--- This file has been generated by scripts/build_db.py. DO NOT EDIT !

INSERT INTO "concatenated_operation_step" VALUES('EPSG','3896',1,'EPSG','3895');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','3896',2,'EPSG','1618');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','3966',1,'EPSG','3913');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','3966',2,'EPSG','3962');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','4435',1,'EPSG','1461');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','4435',2,'EPSG','1495');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','4837',1,'EPSG','1672');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','4837',2,'EPSG','1311');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5190',1,'EPSG','5134');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5190',2,'EPSG','5189');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5192',1,'EPSG','5134');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5192',2,'EPSG','5191');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5230',1,'EPSG','1884');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5230',2,'EPSG','4836');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5240',1,'EPSG','5238');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5240',2,'EPSG','5227');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5242',1,'EPSG','1884');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5242',2,'EPSG','5239');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5838',1,'EPSG','1756');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','5838',2,'EPSG','1988');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','6714',1,'EPSG','6712');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','6714',2,'EPSG','6713');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','6739',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','6739',2,'EPSG','1496');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','6874',1,'EPSG','1265');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','6874',2,'EPSG','6873');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7811',1,'EPSG','1763');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7811',2,'EPSG','15958');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7965',1,'EPSG','7963');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7965',2,'EPSG','7964');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7967',1,'EPSG','7963');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7967',2,'EPSG','7966');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7973',1,'EPSG','7972');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7973',2,'EPSG','7969');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7974',1,'EPSG','7972');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7974',2,'EPSG','7970');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7975',1,'EPSG','7972');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7975',2,'EPSG','7971');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7983',1,'EPSG','7982');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7983',2,'EPSG','7977');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7986',1,'EPSG','7980');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7986',2,'EPSG','7984');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7987',1,'EPSG','7980');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7987',2,'EPSG','7984');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','7987',3,'EPSG','7985');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8047',1,'EPSG','1147');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8047',2,'EPSG','1146');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8094',1,'EPSG','1763');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8094',2,'EPSG','1193');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8174',1,'EPSG','1755');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8174',2,'EPSG','1125');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8175',1,'EPSG','1262');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8175',2,'EPSG','1169');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8176',1,'EPSG','1265');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8176',2,'EPSG','1227');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8178',1,'EPSG','1759');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8178',2,'EPSG','1123');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8183',1,'EPSG','1273');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8183',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8186',1,'EPSG','1763');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8186',2,'EPSG','1276');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8188',1,'EPSG','1763');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8188',2,'EPSG','1277');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8190',1,'EPSG','1278');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8190',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8192',1,'EPSG','1279');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8192',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8194',1,'EPSG','1280');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8194',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8195',1,'EPSG','1437');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8195',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8199',1,'EPSG','1274');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8199',2,'EPSG','1283');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8211',1,'EPSG','1266');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8211',2,'EPSG','1294');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8215',1,'EPSG','1297');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8215',2,'EPSG','1302');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8217',1,'EPSG','1298');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8217',2,'EPSG','1302');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8219',1,'EPSG','1299');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8219',2,'EPSG','1302');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8221',1,'EPSG','1300');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8221',2,'EPSG','1302');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8223',1,'EPSG','1301');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8223',2,'EPSG','1302');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8234',1,'EPSG','1309');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8234',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8236',1,'EPSG','1310');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8236',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8243',1,'EPSG','1312');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8243',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8245',1,'EPSG','1313');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8245',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8263',1,'EPSG','1757');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8263',2,'EPSG','1306');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8363',1,'EPSG','8361');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8363',2,'EPSG','8362');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8386',1,'EPSG','1454');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8386',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8388',1,'EPSG','1455');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8388',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8390',1,'EPSG','1456');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8390',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8392',1,'EPSG','1457');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8392',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8394',1,'EPSG','1451');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8394',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8396',1,'EPSG','1458');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8396',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8398',1,'EPSG','1459');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8398',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8400',1,'EPSG','1460');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8400',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8402',1,'EPSG','1461');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8402',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8404',1,'EPSG','1462');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8404',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8406',1,'EPSG','1463');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8406',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8408',1,'EPSG','1464');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8408',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8418',1,'EPSG','1472');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8418',2,'EPSG','1473');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8419',1,'EPSG','1599');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8419',2,'EPSG','1473');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8420',1,'EPSG','1600');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8420',2,'EPSG','1473');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8421',1,'EPSG','1601');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8421',2,'EPSG','1473');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8422',1,'EPSG','1602');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8422',2,'EPSG','1473');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8442',1,'EPSG','8365');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8442',2,'EPSG','8364');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8443',1,'EPSG','8364');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8443',2,'EPSG','8367');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8453',1,'EPSG','1506');