From a2c438509f64d21c7f9ddb47dcb8f71712ecedef Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Thu, 8 Jul 2021 13:54:51 +0200
Subject: Database: update to EPSG v10.028

---
 data/sql/projected_crs.sql | 232 +++++++++++++++++++++++++++++++++++++++++++++
 1 file changed, 232 insertions(+)

(limited to 'data/sql/projected_crs.sql')

diff --git a/data/sql/projected_crs.sql b/data/sql/projected_crs.sql
index 072de7d1..7ee0518b 100644
--- a/data/sql/projected_crs.sql
+++ b/data/sql/projected_crs.sql
@@ -7663,10 +7663,242 @@ INSERT INTO "projected_crs" VALUES('EPSG','21149','Batavia / UTM zone 49S',NULL,
 INSERT INTO "usage" VALUES('EPSG','6285','projected_crs','EPSG','21149','EPSG','1586','EPSG','1142');
 INSERT INTO "projected_crs" VALUES('EPSG','21150','Batavia / UTM zone 50S',NULL,'EPSG','4400','EPSG','4211','EPSG','16150',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6286','projected_crs','EPSG','21150','EPSG','1585','EPSG','1142');
+INSERT INTO "projected_crs" VALUES('EPSG','21207','GSK-2011 / GSK 3GK zone 7',NULL,'EPSG','4530','EPSG','7683','EPSG','16907',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16450','projected_crs','EPSG','21207','EPSG','2747','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21208','GSK-2011 / GSK 3GK zone 8',NULL,'EPSG','4530','EPSG','7683','EPSG','16908',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16452','projected_crs','EPSG','21208','EPSG','2748','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21209','GSK-2011 / GSK 3GK zone 9',NULL,'EPSG','4530','EPSG','7683','EPSG','16909',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16453','projected_crs','EPSG','21209','EPSG','2749','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21210','GSK-2011 / GSK 3GK zone 10',NULL,'EPSG','4530','EPSG','7683','EPSG','16910',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16454','projected_crs','EPSG','21210','EPSG','2750','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21211','GSK-2011 / GSK 3GK zone 11',NULL,'EPSG','4530','EPSG','7683','EPSG','16911',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16455','projected_crs','EPSG','21211','EPSG','2751','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21212','GSK-2011 / GSK 3GK zone 12',NULL,'EPSG','4530','EPSG','7683','EPSG','16912',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16456','projected_crs','EPSG','21212','EPSG','2752','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21213','GSK-2011 / GSK 3GK zone 13',NULL,'EPSG','4530','EPSG','7683','EPSG','16913',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16457','projected_crs','EPSG','21213','EPSG','2753','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21214','GSK-2011 / GSK 3GK zone 14',NULL,'EPSG','4530','EPSG','7683','EPSG','16914',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16458','projected_crs','EPSG','21214','EPSG','2754','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21215','GSK-2011 / GSK 3GK zone 15',NULL,'EPSG','4530','EPSG','7683','EPSG','16915',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16459','projected_crs','EPSG','21215','EPSG','2755','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21216','GSK-2011 / GSK 3GK zone 16',NULL,'EPSG','4530','EPSG','7683','EPSG','16916',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16460','projected_crs','EPSG','21216','EPSG','2756','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21217','GSK-2011 / GSK 3GK zone 17',NULL,'EPSG','4530','EPSG','7683','EPSG','16917',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16461','projected_crs','EPSG','21217','EPSG','2757','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21218','GSK-2011 / GSK 3GK zone 18',NULL,'EPSG','4530','EPSG','7683','EPSG','16918',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16462','projected_crs','EPSG','21218','EPSG','2758','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21219','GSK-2011 / GSK 3GK zone 19',NULL,'EPSG','4530','EPSG','7683','EPSG','16919',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16463','projected_crs','EPSG','21219','EPSG','2759','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21220','GSK-2011 / GSK 3GK zone 20',NULL,'EPSG','4530','EPSG','7683','EPSG','16920',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16464','projected_crs','EPSG','21220','EPSG','2760','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21221','GSK-2011 / GSK 3GK zone 21',NULL,'EPSG','4530','EPSG','7683','EPSG','16921',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16465','projected_crs','EPSG','21221','EPSG','2761','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21222','GSK-2011 / GSK 3GK zone 22',NULL,'EPSG','4530','EPSG','7683','EPSG','16922',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16420','projected_crs','EPSG','21222','EPSG','2762','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21223','GSK-2011 / GSK 3GK zone 