From 389b2a1378a726c0ef3fe6dabc505ed0e2ef6a85 Mon Sep 17 00:00:00 2001
From: Even Rouault <even.rouault@spatialys.com>
Date: Tue, 7 Dec 2021 19:32:31 +0100
Subject: Merge pull request #2973 from rouault/epsg_10_041

Database: update to EPSG v10.041
---
 data/sql/vertical_crs.sql | 84 +++++++++++++++++++++++------------------------
 1 file changed, 42 insertions(+), 42 deletions(-)

(limited to 'data/sql/vertical_crs.sql')

diff --git a/data/sql/vertical_crs.sql b/data/sql/vertical_crs.sql
index 153dc3af..1310c508 100644
--- a/data/sql/vertical_crs.sql
+++ b/data/sql/vertical_crs.sql
@@ -20,6 +20,8 @@ INSERT INTO "vertical_crs" VALUES('EPSG','5237','SLVD height',NULL,'EPSG','6499'
 INSERT INTO "usage" VALUES('EPSG','3876','vertical_crs','EPSG','5237','EPSG','3310','EPSG','1178');
 INSERT INTO "vertical_crs" VALUES('EPSG','5317','FVR09 height',NULL,'EPSG','6499','EPSG','1059',0);
 INSERT INTO "usage" VALUES('EPSG','3924','vertical_crs','EPSG','5317','EPSG','3248','EPSG','1029');
+INSERT INTO "vertical_crs" VALUES('EPSG','5336','Black Sea depth',NULL,'EPSG','6498','EPSG','5134',0);
+INSERT INTO "usage" VALUES('EPSG','3936','vertical_crs','EPSG','5336','EPSG','1102','EPSG','1198');
 INSERT INTO "vertical_crs" VALUES('EPSG','5597','FCSVR10 height',NULL,'EPSG','6499','EPSG','1079',0);
 INSERT INTO "usage" VALUES('EPSG','4067','vertical_crs','EPSG','5597','EPSG','3890','EPSG','1139');
 INSERT INTO "vertical_crs" VALUES('EPSG','5600','NGPF height',NULL,'EPSG','6499','EPSG','5195',0);
@@ -46,8 +48,12 @@ INSERT INTO "vertical_crs" VALUES('EPSG','5610','HVRS71 height',NULL,'EPSG','649
 INSERT INTO "usage" VALUES('EPSG','4079','vertical_crs','EPSG','5610','EPSG','3234','EPSG','1178');
 INSERT INTO "vertical_crs" VALUES('EPSG','5611','Caspian height',NULL,'EPSG','6499','EPSG','5106',0);
 INSERT INTO "usage" VALUES('EPSG','4080','vertical_crs','EPSG','5611','EPSG','1291','EPSG','1136');
+INSERT INTO "vertical_crs" VALUES('EPSG','5612','Baltic 1977 depth',NULL,'EPSG','6498','EPSG','5105',0);
+INSERT INTO "usage" VALUES('EPSG','4081','vertical_crs','EPSG','5612','EPSG','2423','EPSG','1136');
 INSERT INTO "vertical_crs" VALUES('EPSG','5613','RH2000 height',NULL,'EPSG','6499','EPSG','5208',0);
 INSERT INTO "usage" VALUES('EPSG','4082','vertical_crs','EPSG','5613','EPSG','3313','EPSG','1179');
+INSERT INTO "vertical_crs" VALUES('EPSG','5614','KOC WD depth (ft)',NULL,'EPSG','6495','EPSG','5187',0);
+INSERT INTO "usage" VALUES('EPSG','4083','vertical_crs','EPSG','5614','EPSG','3267','EPSG','1205');
 INSERT INTO "vertical_crs" VALUES('EPSG','5615','RH00 height',NULL,'EPSG','6499','EPSG','5209',0);
 INSERT INTO "usage" VALUES('EPSG','4084','vertical_crs','EPSG','5615','EPSG','3313','EPSG','1029');
 INSERT INTO "vertical_crs" VALUES('EPSG','5616','IGN 1988 LS height',NULL,'EPSG','6499','EPSG','5210',0);
@@ -72,6 +78,8 @@ INSERT INTO "vertical_crs" VALUES('EPSG','5704','Yellow Sea',NULL,'EPSG','6499',