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8453',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8454',1,'EPSG','1507');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8454',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8457',1,'EPSG','1509');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8457',2,'EPSG','1511');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8460',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8460',2,'EPSG','1474');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8461',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8461',2,'EPSG','1475');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8462',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8462',2,'EPSG','1476');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8463',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8463',2,'EPSG','1477');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8464',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8464',2,'EPSG','1478');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8465',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8465',2,'EPSG','1479');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8466',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8466',2,'EPSG','1480');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8467',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8467',2,'EPSG','1481');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8468',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8468',2,'EPSG','1482');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8469',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8469',2,'EPSG','1483');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8470',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8470',2,'EPSG','1484');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8471',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8471',2,'EPSG','1485');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8472',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8472',2,'EPSG','1486');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8473',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8473',2,'EPSG','1487');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8474',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8474',2,'EPSG','1488');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8475',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8475',2,'EPSG','1489');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8476',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8476',2,'EPSG','1490');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8477',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8477',2,'EPSG','1491');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8478',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8478',2,'EPSG','1492');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8479',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8479',2,'EPSG','1493');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8480',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8480',2,'EPSG','1494');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8481',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8481',2,'EPSG','1495');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8482',1,'EPSG','1747');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8482',2,'EPSG','1496');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8483',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8483',2,'EPSG','1497');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8484',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8484',2,'EPSG','1498');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8485',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8485',2,'EPSG','1499');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8486',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8486',2,'EPSG','1500');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8487',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8487',2,'EPSG','1501');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8488',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8488',2,'EPSG','1502');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8489',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8489',2,'EPSG','1503');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8496',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8496',2,'EPSG','1515');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8497',1,'EPSG','1243');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8497',2,'EPSG','1515');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8508',1,'EPSG','1454');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8508',2,'EPSG','1520');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8509',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8509',2,'EPSG','1521');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8510',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8510',2,'EPSG','1522');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8511',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8511',2,'EPSG','1523');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8512',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8512',2,'EPSG','1524');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8513',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8513',2,'EPSG','1525');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8514',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8514',2,'EPSG','1526');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8517',1,'EPSG','1528');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8517',2,'EPSG','1527');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8530',1,'EPSG','1539');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8530',2,'EPSG','1540');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8532',1,'EPSG','1541');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8532',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8537',1,'EPSG','1545');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8537',2,'EPSG','1237');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8553',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8553',2,'EPSG','1553');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8554',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8554',2,'EPSG','1554');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8560',1,'EPSG','1559');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8560',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8562',1,'EPSG','1560');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8562',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8563',1,'EPSG','1568');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8563',2,'EPSG','1565');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8564',1,'EPSG','1576');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8564',2,'EPSG','1473');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8565',1,'EPSG','1574');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8565',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8566',1,'EPSG','1572');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8566',2,'EPSG','1188');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8568',1,'EPSG','1584');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8568',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8569',1,'EPSG','1588');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8569',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8571',1,'EPSG','1570');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8571',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8572',1,'EPSG','1571');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8572',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8573',1,'EPSG','1591');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8573',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8574',1,'EPSG','1578');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8574',2,'EPSG','1580');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8575',1,'EPSG','1579');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8575',2,'EPSG','1580');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8576',1,'EPSG','1594');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8576',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8577',1,'EPSG','1595');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8577',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8578',1,'EPSG','1596');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8578',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8579',1,'EPSG','1593');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8579',2,'EPSG','1150');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8580',1,'EPSG','1611');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8580',2,'EPSG','1149');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8581',1,'EPSG','1616');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8581',2,'EPSG','1237');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8582',1,'EPSG','1454');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8582',2,'EPSG','1741');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8583',1,'EPSG','1461');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8583',2,'EPSG','1731');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8584',1,'EPSG','1313');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8584',2,'EPSG','1752');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8585',1,'EPSG','1313');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8585',2,'EPSG','1702');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8586',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8586',2,'EPSG','1704');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8587',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8587',2,'EPSG','1705');