NULL,'EPSG','4400','EPSG','4209','EPSG','16136',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6276','projected_crs','EPSG','20936','EPSG','1577','EPSG','1142');
+INSERT INTO "projected_crs" VALUES('EPSG','21004','GSK-2011 / Gauss-Kruger CM 21E',NULL,'EPSG','4530','EPSG','7683','EPSG','16304',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15563','projected_crs','EPSG','21004','EPSG','1763','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21005','GSK-2011 / Gauss-Kruger CM 27E',NULL,'EPSG','4530','EPSG','7683','EPSG','16305',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15535','projected_crs','EPSG','21005','EPSG','1764','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21006','GSK-2011 / Gauss-Kruger CM 33E',NULL,'EPSG','4530','EPSG','7683','EPSG','16306',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15536','projected_crs','EPSG','21006','EPSG','1765','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21007','GSK-2011 / Gauss-Kruger CM 39E',NULL,'EPSG','4530','EPSG','7683','EPSG','16307',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15537','projected_crs','EPSG','21007','EPSG','1766','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21008','GSK-2011 / Gauss-Kruger CM 45E',NULL,'EPSG','4530','EPSG','7683','EPSG','16308',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15538','projected_crs','EPSG','21008','EPSG','1767','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21009','GSK-2011 / Gauss-Kruger CM 51E',NULL,'EPSG','4530','EPSG','7683','EPSG','16309',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15564','projected_crs','EPSG','21009','EPSG','1768','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21010','GSK-2011 / Gauss-Kruger CM 57E',NULL,'EPSG','4530','EPSG','7683','EPSG','16310',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15540','projected_crs','EPSG','21010','EPSG','1769','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21011','GSK-2011 / Gauss-Kruger CM 63E',NULL,'EPSG','4530','EPSG','7683','EPSG','16311',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15541','projected_crs','EPSG','21011','EPSG','1770','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21012','GSK-2011 / Gauss-Kruger CM 69E',NULL,'EPSG','4530','EPSG','7683','EPSG','16312',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15542','projected_crs','EPSG','21012','EPSG','1771','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21013','GSK-2011 / Gauss-Kruger CM 75E',NULL,'EPSG','4530','EPSG','7683','EPSG','16313',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15543','projected_crs','EPSG','21013','EPSG','1772','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21014','GSK-2011 / Gauss-Kruger CM 81E',NULL,'EPSG','4530','EPSG','7683','EPSG','16314',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15544','projected_crs','EPSG','21014','EPSG','1773','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21015','GSK-2011 / Gauss-Kruger CM 87E',NULL,'EPSG','4530','EPSG','7683','EPSG','16315',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15545','projected_crs','EPSG','21015','EPSG','1774','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21016','GSK-2011 / Gauss-Kruger CM 93E',NULL,'EPSG','4530','EPSG','7683','EPSG','16316',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15546','projected_crs','EPSG','21016','EPSG','1775','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21017','GSK-2011 / Gauss-Kruger CM 99E',NULL,'EPSG','4530','EPSG','7683','EPSG','16317',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15547','projected_crs','EPSG','21017','EPSG','1776','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21018','GSK-2011 / Gauss-Kruger CM 105E',NULL,'EPSG','4530','EPSG','7683','EPSG','16318',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15548','projected_crs','EPSG','21018','EPSG','1777','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21019','GSK-2011 / Gauss-Kruger CM 111E',NULL,'EPSG','4530','EPSG','7683','EPSG','16319',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15549','projected_crs','EPSG','21019','EPSG','1778','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21020','GSK-2011 / Gauss-Kruger CM 117E',NULL,'EPSG','4530','EPSG','7683','EPSG','16320',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15550','projected_crs','EPSG','21020','EPSG','1779','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21021','GSK-2011 / Gauss-Kruger CM 123E',NULL,'EPSG','4530','EPSG','7683','EPSG','16321',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15551','projected_crs','EPSG','21021','EPSG','1780','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21022','GSK-2011 / Gauss-Kruger CM 129E',NULL,'EPSG','4530','EPSG','7683','EPSG','16322',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15552','projected_crs','EPSG','21022','EPSG','1781','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21023','GSK-2011 / Gauss-Kruger CM 135E',NULL,'EPSG','4530','EPSG','7683','EPSG','16323',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15553','projected_crs','EPSG','21023','EPSG','1782','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21024','GSK-2011 / Gauss-Kruger CM 141E',NULL,'EPSG','4530','EPSG','7683','EPSG','16324',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15554','projected_crs','EPSG','21024','EPSG','1783','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21025','GSK-2011 / Gauss-Kruger CM 147E',NULL,'EPSG','4530','EPSG','7683','EPSG','16325',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15555','projected_crs','EPSG','21025','EPSG','1784','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21026','GSK-2011 / Gauss-Kruger CM 153E',NULL,'EPSG','4530','EPSG','7683','EPSG','16326',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15556','projected_crs','EPSG','21026','EPSG','1785','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21027','GSK-2011 / Gauss-Kruger CM 159E',NULL,'EPSG','4530','EPSG','7683','EPSG','16327',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15557','projected_crs','EPSG','21027','EPSG','1786','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21028','GSK-2011 / Gauss-Kruger CM 165E',NULL,'EPSG','4530','EPSG','7683','EPSG','16328',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15558','projected_crs','EPSG','21028','EPSG','1787','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21029','GSK-2011 / Gauss-Kruger CM 171E',NULL,'EPSG','4530','EPSG','7683','EPSG','16329',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15559','projected_crs','EPSG','21029','EPSG','1788','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21030','GSK-2011 / Gauss-Kruger CM 177E',NULL,'EPSG','4530','EPSG','7683','EPSG','16330',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15560','projected_crs','EPSG','21030','EPSG','1789','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21031','GSK-2011 / Gauss-Kruger CM 177W',NULL,'EPSG','4530','EPSG','7683','EPSG','16331',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15561','projected_crs','EPSG','21031','EPSG','1790','EPSG','1211');
+INSERT INTO "projected_crs" VALUES('EPSG','21032','GSK-2011 / Gauss-Kruger CM 171W',NULL,'EPSG','4530','EPSG','7683','EPSG','16332',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','15562','projected_crs','EPSG','21032','EPSG','1791','EPSG','1211');
 INSERT INTO "projected_crs" VALUES('EPSG','21035','Arc 1960 / UTM zone 35S',NULL,'EPSG','4400','EPSG','4210','EPSG','16135',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6277','projected_crs','EPSG','21035','EPSG','1579','EPSG','1142');
 INSERT INTO "projected_crs" VALUES('EPSG','21036','Arc 1960 / UTM zone 36S',NULL,'EPSG','4400','EPSG','4210','EPSG','16136',NULL,0);
-- 
cgit v1.2.3