 INSERT INTO "usage" VALUES('EPSG','4147','vertical_crs','EPSG','5704','EPSG','1067','EPSG','1179');
 INSERT INTO "vertical_crs" VALUES('EPSG','5705','Baltic 1977 height',NULL,'EPSG','6499','EPSG','5105',0);
 INSERT INTO "usage" VALUES('EPSG','4148','vertical_crs','EPSG','5705','EPSG','2423','EPSG','1179');
+INSERT INTO "vertical_crs" VALUES('EPSG','5706','Caspian depth',NULL,'EPSG','6498','EPSG','5106',0);
+INSERT INTO "usage" VALUES('EPSG','4149','vertical_crs','EPSG','5706','EPSG','1291','EPSG','1198');
 INSERT INTO "vertical_crs" VALUES('EPSG','5709','NAP height',NULL,'EPSG','6499','EPSG','5109',0);
 INSERT INTO "usage" VALUES('EPSG','4152','vertical_crs','EPSG','5709','EPSG','1172','EPSG','1179');
 INSERT INTO "vertical_crs" VALUES('EPSG','5710','Ostend height',NULL,'EPSG','6499','EPSG','5110',0);
@@ -84,6 +92,8 @@ INSERT INTO "vertical_crs" VALUES('EPSG','5713','CGVD28 height',NULL,'EPSG','649
 INSERT INTO "usage" VALUES('EPSG','4156','vertical_crs','EPSG','5713','EPSG','1289','EPSG','1179');
 INSERT INTO "vertical_crs" VALUES('EPSG','5714','MSL height',NULL,'EPSG','6499','EPSG','5100',0);
 INSERT INTO "usage" VALUES('EPSG','4157','vertical_crs','EPSG','5714','EPSG','1262','EPSG','1199');
+INSERT INTO "vertical_crs" VALUES('EPSG','5715','MSL depth',NULL,'EPSG','6498','EPSG','5100',0);
+INSERT INTO "usage" VALUES('EPSG','4158','vertical_crs','EPSG','5715','EPSG','1262','EPSG','1199');
 INSERT INTO "vertical_crs" VALUES('EPSG','5716','Piraeus height',NULL,'EPSG','6499','EPSG','5115',0);
 INSERT INTO "usage" VALUES('EPSG','4159','vertical_crs','EPSG','5716','EPSG','3254','EPSG','1179');
 INSERT INTO "vertical_crs" VALUES('EPSG','5717','N60 height',NULL,'EPSG','6499','EPSG','5116',0);
@@ -120,6 +130,8 @@ INSERT INTO "vertical_crs" VALUES('EPSG','5732','Belfast height',NULL,'EPSG','64
 INSERT INTO "usage" VALUES('EPSG','4175','vertical_crs','EPSG','5732','EPSG','2530','EPSG','1209');
 INSERT INTO "vertical_crs" VALUES('EPSG','5733','DNN height',NULL,'EPSG','6499','EPSG','5132',0);
 INSERT INTO "usage" VALUES('EPSG','4176','vertical_crs','EPSG','5733','EPSG','3237','EPSG','1142');
+INSERT INTO "vertical_crs" VALUES('EPSG','5734','AIOC95 depth',NULL,'EPSG','6498','EPSG','5133',0);
+INSERT INTO "usage" VALUES('EPSG','4177','vertical_crs','EPSG','5734','EPSG','2592','EPSG','1136');
 INSERT INTO "vertical_crs" VALUES('EPSG','5735','Black Sea height',NULL,'EPSG','6499','EPSG','5134',0);
 INSERT INTO "usage" VALUES('EPSG','4178','vertical_crs','EPSG','5735','EPSG','3251','EPSG','1153');
 INSERT INTO "vertical_crs" VALUES('EPSG','5736','Yellow Sea 1956 height',NULL,'EPSG','6499','EPSG','5104',0);
@@ -228,6 +240,8 @@ INSERT INTO "vertical_crs" VALUES('EPSG','5787','EOMA 1980 height',NULL,'EPSG','
 INSERT INTO "usage" VALUES('EPSG','4230','vertical_crs','EPSG','5787','EPSG','1119','EPSG','1178');