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8588',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8588',2,'EPSG','1706');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8589',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8589',2,'EPSG','1707');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8590',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8590',2,'EPSG','1717');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8591',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8591',2,'EPSG','1728');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8592',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8592',2,'EPSG','1708');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8593',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8593',2,'EPSG','1739');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8594',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8594',2,'EPSG','1750');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8595',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8595',2,'EPSG','1712');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8596',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8596',2,'EPSG','1714');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8597',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8597',2,'EPSG','1713');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8598',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8598',2,'EPSG','1748');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8599',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8599',2,'EPSG','1742');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8600',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8600',2,'EPSG','1709');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8601',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8601',2,'EPSG','1743');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8602',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8602',2,'EPSG','1718');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8603',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8603',2,'EPSG','1719');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8604',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8604',2,'EPSG','1721');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8605',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8605',2,'EPSG','1720');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8606',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8606',2,'EPSG','1725');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8607',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8607',2,'EPSG','1722');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8608',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8608',2,'EPSG','1710');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8609',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8609',2,'EPSG','1723');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8610',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8610',2,'EPSG','1711');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8611',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8611',2,'EPSG','1715');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8612',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8612',2,'EPSG','1716');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8613',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8613',2,'EPSG','1724');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8614',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8614',2,'EPSG','1744');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8615',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8615',2,'EPSG','1749');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8616',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8616',2,'EPSG','1726');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8617',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8617',2,'EPSG','1727');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8618',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8618',2,'EPSG','1729');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8619',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8619',2,'EPSG','1745');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8620',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8620',2,'EPSG','1730');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8621',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8621',2,'EPSG','1737');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8622',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8622',2,'EPSG','1732');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8623',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8623',2,'EPSG','1733');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8624',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8624',2,'EPSG','1734');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8625',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8625',2,'EPSG','1735');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8626',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8626',2,'EPSG','1746');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8627',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8627',2,'EPSG','1736');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8628',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8628',2,'EPSG','1747');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8629',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8629',2,'EPSG','1738');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8630',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8630',2,'EPSG','1740');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8631',1,'EPSG','1805');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8631',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8632',1,'EPSG','1806');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8632',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8633',1,'EPSG','1828');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8633',2,'EPSG','1238');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8634',1,'EPSG','1839');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8634',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8635',1,'EPSG','1313');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8635',2,'EPSG','1849');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8636',1,'EPSG','1881');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8636',2,'EPSG','1130');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8637',1,'EPSG','1756');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8637',2,'EPSG','1944');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8638',1,'EPSG','1260');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8638',2,'EPSG','1837');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8639',1,'EPSG','1762');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8639',2,'EPSG','1654');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8640',1,'EPSG','1882');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8640',2,'EPSG','1253');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8641',1,'EPSG','1883');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8641',2,'EPSG','1897');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8642',1,'EPSG','1884');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8642',2,'EPSG','1623');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8643',1,'EPSG','1891');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8643',2,'EPSG','1272');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8644',1,'EPSG','1761');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8644',2,'EPSG','1891');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8644',3,'EPSG','1272');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8645',1,'EPSG','1757');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8645',2,'EPSG','1618');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8646',1,'EPSG','1902');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8646',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8647',1,'EPSG','1313');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8647',2,'EPSG','1950');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8647',3,'EPSG','1946');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8648',1,'EPSG','1991');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8648',2,'EPSG','1986');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8649',1,'EPSG','1991');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8649',2,'EPSG','1990');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8650',1,'EPSG','1071');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8650',2,'EPSG','1073');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8651',1,'EPSG','1063');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8651',2,'EPSG','1065');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8652',1,'EPSG','1064');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8652',2,'EPSG','1065');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8655',1,'EPSG','1902');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8655',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8656',1,'EPSG','15790');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8656',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8657',1,'EPSG','15792');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8657',2,'EPSG','1240');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8659',1,'EPSG','15896');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','8659',2,'EPSG','1158');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','9103',1,'EPSG','1241');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','9103',2,'EPSG','8971');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','9103',3,'EPSG','7807');
INSERT INTO "concatenated_operation_step" VALUES('EPSG','9103',4,'EPSG','7790');