23',NULL,'EPSG','4530','EPSG','7683','EPSG','16923',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16421','projected_crs','EPSG','21223','EPSG','2763','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21224','GSK-2011 / GSK 3GK zone 24',NULL,'EPSG','4530','EPSG','7683','EPSG','16924',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16422','projected_crs','EPSG','21224','EPSG','2764','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21225','GSK-2011 / GSK 3GK zone 25',NULL,'EPSG','4530','EPSG','7683','EPSG','16925',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16423','projected_crs','EPSG','21225','EPSG','2765','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21226','GSK-2011 / GSK 3GK zone 26',NULL,'EPSG','4530','EPSG','7683','EPSG','16926',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16424','projected_crs','EPSG','21226','EPSG','2766','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21227','GSK-2011 / GSK 3GK zone 27',NULL,'EPSG','4530','EPSG','7683','EPSG','16927',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16425','projected_crs','EPSG','21227','EPSG','2767','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21228','GSK-2011 / GSK 3GK zone 28',NULL,'EPSG','4530','EPSG','7683','EPSG','16928',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16426','projected_crs','EPSG','21228','EPSG','2768','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21229','GSK-2011 / GSK 3GK zone 29',NULL,'EPSG','4530','EPSG','7683','EPSG','16929',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16501','projected_crs','EPSG','21229','EPSG','2769','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21230','GSK-2011 / GSK 3GK zone 30',NULL,'EPSG','4530','EPSG','7683','EPSG','16930',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16502','projected_crs','EPSG','21230','EPSG','2676','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21231','GSK-2011 / GSK 3GK zone 31',NULL,'EPSG','4530','EPSG','7683','EPSG','16931',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16442','projected_crs','EPSG','21231','EPSG','2677','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21232','GSK-2011 / GSK 3GK zone 32',NULL,'EPSG','4530','EPSG','7683','EPSG','16932',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16443','projected_crs','EPSG','21232','EPSG','2678','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21233','GSK-2011 / GSK 3GK zone 33',NULL,'EPSG','4530','EPSG','7683','EPSG','16933',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16444','projected_crs','EPSG','21233','EPSG','2679','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21234','GSK-2011 / GSK 3GK zone 34',NULL,'EPSG','4530','EPSG','7683','EPSG','16934',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16445','projected_crs','EPSG','21234','EPSG','2680','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21235','GSK-2011 / GSK 3GK zone 35',NULL,'EPSG','4530','EPSG','7683','EPSG','16935',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16446','projected_crs','EPSG','21235','EPSG','2681','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21236','GSK-2011 / GSK 3GK zone 36',NULL,'EPSG','4530','EPSG','7683','EPSG','16936',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16447','projected_crs','EPSG','21236','EPSG','2682','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21237','GSK-2011 / GSK 3GK zone 37',NULL,'EPSG','4530','EPSG','7683','EPSG','16937',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16392','projected_crs','EPSG','21237','EPSG','2683','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21238','GSK-2011 / GSK 3GK zone 38',NULL,'EPSG','4530','EPSG','7683','EPSG','16938',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16393','projected_crs','EPSG','21238','EPSG','2684','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21239','GSK-2011 / GSK 3GK zone 39',NULL,'EPSG','4530','EPSG','7683','EPSG','16939',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16394','projected_crs','EPSG','21239','EPSG','2685','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21240','GSK-2011 / GSK 3GK zone 40',NULL,'EPSG','4530','EPSG','7683','EPSG','16940',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16395','projected_crs','EPSG','21240','EPSG','2686','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21241','GSK-2011 / GSK 3GK zone 41',NULL,'EPSG','4530','EPSG','7683','EPSG','16941',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16396','projected_crs','EPSG','21241','EPSG','2687','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21242','GSK-2011 / GSK 3GK zone 42',NULL,'EPSG','4530','EPSG','7683','EPSG','16942',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16397','projected_crs','EPSG','21242','EPSG','2688','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21243','GSK-2011 / GSK 3GK zone 43',NULL,'EPSG','4530','EPSG','7683','EPSG','16943',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16398','projected_crs','EPSG','21243','EPSG','2689','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21244','GSK-2011 / GSK 3GK zone 