 INSERT INTO "vertical_crs" VALUES('EPSG','5788','Kuwait PWD height',NULL,'EPSG','6499','EPSG','5186',0);
 INSERT INTO "usage" VALUES('EPSG','4231','vertical_crs','EPSG','5788','EPSG','3267','EPSG','1248');
+INSERT INTO "vertical_crs" VALUES('EPSG','5789','KOC WD depth',NULL,'EPSG','6498','EPSG','5187',0);
+INSERT INTO "usage" VALUES('EPSG','4232','vertical_crs','EPSG','5789','EPSG','3267','EPSG','1205');
 INSERT INTO "vertical_crs" VALUES('EPSG','5790','KOC CD height',NULL,'EPSG','6499','EPSG','5188',0);
 INSERT INTO "usage" VALUES('EPSG','4233','vertical_crs','EPSG','5790','EPSG','3267','EPSG','1206');
 INSERT INTO "vertical_crs" VALUES('EPSG','5791','NGC 1948 height',NULL,'EPSG','6499','EPSG','5189',0);
@@ -250,6 +264,8 @@ INSERT INTO "vertical_crs" VALUES('EPSG','5799','DVR90 height',NULL,'EPSG','6499
 INSERT INTO "usage" VALUES('EPSG','4242','vertical_crs','EPSG','5799','EPSG','3237','EPSG','1142');
 INSERT INTO "vertical_crs" VALUES('EPSG','5829','Instantaneous Water Level height',NULL,'EPSG','6499','EPSG','5113',0);
 INSERT INTO "usage" VALUES('EPSG','4267','vertical_crs','EPSG','5829','EPSG','1262','EPSG','1200');
+INSERT INTO "vertical_crs" VALUES('EPSG','5831','Instantaneous Water Level depth',NULL,'EPSG','6498','EPSG','5113',0);
+INSERT INTO "usage" VALUES('EPSG','4269','vertical_crs','EPSG','5831','EPSG','1262','EPSG','1200');
 INSERT INTO "vertical_crs" VALUES('EPSG','5843','Ras Ghumays height',NULL,'EPSG','6499','EPSG','1146',0);
 INSERT INTO "usage" VALUES('EPSG','4278','vertical_crs','EPSG','5843','EPSG','4225','EPSG','1142');
 INSERT INTO "vertical_crs" VALUES('EPSG','5861','LAT depth',NULL,'EPSG','6498','EPSG','1080',0);
@@ -308,6 +324,14 @@ INSERT INTO "vertical_crs" VALUES('EPSG','6186','Cais da Vila do Porto height',N
 INSERT INTO "usage" VALUES('EPSG','4505','vertical_crs','EPSG','6186','EPSG','4126','EPSG','1178');
 INSERT INTO "vertical_crs" VALUES('EPSG','6187','Ponta Delgada height',NULL,'EPSG','6499','EPSG','1110',0);
 INSERT INTO "usage" VALUES('EPSG','4506','vertical_crs','EPSG','6187','EPSG','2871','EPSG','1178');
+INSERT INTO "vertical_crs" VALUES('EPSG','6357','NAVD88 depth',NULL,'EPSG','6498','EPSG','5103',0);
+INSERT INTO "usage" VALUES('EPSG','4591','vertical_crs','EPSG','6357','EPSG','4161','EPSG','1179');
+INSERT INTO "vertical_crs" VALUES('EPSG','6358','NAVD88 depth (ftUS)',NULL,'EPSG','1043','EPSG','5103',0);
+INSERT INTO "usage" VALUES('EPSG','4592','vertical_crs','EPSG','6358','EPSG','3664','EPSG','1179');
+INSERT INTO "vertical_crs" VALUES('EPSG','6359','NGVD29 depth (ftUS)',NULL,'EPSG','1043','EPSG','5102',0);
+INSERT INTO "usage" VALUES('EPSG','4593','vertical_crs','EPSG','6359','EPSG','1323','EPSG','1179');
+INSERT INTO "vertical_crs" VALUES('EPSG','6360','NAVD88 height (ftUS)',NULL,'EPSG','6497','EPSG','5103',0);
+INSERT INTO "usage" VALUES('EPSG','4594','vertical_crs','EPSG','6360','EPSG','3664','EPSG','1179');
