From e979bce36ccd2bc52cabc0b1192bc0f8d4ed6f33 Mon Sep 17 00:00:00 2001
From: Kristian Evers <kristianevers@gmail.com>
Date: Wed, 31 Jan 2018 10:56:11 +0100
Subject: Add pj_has_inverse().

With the introduction of the "inverted" flag on PJ objects
you can no longer rely on checking that the inv, inv3d and inv4d
functions are available on said PJ object. The function is used
internally a few places and otherwise exposed in proj_api.h to
ensure that users of the old programming interface can safely
check if an operation has an inverse.
---
 src/proj.def | 1 +
 1 file changed, 1 insertion(+)

(limited to 'src/proj.def')

diff --git a/src/proj.def b/src/proj.def
index f758477d..6ab0c007 100644
--- a/src/proj.def
+++ b/src/proj.def
@@ -154,3 +154,4 @@ EXPORTS
 
     pj_approx_2D_trans             @138
     pj_approx_3D_trans             @139
+    pj_has_inverse                 @140
-- 
cgit v1.2.3