44',NULL,'EPSG','4530','EPSG','7683','EPSG','16944',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16399','projected_crs','EPSG','21244','EPSG','2690','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21245','GSK-2011 / GSK 3GK zone 45',NULL,'EPSG','4530','EPSG','7683','EPSG','16945',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16400','projected_crs','EPSG','21245','EPSG','2691','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21246','GSK-2011 / GSK 3GK zone 46',NULL,'EPSG','4530','EPSG','7683','EPSG','16946',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16401','projected_crs','EPSG','21246','EPSG','2692','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21247','GSK-2011 / GSK 3GK zone 47',NULL,'EPSG','4530','EPSG','7683','EPSG','16947',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16402','projected_crs','EPSG','21247','EPSG','2693','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21248','GSK-2011 / GSK 3GK zone 48',NULL,'EPSG','4530','EPSG','7683','EPSG','16948',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16403','projected_crs','EPSG','21248','EPSG','2694','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21249','GSK-2011 / GSK 3GK zone 49',NULL,'EPSG','4530','EPSG','7683','EPSG','16949',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16404','projected_crs','EPSG','21249','EPSG','2695','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21250','GSK-2011 / GSK 3GK zone 50',NULL,'EPSG','4530','EPSG','7683','EPSG','16950',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16405','projected_crs','EPSG','21250','EPSG','2696','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21251','GSK-2011 / GSK 3GK zone 51',NULL,'EPSG','4530','EPSG','7683','EPSG','16951',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16365','projected_crs','EPSG','21251','EPSG','2697','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21252','GSK-2011 / GSK 3GK zone 52',NULL,'EPSG','4530','EPSG','7683','EPSG','16952',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16366','projected_crs','EPSG','21252','EPSG','2698','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21253','GSK-2011 / GSK 3GK zone 53',NULL,'EPSG','4530','EPSG','7683','EPSG','16953',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16367','projected_crs','EPSG','21253','EPSG','2699','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21254','GSK-2011 / GSK 3GK zone 54',NULL,'EPSG','4530','EPSG','7683','EPSG','16954',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16368','projected_crs','EPSG','21254','EPSG','2700','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21255','GSK-2011 / GSK 3GK zone 55',NULL,'EPSG','4530','EPSG','7683','EPSG','16955',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16369','projected_crs','EPSG','21255','EPSG','2701','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21256','GSK-2011 / GSK 3GK zone 56',NULL,'EPSG','4530','EPSG','7683','EPSG','16956',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16370','projected_crs','EPSG','21256','EPSG','2702','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21257','GSK-2011 / GSK 3GK zone 57',NULL,'EPSG','4530','EPSG','7683','EPSG','16957',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16371','projected_crs','EPSG','21257','EPSG','2703','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21258','GSK-2011 / GSK 3GK zone 58',NULL,'EPSG','4530','EPSG','7683','EPSG','16958',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16372','projected_crs','EPSG','21258','EPSG','2704','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21259','GSK-2011 / GSK 3GK zone 59',NULL,'EPSG','4530','EPSG','7683','EPSG','16959',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16373','projected_crs','EPSG','21259','EPSG','2705','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21260','GSK-2011 / GSK 3GK zone 60',NULL,'EPSG','4530','EPSG','7683','EPSG','16960',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16375','projected_crs','EPSG','21260','EPSG','2706','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21261','GSK-2011 / GSK 3GK zone 61',NULL,'EPSG','4530','EPSG','7683','EPSG','16961',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16376','projected_crs','EPSG','21261','EPSG','2707','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21262','GSK-2011 / GSK 3GK zone 62',NULL,'EPSG','4530','EPSG','7683','EPSG','16962',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16377','projected_crs','EPSG','21262','EPSG','2708','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21263','GSK-2011 / GSK 3GK zone 63',NULL,'EPSG','4530','EPSG','7683','EPSG','16963',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16378','projected_crs','EPSG','21263','EPSG','2709','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21264','GSK-2011 / GSK 3GK zone 64',NULL,'EPSG','4530','EPSG','7683','EPSG','16964',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16379','projected_crs','EPSG','21264','EPSG','2710','EPSG','1055');