 INSERT INTO "vertical_crs" VALUES('EPSG','6638','Tutuila 1962 height',NULL,'EPSG','6499','EPSG','1121',0);
 INSERT INTO "usage" VALUES('EPSG','4859','vertical_crs','EPSG','6638','EPSG','2288','EPSG','1178');
 INSERT INTO "vertical_crs" VALUES('EPSG','6639','Guam 1963 height',NULL,'EPSG','6499','EPSG','1122',0);
@@ -360,16 +384,34 @@ INSERT INTO "vertical_crs" VALUES('EPSG','7889','St. Helena Tritan 2011 height',
 INSERT INTO "usage" VALUES('EPSG','5531','vertical_crs','EPSG','7889','EPSG','3183','EPSG','1145');
 INSERT INTO "vertical_crs" VALUES('EPSG','7890','SHVD2015 height',NULL,'EPSG','6499','EPSG','1177',0);
 INSERT INTO "usage" VALUES('EPSG','5532','vertical_crs','EPSG','7890','EPSG','3183','EPSG','1027');
+INSERT INTO "vertical_crs" VALUES('EPSG','7962','Poolbeg height (m)',NULL,'EPSG','6499','EPSG','5152',0);
+INSERT INTO "usage" VALUES('EPSG','5568','vertical_crs','EPSG','7962','EPSG','1305','EPSG','1203');
+INSERT INTO "vertical_crs" VALUES('EPSG','7968','NGVD29 height (m)',NULL,'EPSG','6499','EPSG','5102',0);
+INSERT INTO "usage" VALUES('EPSG','5569','vertical_crs','EPSG','7968','EPSG','1323','EPSG','1203');
+INSERT INTO "vertical_crs" VALUES('EPSG','7976','HKPD depth',NULL,'EPSG','6498','EPSG','5135',0);
+INSERT INTO "usage" VALUES('EPSG','5570','vertical_crs','EPSG','7976','EPSG','3334','EPSG','1203');
 INSERT INTO "vertical_crs" VALUES('EPSG','7979','KOC WD height',NULL,'EPSG','6499','EPSG','5187',0);
 INSERT INTO "usage" VALUES('EPSG','5571','vertical_crs','EPSG','7979','EPSG','3267','EPSG','1205');
+INSERT INTO "vertical_crs" VALUES('EPSG','8050','MSL height (ft)',NULL,'EPSG','1030','EPSG','5100',0);
+INSERT INTO "usage" VALUES('EPSG','5600','vertical_crs','EPSG','8050','EPSG','1262','EPSG','1199');
+INSERT INTO "vertical_crs" VALUES('EPSG','8051','MSL depth (ft)',NULL,'EPSG','6495','EPSG','5100',0);
+INSERT INTO "usage" VALUES('EPSG','5601','vertical_crs','EPSG','8051','EPSG','1262','EPSG','1199');
+INSERT INTO "vertical_crs" VALUES('EPSG','8052','MSL height (ftUS)',NULL,'EPSG','6497','EPSG','5100',0);
+INSERT INTO "usage" VALUES('EPSG','5602','vertical_crs','EPSG','8052','EPSG','1245','EPSG','1199');
+INSERT INTO "vertical_crs" VALUES('EPSG','8053','MSL depth (ftUS)',NULL,'EPSG','1043','EPSG','5100',0);
+INSERT INTO "usage" VALUES('EPSG','5603','vertical_crs','EPSG','8053','EPSG','1245','EPSG','1199');
 INSERT INTO "vertical_crs" VALUES('EPSG','8089','ISH2004 height',NULL,'EPSG','6499','EPSG','1190',0);
 INSERT INTO "usage" VALUES('EPSG','5616','vertical_crs','EPSG','8089','EPSG','3262','EPSG','1178');
+INSERT INTO "vertical_crs" VALUES('EPSG','8228','NAVD88 height (ft)',NULL,'EPSG','1030','EPSG','5103',0);
+INSERT INTO "usage" VALUES('EPSG','5736','vertical_crs','EPSG','8228','EPSG','4464','EPSG','1144');
 INSERT INTO "vertical_crs" VALUES('EPSG','8266','GVR2000 height',NULL,'EPSG','6499','EPSG','1199',0);
 INSERT INTO "usage" VALUES('EPSG','5758','vertical_crs','EPSG','8266','EPSG','4461','EPSG','1153');
 INSERT INTO "vertical_crs" VALUES('EPSG','8267','GVR2016 height',NULL,'EPSG','6499','EPSG','1200',0);
 INSERT INTO "usage" VALUES('EPSG','5759','vertical_crs','EPSG','8267','EPSG','4454','EPSG','1153');
 INSERT INTO "vertical_crs" VALUES('EPSG','8357','Baltic 1957 height',NULL,'EPSG','6499','EPSG','1202',0);
 INSERT INTO "usage" VALUES('EPSG','5803','vertical_crs','EPSG','8357','EPSG','1306','EPSG','1178');
+INSERT INTO "vertical_crs" VALUES('EPSG','8358','Baltic 1957 depth',NULL,'EPSG','6498','EPSG','1202',0);
+INSERT INTO "usage" VALUES('EPSG','5804','vertical_crs','EPSG','8358','EPSG','1306','EPSG','1178');
 INSERT INTO "vertical_crs" VALUES('EPSG','8378','EPSG example wellbore local vertical CRS',NULL,'EPSG','1049','EPSG','1205',0);
 INSERT INTO "usage" VALUES('EPSG','5808','vertical_crs','EPSG','8378','EPSG','4393','EPSG','1226');
 INSERT INTO "vertical_crs" VALUES('EPSG','8434','Macao height',NULL,'EPSG','6499','EPSG','1210',0);
@@ -462,45 +504,3 @@ INSERT INTO "vertical_crs" VALUES('EPSG','9721','Catania 1965 height',NULL,'EPSG
 INSERT INTO "usage" VALUES('EPSG','15276','vertical_crs','EPSG','9721','EPSG','2340','EPSG','1178');
 INSERT INTO "vertical_crs" VALUES('EPSG','9722','Cagliari 1956 height',NULL,'EPSG','6499','EPSG','1307',0);
 INSERT INTO "usage" VALUES('EPSG','15278','vertical_crs','EPSG','9722','EPSG','2339','EPSG','1178');
-INSERT INTO "vertical_crs" VALUES('EPSG','5336','Black Sea depth',NULL,'EPSG','6498','EPSG','5134',0);
-INSERT INTO "usage" VALUES('EPSG','3936','vertical_crs','EPSG','5336','EPSG','1102','EPSG','1198');
-INSERT INTO "vertical_crs" VALUES('EPSG','5612','Baltic 1977 depth',NULL,'EPSG','6498','EPSG','5105',0);
-INSERT INTO "usage" VALUES('EPSG','4081','vertical_crs','EPSG','5612','EPSG','2423','EPSG','1136');
-INSERT INTO "vertical_crs" VALUES('EPSG','5706','Caspian depth',NULL,'EPSG','6498','EPSG','5106',0);
-INSERT INTO "usage" VALUES('EPSG','4149','vertical_crs','EPSG','5706','EPSG','1291','EPSG','1198');
-INSERT INTO "vertical_crs" VALUES('EPSG','5715','MSL depth',NULL,'EPSG','6498','EPSG','5100',0);
-INSERT INTO "usage" VALUES('EPSG','4158','vertical_crs','EPSG','5715','EPSG','1262','EPSG','1199');
-INSERT INTO "vertical_crs" VALUES('EPSG','5734','AIOC95 depth',NULL,'EPSG','6498','EPSG','5133',0);
-INSERT INTO "usage" VALUES('EPSG','4177','vertical_crs','EPSG','5734','EPSG','2592','EPSG','1136');
-INSERT INTO "vertical_crs" VALUES('EPSG','5789','KOC WD depth',NULL,'EPSG','6498','EPSG','5187',0);
-INSERT INTO "usage" VALUES('EPSG','4232','vertical_crs','EPSG','5789','EPSG','3267','EPSG','1205');
-INSERT INTO "vertical_crs" VALUES('EPSG','5831','Instantaneous Water Level depth',NULL,'EPSG','6498','EPSG','5113',0);
-INSERT INTO "usage" VALUES('EPSG','4269','vertical_crs','EPSG','5831','EPSG','1262','EPSG','1200');