 INSERT INTO "projected_crs" VALUES('EPSG','21291','Barbados 1938 / British West Indies Grid',NULL,'EPSG','4400','EPSG','4212','EPSG','19942',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6287','projected_crs','EPSG','21291','EPSG','3218','EPSG','1092');
 INSERT INTO "projected_crs" VALUES('EPSG','21292','Barbados 1938 / Barbados National Grid',NULL,'EPSG','4400','EPSG','4212','EPSG','19943',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6288','projected_crs','EPSG','21292','EPSG','3218','EPSG','1092');
+INSERT INTO "projected_crs" VALUES('EPSG','21307','GSK-2011 / GSK 3GK CM 21E',NULL,'EPSG','4530','EPSG','7683','EPSG','17107',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16451','projected_crs','EPSG','21307','EPSG','2747','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21308','GSK-2011 / GSK 3GK CM 24E',NULL,'EPSG','4530','EPSG','7683','EPSG','17108',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16466','projected_crs','EPSG','21308','EPSG','2748','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21309','GSK-2011 / GSK 3GK CM 27E',NULL,'EPSG','4530','EPSG','7683','EPSG','17109',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16467','projected_crs','EPSG','21309','EPSG','2749','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21310','GSK-2011 / GSK 3GK CM 30E',NULL,'EPSG','4530','EPSG','7683','EPSG','17110',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16468','projected_crs','EPSG','21310','EPSG','2750','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21311','GSK-2011 / GSK 3GK CM 33E',NULL,'EPSG','4530','EPSG','7683','EPSG','17111',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16469','projected_crs','EPSG','21311','EPSG','2751','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21312','GSK-2011 / GSK 3GK CM 36E',NULL,'EPSG','4530','EPSG','7683','EPSG','17112',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16470','projected_crs','EPSG','21312','EPSG','2752','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21313','GSK-2011 / GSK 3GK CM 39E',NULL,'EPSG','4530','EPSG','7683','EPSG','17113',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16479','projected_crs','EPSG','21313','EPSG','2753','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21314','GSK-2011 / GSK 3GK CM 42E',NULL,'EPSG','4530','EPSG','7683','EPSG','17114',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16471','projected_crs','EPSG','21314','EPSG','2754','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21315','GSK-2011 / GSK 3GK CM 45E',NULL,'EPSG','4530','EPSG','7683','EPSG','17115',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16472','projected_crs','EPSG','21315','EPSG','2755','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21316','GSK-2011 / GSK 3GK CM 48E',NULL,'EPSG','4530','EPSG','7683','EPSG','17116',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16473','projected_crs','EPSG','21316','EPSG','2756','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21317','GSK-2011 / GSK 3GK CM 51E',NULL,'EPSG','4530','EPSG','7683','EPSG','17117',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16474','projected_crs','EPSG','21317','EPSG','2757','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21318','GSK-2011 / GSK 3GK CM 54E',NULL,'EPSG','4530','EPSG','7683','EPSG','17118',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16475','projected_crs','EPSG','21318','EPSG','2758','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21319','GSK-2011 / GSK 3GK CM 57E',NULL,'EPSG','4530','EPSG','7683','EPSG','17119',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16476','projected_crs','EPSG','21319','EPSG','2759','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21320','GSK-2011 / GSK 3GK CM 60E',NULL,'EPSG','4530','EPSG','7683','EPSG','17120',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16477','projected_crs','EPSG','21320','EPSG','2760','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21321','GSK-2011 / GSK 3GK CM 63E',NULL,'EPSG','4530','EPSG','7683','EPSG','17121',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16478','projected_crs','EPSG','21321','EPSG','2761','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21322','GSK-2011 / GSK 3GK CM 66E',NULL,'EPSG','4530','EPSG','7683','EPSG','17122',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16448','projected_crs','EPSG','21322','EPSG','2762','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21323','GSK-2011 / GSK 3GK CM 69E',NULL,'EPSG','4530','EPSG','7683','EPSG','17123',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16430','projected_crs','EPSG','21323','EPSG','2763','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21324','GSK-2011 / GSK 3GK CM 72E',NULL,'EPSG','4530','EPSG','7683','EPSG','17124',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16449','projected_crs','EPSG','21324','EPSG','2764','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21325','GSK-2011 / GSK 3GK CM 