-INSERT INTO "vertical_crs" VALUES('EPSG','6357','NAVD88 depth',NULL,'EPSG','6498','EPSG','5103',0);
-INSERT INTO "usage" VALUES('EPSG','4591','vertical_crs','EPSG','6357','EPSG','4161','EPSG','1179');
-INSERT INTO "vertical_crs" VALUES('EPSG','6359','NGVD29 depth (ftUS)',NULL,'EPSG','1043','EPSG','5102',0);
-INSERT INTO "usage" VALUES('EPSG','4593','vertical_crs','EPSG','6359','EPSG','1323','EPSG','1179');
-INSERT INTO "vertical_crs" VALUES('EPSG','6360','NAVD88 height (ftUS)',NULL,'EPSG','6497','EPSG','5103',0);
-INSERT INTO "usage" VALUES('EPSG','4594','vertical_crs','EPSG','6360','EPSG','3664','EPSG','1179');
-INSERT INTO "vertical_crs" VALUES('EPSG','7962','Poolbeg height (m)',NULL,'EPSG','6499','EPSG','5152',0);
-INSERT INTO "usage" VALUES('EPSG','5568','vertical_crs','EPSG','7962','EPSG','1305','EPSG','1203');
-INSERT INTO "vertical_crs" VALUES('EPSG','7968','NGVD29 height (m)',NULL,'EPSG','6499','EPSG','5102',0);
-INSERT INTO "usage" VALUES('EPSG','5569','vertical_crs','EPSG','7968','EPSG','1323','EPSG','1203');
-INSERT INTO "vertical_crs" VALUES('EPSG','7976','HKPD depth',NULL,'EPSG','6498','EPSG','5135',0);
-INSERT INTO "usage" VALUES('EPSG','5570','vertical_crs','EPSG','7976','EPSG','3334','EPSG','1203');
-INSERT INTO "vertical_crs" VALUES('EPSG','8050','MSL height (ft)',NULL,'EPSG','1030','EPSG','5100',0);
-INSERT INTO "usage" VALUES('EPSG','5600','vertical_crs','EPSG','8050','EPSG','1262','EPSG','1199');
-INSERT INTO "vertical_crs" VALUES('EPSG','8052','MSL height (ftUS)',NULL,'EPSG','6497','EPSG','5100',0);
-INSERT INTO "usage" VALUES('EPSG','5602','vertical_crs','EPSG','8052','EPSG','1245','EPSG','1199');
-INSERT INTO "vertical_crs" VALUES('EPSG','8228','NAVD88 height (ft)',NULL,'EPSG','1030','EPSG','5103',0);
-INSERT INTO "usage" VALUES('EPSG','5736','vertical_crs','EPSG','8228','EPSG','4464','EPSG','1144');
-INSERT INTO "vertical_crs" VALUES('EPSG','8358','Baltic 1957 depth',NULL,'EPSG','6498','EPSG','1202',0);
-INSERT INTO "usage" VALUES('EPSG','5804','vertical_crs','EPSG','8358','EPSG','1306','EPSG','1178');
-INSERT INTO "vertical_crs" VALUES('EPSG','5614','KOC WD depth (ft)',NULL,'EPSG','6495','EPSG','5187',0);
-INSERT INTO "usage" VALUES('EPSG','4083','vertical_crs','EPSG','5614','EPSG','3267','EPSG','1205');
-INSERT INTO "vertical_crs" VALUES('EPSG','6358','NAVD88 depth (ftUS)',NULL,'EPSG','1043','EPSG','5103',0);
-INSERT INTO "usage" VALUES('EPSG','4592','vertical_crs','EPSG','6358','EPSG','3664','EPSG','1179');
-INSERT INTO "vertical_crs" VALUES('EPSG','8051','MSL depth (ft)',NULL,'EPSG','6495','EPSG','5100',0);
-INSERT INTO "usage" VALUES('EPSG','5601','vertical_crs','EPSG','8051','EPSG','1262','EPSG','1199');
-INSERT INTO "vertical_crs" VALUES('EPSG','8053','MSL depth (ftUS)',NULL,'EPSG','1043','EPSG','5100',0);
-INSERT INTO "usage" VALUES('EPSG','5603','vertical_crs','EPSG','8053','EPSG','1245','EPSG','1199');
-- 
cgit v1.2.3