75E',NULL,'EPSG','4530','EPSG','7683','EPSG','17125',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16431','projected_crs','EPSG','21325','EPSG','2765','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21326','GSK-2011 / GSK 3GK CM 78E',NULL,'EPSG','4530','EPSG','7683','EPSG','17126',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16432','projected_crs','EPSG','21326','EPSG','2766','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21327','GSK-2011 / GSK 3GK CM 81E',NULL,'EPSG','4530','EPSG','7683','EPSG','17127',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16433','projected_crs','EPSG','21327','EPSG','2767','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21328','GSK-2011 / GSK 3GK CM 84E',NULL,'EPSG','4530','EPSG','7683','EPSG','17128',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16434','projected_crs','EPSG','21328','EPSG','2768','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21329','GSK-2011 / GSK 3GK CM 87E',NULL,'EPSG','4530','EPSG','7683','EPSG','17129',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16435','projected_crs','EPSG','21329','EPSG','2769','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21330','GSK-2011 / GSK 3GK CM 90E',NULL,'EPSG','4530','EPSG','7683','EPSG','17130',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16436','projected_crs','EPSG','21330','EPSG','2676','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21331','GSK-2011 / GSK 3GK CM 93E',NULL,'EPSG','4530','EPSG','7683','EPSG','17131',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16437','projected_crs','EPSG','21331','EPSG','2677','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21332','GSK-2011 / GSK 3GK CM 96E',NULL,'EPSG','4530','EPSG','7683','EPSG','17132',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16429','projected_crs','EPSG','21332','EPSG','2678','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21333','GSK-2011 / GSK 3GK CM 99E',NULL,'EPSG','4530','EPSG','7683','EPSG','17133',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16438','projected_crs','EPSG','21333','EPSG','2679','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21334','GSK-2011 / GSK 3GK CM 102E',NULL,'EPSG','4530','EPSG','7683','EPSG','17134',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16439','projected_crs','EPSG','21334','EPSG','2680','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21335','GSK-2011 / GSK 3GK CM 105E',NULL,'EPSG','4530','EPSG','7683','EPSG','17135',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16440','projected_crs','EPSG','21335','EPSG','2681','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21336','GSK-2011 / GSK 3GK CM 108E',NULL,'EPSG','4530','EPSG','7683','EPSG','17136',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16441','projected_crs','EPSG','21336','EPSG','2682','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21337','GSK-2011 / GSK 3GK CM 111E',NULL,'EPSG','4530','EPSG','7683','EPSG','17137',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16406','projected_crs','EPSG','21337','EPSG','2683','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21338','GSK-2011 / GSK 3GK CM 114E',NULL,'EPSG','4530','EPSG','7683','EPSG','17138',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16407','projected_crs','EPSG','21338','EPSG','2684','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21339','GSK-2011 / GSK 3GK CM 117E',NULL,'EPSG','4530','EPSG','7683','EPSG','17139',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16408','projected_crs','EPSG','21339','EPSG','2685','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21340','GSK-2011 / GSK 3GK CM 120E',NULL,'EPSG','4530','EPSG','7683','EPSG','17140',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16409','projected_crs','EPSG','21340','EPSG','2686','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21341','GSK-2011 / GSK 3GK CM 123E',NULL,'EPSG','4530','EPSG','7683','EPSG','17141',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16481','projected_crs','EPSG','21341','EPSG','2687','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21342','GSK-2011 / GSK 3GK CM 126E',NULL,'EPSG','4530','EPSG','7683','EPSG','17142',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16411','projected_crs','EPSG','21342','EPSG','2688','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21343','GSK-2011 / GSK 3GK CM 129E',NULL,'EPSG','4530','EPSG','7683','EPSG','17143',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16412','projected_crs','EPSG','21343','EPSG','2689','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21344','GSK-2011 / GSK 3GK CM 132E',NULL,'EPSG','4530','EPSG','7683','EPSG','17144',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16413','projected_crs','EPSG','21344','EPSG','2690','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21345','GSK-2011 / GSK 3GK CM 135E',NULL,'EPSG','4530','EPSG','7683','EPSG','17145',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16414','projected_crs','EPSG','21345','EPSG','2691','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21346','GSK-2011 / GSK 3GK CM 138E',NULL,'EPSG','4530','EPSG','7683','EPSG','17146',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16415','projected_crs','EPSG','21346','EPSG','2692','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21347','GSK-2011 / GSK 3GK CM 141E',NULL,'EPSG','4530','EPSG','7683','EPSG','17147',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16416','projected_crs','EPSG','21347','EPSG','2693','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21348','GSK-2011 / GSK 3GK CM 144E',NULL,'EPSG','4530','EPSG','7683','EPSG','17148',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16417','projected_crs','EPSG','21348','EPSG','2694','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21349','GSK-2011 / GSK 3GK CM 147E',NULL,'EPSG','4530','EPSG','7683','EPSG','17149',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16418','projected_crs','EPSG','21349','EPSG','2695','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21350','GSK-2011 / GSK 3GK CM 150E',NULL,'EPSG','4530','EPSG','7683','EPSG','17150',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16419','projected_crs','EPSG','21350','EPSG','2696','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21351','GSK-2011 / GSK 3GK CM 153E',NULL,'EPSG','4530','EPSG','7683','EPSG','17151',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16380','projected_crs','EPSG','21351','EPSG','2697','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21352','GSK-2011 / GSK 3GK CM 156E',NULL,'EPSG','4530','EPSG','7683','EPSG','17152',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16381','projected_crs','EPSG','21352','EPSG','2698','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21353','GSK-2011 / GSK 3GK CM 159E',NULL,'EPSG','4530','EPSG','7683','EPSG','17153',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16382','projected_crs','EPSG','21353','EPSG','2699','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21354','GSK-2011 / GSK 3GK CM 162E',NULL,'EPSG','4530','EPSG','7683','EPSG','17154',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16383','projected_crs','EPSG','21354','EPSG','2700','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21355','GSK-2011 / GSK 3GK CM 165E',NULL,'EPSG','4530','EPSG','7683','EPSG','17155',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16384','projected_crs','EPSG','21355','EPSG','2701','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21356','GSK-2011 / GSK 3GK CM 168E',NULL,'EPSG','4530','EPSG','7683','EPSG','17156',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16385','projected_crs','EPSG','21356','EPSG','2702','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21357','GSK-2011 / GSK 3GK CM 171E',NULL,'EPSG','4530','EPSG','7683','EPSG','17157',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16386','projected_crs','EPSG','21357','EPSG','2703','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21358','GSK-2011 / GSK 3GK CM 174E',NULL,'EPSG','4530','EPSG','7683','EPSG','17158',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16374','projected_crs','EPSG','21358','EPSG','2704','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21359','GSK-2011 / GSK 3GK CM 177E',NULL,'EPSG','4530','EPSG','7683','EPSG','17159',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16387','projected_crs','EPSG','21359','EPSG','2705','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21360','GSK-2011 / GSK 3GK CM 180E',NULL,'EPSG','4530','EPSG','7683','EPSG','17160',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16388','projected_crs','EPSG','21360','EPSG','2706','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21361','GSK-2011 / GSK 3GK CM 177W',NULL,'EPSG','4530','EPSG','7683','EPSG','17161',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16389','projected_crs','EPSG','21361','EPSG','2707','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21362','GSK-2011 / GSK 3GK CM 174W',NULL,'EPSG','4530','EPSG','7683','EPSG','17162',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16390','projected_crs','EPSG','21362','EPSG','2708','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21363','GSK-2011 / GSK 3GK CM 171W',NULL,'EPSG','4530','EPSG','7683','EPSG','17163',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16483','projected_crs','EPSG','21363','EPSG','2709','EPSG','1055');
+INSERT INTO "projected_crs" VALUES('EPSG','21364','GSK-2011 / GSK 3GK CM 168W',NULL,'EPSG','4530','EPSG','7683','EPSG','17164',NULL,0);
+INSERT INTO "usage" VALUES('EPSG','16484','projected_crs','EPSG','21364','EPSG','2710','EPSG','1055');
 INSERT INTO "projected_crs" VALUES('EPSG','21413','Beijing 1954 / Gauss-Kruger zone 13',NULL,'EPSG','4530','EPSG','4214','EPSG','16213',NULL,0);
 INSERT INTO "usage" VALUES('EPSG','6289','projected_crs','EPSG','21413','EPSG','1587','EPSG','1211');
 INSERT INTO "projected_crs" VALUES('EPSG','21414','Beijing 1954 / Gauss-Kruger zone 14',NULL,'EPSG','4530','EPSG','4214','EPSG','16214',NULL,0);
-- 
cgit v1.2.3

